CHAPTER X

FINAL PROVISIONS

Committee procedure
Article 114. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Exercise of the delegation
Article 115. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Separate delegated acts for different delegated powers
Article 116. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment to Directive 2001/83/EC
Article 117. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment to Regulation (EC) No 178/2002
Article 118. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Amendment to Regulation (EC) No 1223/2009
Article 119. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Transitional provisions
Article 120. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Evaluation
Article 121. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Repeal
Article 122. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Entry into force and date of application
Article 123. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (31.12.2020) by The Medical Devices Regulations 2002 (S.I. 2002/618), reg. 4O (with savings and transitional provisions for N.I. in reg. 3ZA) (as amended by S.I. 2019/791, regs. 1(1), 3(7) and by S.I. 2020/1478, regs. 1(3), Sch. 2 para. 2; and as amended (27.7.2021) by The Medical Devices (Northern Ireland Protocol) Regulations 2021 (S.I. 2021/905), regs. 1(2), 4, 32); 2020 c. 1, Sch. 5 para. 1(1))