CHAPTER II

PRINCIPLES OF COOPERATION

Coordination of maintenance
Article 4
Where maintenance of a pipeline or part of a transmission network has an impact on the amount of transmission capacity which can be offered at interconnection points, the transmission system operator(s) shall fully cooperate with their adjacent TSOs regarding their respective maintenance plans in order to minimise the impact on potential gas flows and capacity at an interconnection point. Where an adjacent TSO is a non-UK TSO, the transmission system operator must endeavour to fully cooperate with the non-UK TSO regarding their respective maintenance plans.
Words in Art. 4 substituted (31.12.2020) by The Gas (Security of Supply and Network Codes) (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/531), reg. 1(2), Sch. 4 para. 4(2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 4 inserted (31.12.2020) by The Gas (Security of Supply and Network Codes) (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/531), reg. 1(2), Sch. 4 para. 4(3); 2020 c. 1, Sch. 5 para. 1(1)