CHAPTER VIII

COOPERATION BETWEEN MEMBER STATES, MEDICAL DEVICE COORDINATION GROUP, EXPERT LABORATORIES, EXPERT PANELS AND DEVICE REGISTERS

Competent authorities
Article 101. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Cooperation
Article 102. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Medical Device Coordination Group
Article 103. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Support by the Commission
Article 104. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Tasks of the MDCG
Article 105. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Provision of scientific, technical and clinical opinions and advice
Article 106. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Conflict of interests
Article 107. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Device registers and databanks
Article 108. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (31.12.2020) by The Medical Devices Regulations 2002 (S.I. 2002/618), reg. 4O (with savings and transitional provisions for N.I. in reg. 3ZA) (as amended by S.I. 2019/791, regs. 1(1), 3(7) and by S.I. 2020/1478, regs. 1(3), Sch. 2 para. 2; and as amended (27.7.2021) by The Medical Devices (Northern Ireland Protocol) Regulations 2021 (S.I. 2021/905), regs. 1(2), 4, 32); 2020 c. 1, Sch. 5 para. 1(1))