CHAPTER II

AVIATION SAFETY MANAGEMENT

State Plan for Aviation Safety
Article 8
1
The State Safety Programme shall include or be accompanied by a State Plan for Aviation Safety. Based on the assessment of relevant safety information, the Secretary of State, in consultation with the CAA and other relevant stakeholders, shall identify in that plan the main safety risks affecting the national civil aviation safety system and shall set out the necessary actions to mitigate those risks.
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Words in Art. 8(1) substituted (31.12.2020) by The Aviation Safety (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/645), regs. 1, 90(2)(a) (with Sch. 3) (as amended by S.I. 2019/1098, regs. 1(3), 12); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 8(1) substituted (31.12.2020) by The Aviation Safety (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/645), regs. 1, 90(2)(b) (with Sch. 3) (as amended by S.I. 2019/1098, regs. 1(3), 12); 2020 c. 1, Sch. 5 para. 1(1)
Art. 8(2) omitted (31.12.2020) by virtue of The Aviation Safety (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/645), regs. 1, 90(3) (with Sch. 3) (as amended by S.I. 2019/1098, regs. 1(3), 12); 2020 c. 1, Sch. 5 para. 1(1)