Reporting procedures
Article 6
1
The reporting entity shall submit data files in accordance with the reporting system of the SFIs website and the technical instructions to be provided by ESMA on its website.
2
ESMA shall publish those technical instructions on its website at the latest on 1 July 2016.
3
The reporting entity shall store the files sent to and received by the SFIs website in electronic form for at least five years. Upon request, those files shall be made available by the reporting entity or the issuer, the originator or the sponsor to the sectoral competent authorities as defined in Article 3(1)(r) of Regulation (EC) No 1060/2009.
4
Where the reporting entity or the issuer, the originator or the sponsor, identifies factual errors in the data that has been provided to the SFIs website they shall correct the relevant data without undue delay.