CHAPTER X

OPERATIONAL RISKS

(Article 45(1) to (6) of Regulation (EU) No 909/2014)
SECTION 4

Business continuity

Maintenance
Article 80
1
A CSD shall regularly review and update its business continuity policy and disaster recovery plan. The review shall include all critical operations of a CSD and provide for the most suitable recovery strategy for those operations.
2
When updating the business continuity policy and disaster recovery plan, a CSD shall take into consideration the outcome of the tests and recommendations from the audit reviews and from the competent authority.
3
A CSD shall review its business continuity policy and disaster recovery plan after every significant disruption of its operations. That review shall identify the causes of the disruption and any required improvement to the CSD's operations, the business continuity policy and disaster recovery plan.