Definitions
Article 2
For the purposes of this Regulation the following definitions apply:
1. ‘energy-related product’ or ‘product’ means a good or system with an impact on energy consumption during use which is placed on the market or put into service, including parts with an impact on energy consumption during use which are placed on the market or put into service for customers and that are intended to be incorporated into products;
2. ‘product group’ means a group of products which have the same main functionality;
3. ‘system’ means a combination of several goods which when put together perform a specific function in an expected environment and of which the energy efficiency can then be determined as a single entity;
4. ‘model’ means a version of a product of which all units share the same technical characteristics relevant for the label and the product information sheet and the same model identifier;
5. ‘model identifier’ means the code, usually alphanumeric, which distinguishes a specific product model from other models with the same trade mark or the same supplier's name;
6. ‘equivalent model’ means a model which has the same technical characteristics relevant for the label and the same product information sheet, but which is placed on the market or put into service by the same supplier as another model with a different model identifier;
7. ‘making available on the market’ means the supply of a product for distribution or use on the market of Great Britain in the course of a commercial activity, whether in return for payment or free of charge;
8. ‘placing on the market’ means the first making available of a product on the market of Great Britain, and related expressions must be construed accordingly;
9. ‘putting into service’ means the first use of a product for its intended purpose on the market of Great Britain;
10. ‘manufacturer’ means a natural or legal person who manufactures a product or has a product designed or manufactured, and markets that product under its name or trademark;
11. ‘authorised representative’ means a natural or legal person established in Great Britain who has received a written mandate from the manufacturer to act on its behalf in relation to specified tasks;
12. ““importer” means a person who—
  1. is established in the United Kingdom and places a product from a country outside of the United Kingdom on the market; or
  2. is established in Northern Ireland and places a product on the market that has been supplied to them for distribution, consumption or use in the course of a commercial activity, whether in return for payment or free of charge, from an EEA state;
13. ‘dealer’ means a retailer or other natural or legal person who offers for sale, hire, or hire purchase, or displays products to customers or installers in the course of a commercial activity, whether or not in return for payment;
14. “supplier” means a manufacturer established in Great Britain, the authorised representative of a manufacturer who is not established in Great Britain, or an importer, who places a product on the market;
15. ‘distance selling’ means the offer for sale, hire or hire purchase by mail order, catalogue, internet, telemarketing or by any other method by which the potential customer cannot be expected to see the product displayed;
16. ‘customer’ means a natural or legal person who buys, hires or receives a product for own use whether or not acting for purposes which are outside its trade, business, craft or profession;
17. ‘energy efficiency’ means the ratio of output of performance, service, goods or energy to input of energy;
18. ‘designated standard’ has the meaning given to it by regulation 2A of the Ecodesign for Energy-Related Products Regulations 2010;
19. ‘label’ means a graphic diagram, either in printed or electronic form, including a closed scale using only letters from A to G, each letter representing a class and each class corresponding to energy savings, in seven different colours from dark green to red, in order to inform customers about energy efficiency and energy consumption; it includes rescaled labels and labels with fewer classes and colours in accordance with Article 11(10)(a) and (b);
20. ‘rescaling’ means an exercise making the requirements for achieving the energy class on a label for a particular product group more stringent;
21. ‘rescaled label’ means a label for a particular product group that has undergone rescaling and is distinguishable from labels before rescaling while preserving a visual and perceptible coherence of all labels;
22. ‘product information sheet’ means a standard document containing information relating to a product, in printed or electronic form;
23. ‘technical documentation’ means documentation sufficient to enable market surveillance authorities to assess the accuracy of the label and the product information sheet of a product, including test reports or similar technical evidence;
24. ‘supplementary information’ means information, as specified in a delegated act, on the functional and environmental performance of a product;
...
26. ‘verification tolerance’ means the maximum admissible deviation of the measurement and calculation results of the verification tests performed by, or on behalf of, market surveillance authorities, compared to the values of the declared or published parameters, reflecting deviation arising from interlaboratory variation;
27. ‘delegated act’ means a product-specific measure listed in column 2 of the table in Schedule 1 to the Energy Information Regulations 2011 or made by the Secretary of State under Article 11;
28. “market surveillance” and “market surveillance authority” have the meanings set out in Article 2 of Regulation
(EC) No 765/2008
setting out the requirements for accreditation and market surveillance relating to the marketing of products and repealing Regulation EEC No 339/93
.
Words in Art. 2(7) substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 4 para. 3(2) (as amended by S.I. 2020/1528, regs. 1(2), 9(a)(i)); 2020 c. 1, Sch. 5 para. 1(1)
Art. 2(8) substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 4 para. 3(3) (as amended by S.I. 2020/1528, regs. 1(2), 9(a)(ii)); 2020 c. 1, Sch. 5 para. 1(1)
Art. 2(9) substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 4 para. 3(4) (as amended by S.I. 2020/1528, regs. 1(2), 9(a)(ii)); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 2(11) substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 4 para. 3(5) (as substituted by S.I. 2020/1528, regs. 1(2), 9(a)(iii)); 2020 c. 1, Sch. 5 para. 1(1)
Art. 2(12) substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 4 para. 3(6) (as substituted by S.I. 2020/1528, regs. 1(2), 9(a)(iv)); 2020 c. 1, Sch. 5 para. 1(1)
Art. 2(14) substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 4 para. 3(7) (as substituted by S.I. 2020/1528, regs. 1(2), 9(a)(v)); 2020 c. 1, Sch. 5 para. 1(1)
Art. 2(18) substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 4 para. 3(8); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 2(19) substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 4 para. 3(9); 2020 c. 1, Sch. 5 para. 1(1)
Art. 2(25) omitted (31.12.2020) by virtue of The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 4 para. 3(10); 2020 c. 1, Sch. 5 para. 1(1)
Art. 2(27) inserted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 4 para. 3(11); 2020 c. 1, Sch. 5 para. 1(1)
Art. 2(28) inserted by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 4 para. 3(11) (as amended by S.I. 2020/1528, regs. 1(2), 9(a)(vi)); 2020 c. 1, Sch. 5 para. 1(1)