TITLE I

GENERAL PROVISIONS

Application to existing power-generating modules
Article 4
1
Existing power-generating modules are not subject to the requirements of this Regulation, except where:
a
a type C or type D power-generating module has been modified to such an extent that its connection agreement must be substantially revised in accordance with the following procedure:
1. power-generating facility owners who intend to undertake the modernisation of a plant or replacement of equipment impacting the technical capabilities of the power-generating module shall notify their plans to the relevant system operator in advance;
2. if the relevant system operator considers that the extent of the modernisation or replacement of equipment is such that a new connection agreement is required, the system operator shall notify the ... regulatory authority ...; and
3. the ... regulatory authority ... shall decide if the existing connection agreement needs to be revised or a new connection agreement is required and which requirements of this Regulation shall apply; or
b
the regulatory authority decides to make an existing power-generating module subject to all or some of the requirements of this Regulation, following a proposal from the relevant TSO in accordance with paragraphs 3, 4 and 5.
2
For the purposes of this Regulation, a power-generating module shall be considered existing if:
a
it is already connected to the network on the date of entry into force of this Regulation; or
b
the power-generating facility owner has concluded a final and binding contract for the purchase of the main generating plant before 17 May 2018. The power-generating facility owner must have notified the relevant system operator and relevant TSO of conclusion of the contract before 17 November 2018.
The notification submitted by the power-generating facility owner to the relevant system operator and to the relevant TSO must at least have indicated the contract title, its date of signature and date of entry into force and the specifications of the main generating plant to be constructed, assembled or purchased.
The regulatory authority may determine whether a power-generating module is to be considered an existing power-generating module or a new power-generating module.
3
Following a public consultation in accordance with Article 10 and in order to address significant factual changes in circumstances, such as the evolution of system requirements including penetration of renewable energy sources, smart grids, distributed generation or demand response, the relevant TSO may propose to the regulatory authority that the application of the requirements set out in this Regulation be extended to existing power-generating modules.
For that purpose a sound and transparent quantitative cost-benefit analysis shall be carried out, in accordance with Articles 38 and 39. The analysis shall indicate:
a
the costs, in regard to existing power-generating modules, of requiring compliance with this Regulation;
b
the socioeconomic benefit resulting from applying the requirements set out in this Regulation; and
c
the potential of alternative measures to achieve the required performance.
4
Before carrying out the quantitative cost-benefit analysis referred to in paragraph 3, the relevant TSO shall:
a
carry out a preliminary qualitative comparison of costs and benefits;
b
obtain approval from the ... regulatory authority ....
5
The ... regulatory authority ... shall decide on the extension of the applicability of this Regulation to existing power-generating modules within six months of receipt of the report and the recommendation of the relevant TSO in accordance with Article 38(4). The decision of the regulatory authority ... shall be published.
6
The relevant TSO shall take account of the legitimate expectations of power-generating facility owners as part of the assessment of the application of this Regulation to existing power-generating modules.
7
The relevant TSO may assess the application of some or all of the provisions of this Regulation to existing power-generating modules every three years in accordance with the criteria and process set out in paragraphs 3 to 5.
Word in Art. 4(1)(a)(ii) omitted (E.W.S.) (31.12.2020) by virtue of The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(2)(a)(i)
Words in Art. 4(1)(a)(ii) omitted (E.W.S.) (31.12.2020) by virtue of The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(2)(a)(ii)
Word in Art. 4(1)(a)(iii) omitted (E.W.S.) (31.12.2020) by virtue of The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(2)(b)(i)
Words in Art. 4(1)(a)(iii) omitted (E.W.S.) (31.12.2020) by virtue of The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(2)(b)(ii)
Words in Art. 4(1)(b) substituted (E.W.S.) (31.12.2020) by The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(2)(c)
Words in Art. 4(2)(b) substituted (E.W.S.) (31.12.2020) by The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(3)(a)(i)
Words in Art. 4(2)(b) substituted (E.W.S.) (31.12.2020) by The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(3)(a)(ii)
Words in Art. 4(2)(b) substituted (E.W.S.) (31.12.2020) by The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(3)(a)(iii)
Words in Art. 4(2) substituted (E.W.S.) (31.12.2020) by The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(3)(b)
Words in Art. 4(2) substituted (E.W.S.) (31.12.2020) by The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(3)(c)
Word in Art. 4(3) substituted (E.W.S.) (31.12.2020) by The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(4)(a)
Words in Art. 4(3) inserted (E.W.S.) (31.12.2020) by The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(4)(b)
Words in Art. 4(3) inserted (E.W.S.) (31.12.2020) by The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(4)(c)
Word in Art. 4(4)(b) omitted (E.W.S.) (31.12.2020) by virtue of The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(5)(a)
Words in Art. 4(4)(b) omitted (E.W.S.) (31.12.2020) by virtue of The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(5)(b)
Word in Art. 4(5) omitted (E.W.S.) (31.12.2020) by virtue of The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(6)(a)
Words in Art. 4(5) omitted (E.W.S.) (31.12.2020) by virtue of The Electricity and Gas (Internal Markets and Network Codes) (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1006), reg. 1(2), Sch. 1 para. 4(6)(b)