LIST OF ANNEXES
Annex Number | Annex Title
I | Templates for the information document and information folder
II | Templates for the manufacturer’s statements on endurance testing and vehicle structure integrity
III | Templates for the manufacturer’s certificates providing proof of compliance to the type-approval authority on access to vehicle on-board diagnostics (OBD) and to vehicle repair and maintenance information
IV | Templates for the certificates of conformity
V | Models for the statutory plate and EU type-approval mark
VI | Templates for the EU type-approval certificate
VII | Numbering system of the EU type-approval certificate
VIII | Format of test reports and template for the test results sheet
IX | Template and numbering system for the certificate for the placing on the market and entry into service of parts or equipment which may pose a serious risk to the correct functioning of essential systems
X | List of parts or equipment which may pose a serious risk to the correct functioning of essential systems
ANNEX I

Templates for the information document and information folder

LIST OF APPENDICES
Appendix Number | Appendix title
1 | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a tailpipe pollution-control system
2 | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a crankcase and evaporative emissions system
3 | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) an on-board diagnostic (OBD) system
4 | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a sound level system
5 | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a propulsion unit performance system
5a | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a maximum torque and a maximum net power of a propulsion unit system
6 | Model information document relating to EU type-approval of a pollution-control device as a STU
7 | Model information document relating to EU type-approval of a noise-abatement device as a STU
8 | Model information document relating to EU type-approval of an exhaust (pollution-control device and noise-abatement device) as a STU
8a | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) an installation of audible warning devices system
9 | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a braking system
9a | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) an installation of glazing, windscreen wipers and defrosting and demisting devices system
9b | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) an identification of controls, tell-tales and indicators system
10 | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) an installation of lighting and light-signalling devices system
11 | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a roll-over protective structure (ROPS) system
11a | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a safety belt anchorages system
11b | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a steer-ability, cornering properties and turn ability system
12 | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) an installation of tyres system
13 | Model information document relating to EU type-approval of an audible warning device as a component
13a | Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a vehicle occupant protection, including interior fittings, head restraint and vehicle doors system
14 | Model information document relating to EU type-approval of a non-glazing front windscreen as a component/STU
15 | Model information document relating to EU type-approval of a windscreen washer device as a component/STU
16 | Model information document relating to EU type-approval of a rearward visibility device as a component/STU
17 | Model information document relating to EU type-approval of safety belts as a STU
18 | Model information document relating to EU type-approval of a seating position (saddle/seat) as a component/STU)
19 | Model information document relating to EU type-approval of a trailer coupling device as a STU
20 | Model information document relating to EU type-approval of devices to prevent unauthorised use as a STU
20a | Model information document relating to EU type-approval of a fuel tank as a STU
21 | Model information document relating to EU type-approval of passenger handholds as a STU
22 | Model information document relating to EU type-approval of footrests as a STU
23 | Model information document relating to EU type-approval of a side-car as a STU
24 | Manufacturer's declaration for vehicles capable of converting their performance level from subcategory (L3e/L4e)-A2 to (L3e/L4e)-A3 and vice versa
25 | Manufacturer’s declaration on powertrain tampering prevention measures (anti-tampering)
PART A

INFORMATION FOLDER
1.

General requirements
1.1.

