Transitional provisions
Article 7
1
Licences, ratings and endorsements issued in accordance with the relevant provisions of national legislation based on Directive 2006/23/EC and licences, ratings and endorsements issued in accordance with Regulation (EU) No 805/2011 shall be deemed to have been issued in accordance with this Regulation.
2
The Area Control Procedural (ACP) rating with the Oceanic Control (OCN) rating endorsement issued on the basis of national rules based on Article 31(1) of Regulation (EU) No 805/2011 shall be deemed to have been issued in accordance with this Regulation.
3
Medical certificates and certificates for training organisations, aero-medical examiners and aero-medical centres, approvals of unit competence schemes and training plans issued in accordance with the relevant provisions of national legislation based on Directive 2006/23/EC in accordance with Regulation (EU) No 805/2011 shall be deemed to have been issued in accordance with this Regulation.