PART IV

LOAD-FREQUENCY CONTROL AND RESERVES
TITLE 8

EXCHANGE AND SHARING OF RESERVES
CHAPTER 2

Exchange and sharing of reserves between synchronous areas

Frequency coupling between synchronous areas
Article 172. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Arts. 172-179 omitted (E.W.S.) (31.12.2020) by virtue of The Electricity Network Codes and Guidelines (System Operation and Connection) (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/533), reg. 1(2), Sch. 1 para. 112 (as amended by S.I. 2020/1016, regs. 1(2), 6(2)); 2020 c. 1, Sch. 5 para. 1(1)