When applying for EU type-approval for a vehicle, system, component or separate technical unit, the manufacturer shall provide, in accordance with Article 27 of Regulation (EU) No 168/2013, an information folder which shall contain the following:
1. a list of contents;
2. the information on the type-approval procedure chosen in accordance with Article 25(1) of Regulation (EU) No 168/2013, the template for which is set out in point 2 (information folder sheet);
3. the information document as set out in Part B of this Annex;
4. all relevant data, drawings, photographs and other information as required in the information document;
5. the manufacturer’s statement on endurance of functional safety-critical systems, parts and equipment as referred to in Article 22(2) of Regulation (EU) No 168/2013 and set out in Annex II to this regulation;
6. the manufacturer’s statement on vehicle structure integrity as referred to in Article 22(5) of Regulation (EU) No 168/2013 and in point 1.1.of Annex XIX to Commission Delegated Regulation (EU) No 3/2014 of 24 October 2013 supplementing Regulation (EU) No 168/2013 of the European Parliament and of the Council with regard to vehicle functional safety requirements for the approval of two- or three-wheel vehicles and quadricycles , as set out point 1.4. of Annex II to this regulation;
7. the manufacturer’s certificate providing proof of compliance to the type-approval authority on access to vehicle on-board diagnostic (OBD) systems and to vehicle repair and maintenance information as referred to in Article 57(8) of Regulation (EU) No 168/2013 and set out in Annex III to this regulation;
8. the manufacturer’s declaration of conversion of (L3e/L4e)-A2 to (L3e/L4e)-A3 motorcycle characteristics and vice versa as referred to in Article 25(8) of Regulation (EU) No 168/2013 and in point 4.2.6. of Annex III to Commission Delegated Regulation (EU) No 44/2014 of 21 November 2013 supplementing Regulation (EU) No 168/2013 of the European Parliament and of the Council with regard to the vehicle construction and general requirements for the approval of two- or three- wheel vehicles and quadricycles , as set out in Appendix 24 of this Annex;
9. the manufacturer’s declaration on powertrain tampering prevention measures (anti-tampering) as referred to in Article 20(2) of Regulation (EU) No 168/2013 and in points 2.2., 2.6. and 5.2. of Annex II to Commission Delegated Regulation 44/2014 according to the models established in Appendix 25 of this Annex;
10. any additional information requested by the approval authority as part of the approval procedure.
1.2.
Applications submitted on paper shall be in triplicate. Any drawings shall be to an appropriate scale and in sufficient detail on size A4 sheets or in a folder of A4 format. Photographs, if any, shall show sufficient detail.
1.3.
If the systems, components or separate technical units have electronic controls, information concerning their performance shall be provided.
2.

Template of the information folder sheet
Information

on the type-approval procedure chosen in accordance with Article 25(1) of Regulation (EU) No 168/2013

Information folder sheet
A duly completed version of this statement shall be included in the information folder.
The undersigned: [… (full name and position)]
Company name and address of the manufacturer: …
Name and address of the manufacturer’s representative (if any): …
Hereby applies for type-approval procedure(4):
1. step-by-step type-approval
2. single-step type-approval
3. mixed type-approval
Where procedures (a) or (c) are chosen, compliance with requirements as under (b) is declared for all systems, components and separate technical units.
Multi-stage type-approval chosen in accordance with Article 25(5) of Regulation (EU) No 168/2013: yes/no(4)
Information on the vehicle(s) to be filled in, if application is for EU whole-vehicle type-approval(3) :
1. Make (trade name of the manufacturer): …
2. Type(17): …
  1. Variant(s)(17): …
  2. Version(s)(17): …
  3. Commercial name(s) (if available): …
3. Category, subcategory and sub-subcategory of vehicle(2): …
Information to be filled in, if application is for type-approval of a system/ component/separate technical unit(3)(4) :
1. Make(s) (trade name(s) of manufacturer): …
2. Type: …
  1. Commercial name(s) (if available): …
3. Virtual and/or self-testing(3)
  1. Overview list with virtual and/or self-tested systems, components or separate technical units pursuant to point 6 of Annex III to Commission Delegated Regulation (EU) No 44/2014 below:
Overview table virtual and/or self-testing
Commission Delegated Regulation (EU) No 134/2014 of 16 December 2013 supplementing Regulation (EU) No 168/2013 of the European Parliament and of the Council with regard to environmental and propulsion unit performance requirements and amending Annex V thereof (OJ L 53, 21.2.2014, p. 1).
Delegated act | Annex | Subject | Virtual and/or self-tested: yes/no(4)
Commission Delegated Regulation (EU) No 134/2014 | IX | Testing procedures on maximum design vehicle speed | Self-testing: yes/no(4)
Commission Delegated Regulation (EU) No 3/2014 | II | Audible warning devices | Self-testing: yes/no(4)
Commission Delegated Regulation (EU) No 3/2014 | VIII | Driver-operated controls including identification of controls, tell-tales and indicators | Self-testing: yes/no(4)
Commission Delegated Regulation (EU) No 3/2014 | IX | Installation of lighting and light- signalling devices | Virtual testing: yes/no(4)
Commission Delegated Regulation (EU) No 3/2014 | X | Rearward visibility | Virtual testing: yes/no(4)
Commission Delegated Regulation (EU) No 3/2014 | XIV | Installation of tyres | Virtual testing: yes/no(4)
Commission Delegated Regulation (EU) No 44/2014 | XIV | Registration plate space | Self & Virtual testing: yes/no(4)
Commission Delegated Regulation (EU) No 44/2014 | XVI | Stands | Self-testing: yes/no(4)
This Commission Implementing Regulation | VIII | Statutory plate and EU type-approval mark | Self-testing: yes/no(4)
  2. Detailed report on validation of virtual and/or self-testing added: yes/no(4)
Place: … | Date: …
Signature: … | Name and position in the company: …
PART B

INFORMATION DOCUMENT
1.

