CHAPTER I GENERAL PROVISIONS

Article 1 Subject matter
This Regulation specifies the principles and guidelines of good manufacturing practice for investigational medicinal products for human use the manufacture or import of which requires an authorisation as referred to in Article 61(1) of Regulation (EU) No 536/2014 and lays down arrangements for inspections of manufacturers in relation to compliance with good manufacturing practice in accordance with Article 63(4) of that Regulation.