PART IV

LOAD-FREQUENCY CONTROL AND RESERVES
TITLE 11

TRANSPARENCY OF INFORMATION

General transparency requirements
Article 183
1
All TSOs shall ensure that the information listed in this Title is published at a time and in a format that does not create an actual or potential competitive advantage or disadvantage to any individual party or category of party and taking due account of sensitive commercial information.
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3
Each TSO shall ensure the availability and the accuracy of the information published in accordance with Articles 184 to 190.
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Art. 183(2) omitted (E.W.S.) (31.12.2020) by virtue of The Electricity Network Codes and Guidelines (System Operation and Connection) (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/533), reg. 1(2), Sch. 1 para. 115(2) (as amended by S.I. 2020/1016, regs. 1(2), 6(2)); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 183(3) substituted (E.W.S.) (31.12.2020) by The Electricity Network Codes and Guidelines (System Operation and Connection) (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/533), reg. 1(2), Sch. 1 para. 115(3) (as amended by S.I. 2020/1016, regs. 1(2), 6(2)); 2020 c. 1, Sch. 5 para. 1(1)
Art. 183(4) omitted (E.W.S.) (31.12.2020) by virtue of The Electricity Network Codes and Guidelines (System Operation and Connection) (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/533), reg. 1(2), Sch. 1 para. 115(4) (as amended by S.I. 2020/1016, regs. 1(2), 6(2)); 2020 c. 1, Sch. 5 para. 1(1)