General requirements
1.1.
The information document shall have a reference number supplied by the applicant.
1.2.
Where the particulars appearing in the information document for vehicle approval have changed, the manufacturer shall submit revised pages to the approval authority showing clearly the nature of the change(s) and the date of re-issue.
1.3.

Type-approval numbers
1.3.1.

The manufacturer shall supply the information required by the following table in respect of the applicable subjects for the vehicle in Annex II to Regulation (EU) No 168/2013. All relevant approvals and test reports (if available) for each subject shall be included. However, information in respect of systems, components or separate technical units need not be given here so long as such information is included in the correspondent approval certificate.
Type-approval number and test report overview
Contracting parties to the Revised 1958 Agreement.
To be indicated if not obtainable from the type-approval number.
The approval authority shall complete the references for the test reports, established by regulatory acts, for which no type-approval certificate is available.
Item number and subject | Type-approval number or test report number | Date of issue of the type-approval or of its extension or of the test report | Member State or contracting party issuing the type- approval or technical service issuing the test report | Reference to the regulatory act and its latest amendment | Variant(s)/ version(s
e.g. B1 audible warning devices | | | | |
Signed: …
Position in company: …
Date: …
1.4.
Vehicles and Vehicle types shall be identified as compliant with environmental step Euro 5 or environmental step Euro 5+ in accordance with the following Table:

Identification of environmental step Euro 5 and Euro 5+ for L-category vehicles
(sub-) category | Obligatory as of: 1.1.2020 for new types of vehicles 1.1.2021 for existing types of vehicles | Envi. step | Obligatory as of: 1.1.2024 for new types of vehicles 1.1.2025 for existing types of vehicles | Envi. step
L1e | OBD system not required | Euro 5 | OBD system not required | Euro 5
test types I, IV & V: Euro 5 | test types I, IV & V: Euro 5
L2e (other than L2e-U) | OBD system not required | Euro 5 | OBD system not required | Euro 5
test types I, IV & V: Euro 5 | test types I, IV & V: Euro 5
L2e-U | OBD system not required | Euro 5 | OBD system not required | Euro 5+
test type I: Euro 4 | test type I: Euro 5
test type IV & V: Euro 5 | test types IV & V: Euro 5
L3e (other than enduro and trial), L4e, L5e-A and L7e-A | OBD stage I system that monitors electric circuit and electronics failure, and triggers a report when: | Euro 5 | OBD stage I system that monitors electric circuit and electronics failure, and triggers a report when: | Euro 5+
1. OBD emission thresholds of Annex VI (B1) to Regulation (EU) No 168/2013 are exceeded, and | 1. OBD emission thresholds of Annex VI (B2) to Regulation (EU) No 168/2013 are exceeded, and
1. any operating mode significantly reduces engine torque. | 1. any operating mode significantly reduces engine torque.
OBD stage II that monitors emission control system failures and degradation (with the exception of catalyst monitoring), and reports when: | OBD stage II that monitors emission control system failures and degradation, and reports when:
OBD emission thresholds of Annex VI (B1) to Regulation (EU) No 168/2013 are exceeded. | OBD emission thresholds of Annex VI (B2) to Regulation (EU) No 168/2013 are exceeded.
test types I, IV & V: Euro 5 | test types I, IV & V: Euro 5
Enduro L3e-AxE and Trial L3e-AxT | OBD stage I system that monitors electric circuit and electronics failure, and triggers a report when: | Euro 5 | OBD stage I system that monitors electric circuit and electronics failure, and triggers a report when: | Euro 5+
1. OBD emission thresholds of Annex VI (B1) to Regulation (EU) No 168/2013 are exceeded, and | 1. OBD emission thresholds of Annex VI (B2) to Regulation (EU) No 168/2013 are exceeded, and
1. any operating mode significantly reduces engine torque. | 1. any operating mode significantly reduces engine torque.
test type I: Euro 4 | test type I: Euro 5
test types IV & V: Euro 5 | test types IV & V: Euro 5
L5e (other than Le5-A) and L7e (other than L7e-A) | OBD stage I system that monitors electric circuit and electronics failure, and triggers a report when: | Euro 5 | OBD stage I system that monitors electric circuit and electronics failure, and triggers a report when: | Euro 5+
1. OBD emission thresholds of Annex VI (B1) to Regulation (EU) No 168/2013 are exceeded, and | 1. OBD emission thresholds of Annex VI (B2) to Regulation (EU) No 168/2013 are exceeded, and
1. any operating mode significantly reduces engine torque. | 1. any operating mode significantly reduces engine torque.
test types I, IV & V: Euro 5 | test types I, IV & V: Euro 5
L6e other than L6e-B | OBD system not required | Euro 5 | OBD system not required | Euro 5
test types I, IV & V: Euro 5 | test types I, IV & V: Euro 5
L6e-B | OBD system not required | Euro 5 | OBD system not required | Euro 5+
test type I: Euro 4 | test type I: Euro 5
test type IV & V: Euro 5 | test type IV & V: Euro 5
2.

