PART IV

LOAD-FREQUENCY CONTROL AND RESERVES
TITLE 11

TRANSPARENCY OF INFORMATION

Information on RR
Article 189
1
All TSOs of each LFC block that operates a reserve replacement process shall publish the RR availability requirements specified in accordance with Article 161(2) and the technical requirements for the connection specified in accordance with Article 161(3) for their LFC block available ... within 3 months before their applicability.
2
All TSOs of the GB synchronous area shall publish, by 30 November of each year, an outlook of the reserve capacities RR of each LFC block for the following year ....
3
All TSOs of the GB synchronous area shall publish, within 30 days after the end of the quarter, the actual reserve capacities RR of each LFC block of the past quarter ....
Words in Art. 189(2)(3) substituted (E.W.S.) (31.12.2020) by The Electricity Network Codes and Guidelines (System Operation and Connection) (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/533), reg. 1(2), Sch. 1 para. 121(3) (as amended by S.I. 2020/1016, regs. 1(2), 6(2)); 2020 c. 1, Sch. 5 para. 1(1)
Words in art. 189(1)-(3) substituted (E.W.S.) (31.12.2020) by The Electricity Network Codes and Guidelines (System Operation and Connection) (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/533), reg. 1(2), Sch. 1 para. 121(2)(a) (as amended by S.I. 2020/1016, regs. 1(2), 6(2)); 2020 c. 1, Sch. 5 para. 1(1)
Words in art. 189(1)-(3) omitted (E.W.S.) (31.12.2020) by virtue of The Electricity Network Codes and Guidelines (System Operation and Connection) (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/533), reg. 1(2), Sch. 1 para. 121(2)(b) (as amended by S.I. 2020/1016, regs. 1(2), 6(2)); 2020 c. 1, Sch. 5 para. 1(1)