CHAPTER V

APPROVAL OF CONFORMITY ASSESSMENT BODIES

Appeal against decisions of approved bodies
Article 33
Approved bodies shall ensure that a transparent and accessible appeal procedure against their decisions is available.
Word in Ch. 5 heading substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 35 para. 3(18); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 33 substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 35 para. 3(31)(a); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 33 heading substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 35 para. 3(31)(b); 2020 c. 1, Sch. 5 para. 1(1)