CHAPTER VI

COMMITTEE PROCEDURE, TRANSITIONAL AND FINAL PROVISIONS

Committee procedure
Article 44. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Penalties
Article 45. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Transitional provisions
Article 46. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Post-withdrawal continuity provision
Article 46A
1
Paragraph 2 applies where, at any time before any technical standard has been adopted and designated as a designated standard in accordance with Article 3A—
a
a subsystem or safety component has been assessed by a notified body in accordance with any of the EU conformity assessment procedures;
b
an EU declaration of conformity has been drawn up in accordance with the EU Regulation in respect of that subsystem or safety component; and
c
a CE marking has been affixed to that subsystem or safety component in accordance with the EU Regulation.
2
Where this paragraph applies—
a
a subsystem or safety component is to be treated as having been assessed in accordance with the equivalent conformity assessment procedure in Chapter 3 of this Regulation; and
b
the EU declaration of conformity and the CE marking are to be treated for the purposes of this Regulation and any other enactment relating to cableway installations as if they were respectively a declaration of conformity under this Regulation and a UK marking.
3
In this Article—
a
“
CE marking
” has the same meaning as in Article 3(27) of the EU Regulation;
b
“
EU conformity assessment procedures
” means the procedures provided for under Article 18(2) of the EU Regulation;
c
“
EU declaration of conformity
” has the same meaning as in the EU Regulation;
d
“
notified body
” means a body notified to the Commission under Article 22 of the EU Regulation.

Repeal
Article 47
Directive 2000/9/EC is repealed with effect from 21 April 2018.
References to the repealed Directive shall be construed as references to this Regulation and shall be read in accordance with the correlation table in Annex X.

Entry into force and application
Article 48
1
This Regulation shall enter into force on the twentieth day following that of its publication in the Official Journal of the European Union.
2
This Regulation shall apply from 21 April 2018, with the exception of:
a
Articles 22 to 38 and 44, which shall apply from 21 October 2016;
b
Article 45(1), which shall apply from 21 March 2018.
Arts. 44-46 omitted (31.12.2020) by virtue of The Cableway Installations (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/1347), regs. 1, 49; 2020 c. 1, Sch. 5 para. 1(1)
Art. 46A inserted (31.12.2020) by The Cableway Installations (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/1347), regs. 1, 50; 2020 c. 1, Sch. 5 para. 1(1)