Directive 2006/141/EC
Article 13
In accordance with Article 20(4) of Regulation (EU) No 609/2013, Directive 2006/141/EC is repealed with effect from 22 February 2020. However, Directive 2006/141/EC shall continue to apply until 21 February 2021 to infant formula and follow-on formula manufactured from protein hydrolysates.
References to Directive 2006/141/EC in other acts shall be construed as references to this Regulation in accordance with the scheme set out in the first paragraph.