Article 2
The table set out in Article 1(1) of Implementing Regulation (EU) 2016/185 is replaced by the following table:
Country | Company | TARIC additional code
Malaysia | AUO — SunPower Sdn. Bhd. Flextronics Shah Alam Sdn. Bhd. Hanwha Q CELLS Malaysia Sdn. Bhd. Panasonic Energy Malaysia Sdn. Bhd. TS Solartech Sdn. Bhd. Jinko Solar Technology SDN.BHD | C073 C074 C075 C076 C077 C203
Taiwan | ANJI Technology Co., Ltd AU Optronics Corporation Big Sun Energy Technology Inc. EEPV Corp. E-TON Solar Tech. Co., Ltd Gintech Energy Corporation Gintung Energy Corporation Inventec Energy Corporation Inventec Solar Energy Corporation LOF Solar Corp. Ming Hwei Energy Co., Ltd Motech Industries, Inc. Neo Solar Power Corporation Perfect Source Technology Corp. Ritek Corporation Sino-American Silicon Products Inc. Solartech Energy Corp. Sunengine Corporation Ltd Topcell Solar International Co., Ltd TSEC Corporation Win Win Precision Technology Co., Ltd | C058 C059 C078 C079 C080 C081 C082 C083 C084 C085 C086 C087 C088 C089 C090 C091 C092 C093 C094 C095 C096