CHAPTER II

TECHNICAL SPECIFICATIONS OF THE UNIQUE IDENTIFIER

Composition of the unique identifier
Article 4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (31.12.2020) by The Human Medicines (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/775), reg. 1, Sch. 9 para. 1(hh) (subject to transitional provisions in S.I. 2012/1916, Sch. 33A); 2020 c. 1, Sch. 5 para. 1(1)