CHAPTER VIII

OBLIGATIONS OF MARKETING AUTHORISATION HOLDERS, PARALLEL IMPORTERS AND PARALLEL DISTRIBUTORS

Products recalled, withdrawn or stolen
Article 40. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Products to be supplied as free samples
Article 41. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Removal of unique identifiers from the repositories system
Article 42. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (31.12.2020) by The Human Medicines (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/775), reg. 1, Sch. 9 para. 1(hh) (subject to transitional provisions in S.I. 2012/1916, Sch. 33A); 2020 c. 1, Sch. 5 para. 1(1)