CHAPTER IV

MODALITIES OF VERIFICATION OF THE SAFETY FEATURES AND DECOMMISSIONING OF THE UNIQUE IDENTIFIER BY MANUFACTURERS

Actions to be taken by manufacturers in case of tampering or suspected falsification
Article 18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (31.12.2020) by The Human Medicines (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/775), reg. 1, Sch. 9 para. 1(hh) (subject to transitional provisions in S.I. 2012/1916, Sch. 33A); 2020 c. 1, Sch. 5 para. 1(1)