Content of the information document
All information documents shall contain the following:
2.1.
For a whole vehicle type-approval the manufacturer shall complete:
- the matrix in point 2.3. to identify the versions and variants of the vehicle intended for type-approval;
- a list of items applicable to the (sub-)category and to the technical characteristics of the vehicle from which content has been extracted, adhering to the numbering system of the total list set out in point 2.6.
2.2.
For a system, component or separate technical unit as listed in table 1 the manufacturer shall complete the applicable appendix to this Annex.
In addition to the Annexes mentioned in table 1, the systems, components and separate technical units shall comply with the following requirements:
- arrangements for type-approval procedures (Annex III of Commission Delegated Regulation (EU) No 44/2014)
- conformity of production (CoP) (Annex IV of Delegated Regulation (EU) No 44/2014)
- access to repair and maintenance information (Annex XV of Delegated Regulation (EU) No 44/2014)

Table 1

Lists of systems, components and separate technical units which may be subject to an EU type-approval
LIST I — Environmental and propulsion unit performance requirements
Appendix | System or component/separate technical unit (STU) | Commission Delegated Regulation (EU) No 134/2014 Annex number | As amended by and/or at the stage of implementation
1 | System: tailpipe pollution-control system | II, III, V, VI |
2 | System: crankcase and evaporative emissions | IV, V |
3 | System: environmental and functional on-board diagnostic (OBD) | VIII (and Annex XII to Commission Delegated Regulation (EU) No 44/2014) |
4 | System: sound level | IX |
5 | System: propulsion unit performance | X |
5a | System: maximum torque and a maximum net power of a propulsion unit | X Appendix 2 |
6 | STU: pollution-control device | II, III, IV, V, VI |
7 | STU: noise-abatement device | IX |
8 | STU: exhaust device (pollution-control device and noise-abatement device) | II, III, V, VI, IX |
LIST II — Vehicle functional safety requirements
Appendix | System or component/separate technical unit (STU) | Commission Delegated Regulation (EU) No 3/2014 Annex number | As amended by and/or at the stage of implementation
8a | System: installation of audible warning devices | II |
9 | System: braking | III |
9a | System: installation of glazing, windscreen wipers and defrosting and demisting devices | VII |
9b | System: identification of controls, tell-tales and indicators | VIII |
10 | System: installation of lighting and light-signalling devices | IX |
11 | System: Roll-over protective structure (ROPS) | XI |
11a | System: safety belt anchorages | XII |
11b | System: steer-ability, cornering properties and turn ability | XIV |
12 | System: installation of tyres | XV |
13 | Component: audible warning device | II |
13a | System: vehicle occupant protection, including interior fittings, head restraint and vehicle doors | XVII |
14 | Component/STU: non-glazing front windscreen | VII |
15 | Component/STU: windscreen washer device | VII |
16 | Component/STU: rearward visibility device | X |
17 | STU: safety belts | XII |
18 | Component/STU: seating position (saddle/seat) | XIII |
LIST III — Vehicle construction and general type-approval requirements
Appendix | System or component/separate technical unit (STU) | Commission Delegated Regulation (EU) No 44/2014 Annex number | As amended by and/or at the stage of implementation
19 | STU: trailer coupling device | V |
20 | STU: devices to prevent unauthorised use | VI |
20a | STU: fuel tank | IX |
21 | STU: passenger handholds | XIII |
22 | STU: footrests | XIII |
23 | STU: side-car | VIII, XI, XIII; (and Annexes III, V, VII, IX, X, XII, XIII, XIV, XV, XVII and XIX to Commission Delegated Regulation (EU) No 3/2014) |
2.3.
Matrix showing the combinations of the entries listed in point 2.6. within the versions and variants of the vehicle type

