CHAPTER 3

TASKS OF THE AGENCY RELATING TO RAILWAY SAFETY

Technical support – recommendations on railway safety
Article 13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Single safety certificates
Article 14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Maintenance of vehicles
Article 15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Cooperation with national investigating bodies
Article 16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Transport of dangerous goods by rail
Article 17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Exchange of information on safety-related accidents
Article 18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation omitted (4.3.2024) by virtue of The Railways (Revocation and Consequential Provision) Regulations 2024 (S.I. 2024/127), reg. 1(2), Sch.