Commission Implementing Regulation (EU) 2015/1105
of 8 July 2015
concerning the authorisation of a preparation of Bifidobacterium animalis ssp. animalis DSM 16284, Lactobacillus salivarius ssp. salivarius DSM 16351 and Enterococcus faecium DSM 21913 as a feed additive for chickens reared for laying and minor poultry species other than laying, the authorisation of that feed additive for use in water for drinking for chickens for fattening and amending Regulation (EU) No 544/2013 as regards the maximum content of that feed additive in complete feedingstuff and its compatibility with coccidiostats (holder of the authorisation Biomin GmbH)
(Text with EEA relevance) (revoked)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX
PART A. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART B. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (E.W.S) (1.4.2025) by The Food and Feed (Regulated Products) (Amendment, Revocation, Consequential and Transitional Provision) Regulations 2025 (S.I. 2025/361), reg. 1(2), Sch. 5 para. 178 (with reg. 23)