Entry into force
Article 6
This Regulation shall enter into force on the twentieth day following that of its publication in the Official Journal of the European Union.
It shall apply from 2 March 2016.
However, Annex IC shall apply from
15 June 2019
with the exception of Appendix 16 which shall apply from
2 March 2016
.
Substituted by Commission Implementing Regulation (EU) 2018/502 of 28 February 2018 amending Implementing Regulation (EU) 2016/799 laying down the requirements for the construction, testing, installation, operation and repair of tachographs and their components (Text with EEA relevance).