PART II

OPERATIONAL SECURITY
TITLE 4

TRAINING

Common language for communication between the system operator employees in charge of real time operation
Article 62. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Art. 62 omitted (E.W.S.) (31.12.2020) by virtue of The Electricity Network Codes and Guidelines (System Operation and Connection) (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/533), reg. 1(2), Sch. 1 para. 47 (as amended by S.I. 2020/1016, regs. 1(2), 6(2)); 2020 c. 1, Sch. 5 para. 1(1)