CHAPTER V

APPROVAL OF CONFORMITY ASSESSMENT BODIES

Monitoring obligations
Article 23
The Secretary of State must monitor each approved body with a view to verifying that the body—
The Commission shall make that information publicly available.
a
continues to meet—
i
the approved body requirements; and
ii
any conditions set by the Secretary of State under Article 21(6)(b); and
b
carries out its functions in accordance with this Regulation.
Word in Ch. 5 heading substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 35 para. 3(18); 2020 c. 1, Sch. 5 para. 1(1)
Art. 23 substituted (31.12.2020) by The Product Safety and Metrology etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/696), reg. 1, Sch. 35 para. 3(22); 2020 c. 1, Sch. 5 para. 1(1)