CHAPTER V

MARKET SURVEILLANCE AND CONTROL OF APPLIANCES AND FITTINGS ENTERING THE MARKET OF GREAT BRITAIN

Market surveillance and control of appliances and fittings entering the United Kingdom market
Article 36
Articles 15(3), 16 to 22 and 26 to 29 of Regulation (EC) No 765/2008 shall apply to appliances and fittings covered by this Regulation.

Procedure ... for dealing with appliances or fittings presenting a risk
Article 37
1
Where the market surveillance authority has sufficient reason to believe that an appliance or fitting covered by this Regulation presents a risk to the health or safety of persons or to domestic animals or property, the authority shall carry out an evaluation in relation to the appliance or fitting concerned covering all relevant requirements laid down in this Regulation. The relevant economic operators shall cooperate as necessary with the market surveillance authority for that purpose.
Where, in the course of the evaluation referred to in the first subparagraph, the market surveillance authority finds that the appliance or fitting does not comply with the requirements laid down in this Regulation, the authority shall without delay require the relevant economic operator to take all appropriate corrective action to bring the appliance or fitting into compliance with those requirements, to withdraw the appliance or fitting from the market, or to recall it within a reasonable period, commensurate with the nature of the risk, as the authority may prescribe.
The market surveillance authority shall inform the relevant approved body accordingly.
Article 21 of Regulation (EC) No 765/2008 shall apply to the measures referred to in the second subparagraph of this paragraph.
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3
The economic operator shall ensure that all appropriate corrective action is taken in respect of all the appliances and fittings concerned that he has made available on the market ....
4
Where the relevant economic operator does not take adequate corrective action within the period referred to in the second subparagraph of paragraph 1, the market surveillance authority shall take all appropriate ... measures to prohibit or restrict the appliances or fittings being made available on the market, to withdraw the appliance or fitting from that market or to recall it.
...
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Union safeguard procedure
Article 38. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Compliant appliances or fittings which present a risk
Article 39
1
Where, having carried out an evaluation under Article 37(1), the enforcement authority finds that although an appliance or fitting is in compliance with this Regulation, it presents a risk to the health or safety of persons or to domestic animals or property, it shall require the relevant economic operator to take all appropriate measures to ensure that the appliance or fitting concerned, when placed on the market, no longer presents that risk, to withdraw the appliance or fitting from the market or to recall it within a reasonable period, commensurate with the nature of the risk, as it may prescribe.
2
The economic operator shall ensure that corrective action is taken in respect of all the appliances or fittings concerned that he has made available on the market ....
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Formal non-compliance
Article 40
1
Without prejudice to Article 37, where the enforcement authority makes one of the following findings, it shall require the relevant economic operator to put an end to the non-compliance concerned:
a
the UK marking has been affixed in violation of Article 30 of Regulation (EC) No 765/2008 or of Article 17 of this Regulation;
b
the UK marking has not been affixed;
c
the inscriptions referred to in Annex IV have not been affixed or have been affixed in violation of Article 18;
d
the identification number of the approved body involved in the production control phase has been affixed in violation of Article 17 or has not been affixed;
e
the ... declaration of conformity has not been drawn up or has not been drawn up correctly;
f
a copy of the ... declaration of conformity does not accompany the fitting;
g
the technical documentation is either not available or not complete;
h
the information referred to in Article 7(6) or Article 9(3) is absent, false or incomplete;
i
any other administrative requirement provided for in Article 7 or Article 9 is not fulfilled.
2
Where the non-compliance referred to in paragraph 1 persists, the enforcement authority shall take all appropriate measures to restrict or prohibit the appliance or fitting being made available on the market or ensure that it is recalled or withdrawn from the market.
Ch. 5 heading substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(34) (as amended by S.I. 2020/676, regs. 1(1), 2 and S.I. 2020/1460, reg. 1(4), Sch. 3 para. 25(7)); 2020 c. 1, Sch. 5 para. 1(1)
Art. 36 heading substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(35)(a) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 36 substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(35)(b) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 37 heading omitted (31.12.2020) by virtue of The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(a) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 37(1) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(b)(i)(aa) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 37(1) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(b)(i)(bb) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 37(1) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(b)(i)(cc) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 37(1) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(b)(ii)(aa) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 37(1) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(b)(ii)(bb) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 37(1) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(b)(iii)(aa) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 37(1) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(b)(iii)(bb) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Art. 37(2) omitted (31.12.2020) by virtue of The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(c) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 37(3) omitted (31.12.2020) by virtue of The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(d) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 37(4) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(e)(i)(aa) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 37(4) omitted (31.12.2020) by virtue of The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(e)(i)(bb) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 37(4) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(e)(i)(cc) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 37(4) omitted (31.12.2020) by virtue of The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(e)(ii) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Art. 37(5)-(8) omitted (31.12.2020) by virtue of The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(36)(f) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Art. 38 omitted (31.12.2020) by virtue of The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(37) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 39(1) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(38)(a) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 39(2) omitted (31.12.2020) by virtue of The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(38)(b) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Art. 39(3)-(5) omitted (31.12.2020) by virtue of The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(38)(c) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 40(1) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(39)(a)(i) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 40(1)(a) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(39)(a)(ii) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 40(1)(b) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(39)(a)(ii) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 40(1)(d) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(39)(a)(iii) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 40(1)(e) omitted (31.12.2020) by virtue of The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(39)(a)(iv) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 40(1)(f) omitted (31.12.2020) by virtue of The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(39)(a)(iv) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 40(2) substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 36 para. 2(39)(b) (as amended by S.I. 2020/676, regs. 1(1), 2); 2020 c. 1, Sch. 5 para. 1(1)