Variants and version matrix
Item No | All | Version 1 | Version 2 | Version 3 | Version n
2.3.1.
A separate matrix shall be compiled for each variant within the type.
2.3.2.
Entries with no restrictions on their combination within a variant shall be listed in the column headed ‘All’.
2.3.3.
The above information may be presented in an alternative format or merged with the information supplied under point 2.6.
2.4.

Type-, variant- and version designations
2.4.1.
The manufacturer shall allocate an alphanumeric code to each vehicle type, variant and version, made up of Roman letters and/or Arabic numerals, which shall also be indicated in the certificate of conformity (see Annex IV) of the vehicle concerned.
The use of brackets and hyphens is permitted provided they do not replace a letter or a numeral.
2.4.2.
The whole code shall be designated: Type-Variant-Version or ‘TVV’.
2.4.3.
The TVV shall clearly and unequivocally identify a unique combination of technical features in relation to the criteria defined in Part B of this Annex.
2.4.4.
The same manufacturer may use the same code in order to define a vehicle type when the latter falls in two or more categories.
2.4.5.
The same manufacturer shall not use the same code in order to define a vehicle type for more than one type-approval within the same vehicle category.
2.4.6.

Number of characters for the TVV
2.4.6.1.

The number of characters shall not exceed:
1. 15 for the code of the vehicle type;
2. 25 for the code of one variant;
3. 35 for the code of one version.
2.4.6.2.
The complete alphanumeric ‘TVV’ shall not contain more than 75 characters.
2.4.6.3.

When the TVV is used as a whole, a space shall be left between the type, the variant and the version.
Example of such TVV: 159AF[… space]0054[… space]977K(BE).
2.5.
For those subjects referred to in Annex II to Regulation (EU) No 168/2013 whose approvals have been granted in accordance with the UNECE regulations referred to in Article 54 of Regulation (EU) 168/2013 (UNECE approvals), the manufacturer shall supply the information required in point 2.7. only if it is not already provided in the correspondent approval certificate and/or test report. However, the information referred to in the certificate of conformity (Annex IV) shall be supplied in any case.
2.6.
The manufacturer shall complete the applicable item numbers of the template set out in point 2.8. and submit this filled-out list to the approval authority that grants the type-approval, split into two separate documents. The applicable items marked with * shall remain with the approval authority that grants the type-approval and all other applicable items shall make part of the information folder. The Colum ‘(Sub) categories’ indicates to which sub-categories applies each particular entry (e.g. ‘L1e - L7e’ means that the entry applies to all categories and subcategories).
2.7.
The following type of data entries may be omitted in the information document under the condition that an appropriate technical drawing either as a paper document or a pdf-file is added to the information folder and on which these listed items are shown in a clear and readable way:
1. Make (with the exemption of Item No 0.1);
2. Type (with the exemption of Item No 0.2);
3. Location / where;
4. Working principle (with the exemption of Item No 3.2.1.2);
5. Characteristics;
6. Number of (with the exemption of Items No 1.3., 3.2.1.1. and 6.16.1.);
7. Identification / part number;
8. (Brief) / (Technical) description;
9. Design;
10. Schematic drawing / diagram;
11. (Construction) materials used;
12. Angles / inclination and other dimensions (height, length, width, distance) (with the exemption of Items No 2.2.1., 2.2.2., 2.2.3., 2.2.17., 7.6.1. and 7.6.2.);
13. Tolerance;
14. Reference mark;
15. Size (with the exemption of point 6.18.1.1.1., 6.18.1.1.2. and 6.18.1.1.3.);
16. Configuration.
2.8.

INFORMATION DOCUMENT DATA ENTRIES
OJ L 72, 14.3.2008, p. 1.
OJ L 120, 7.5.2011, p. 1.
Regulation (EC) No 79/2009 of the European Parliament and of the Council of 14 January 2009 on type-approval of hydrogen-powered motor vehicles, and amending Directive 2007/46/EC (OJ L 35, 4.2.2009, p. 32).
OJ L 120, 7.5.2011, p. 1.
OJ L 72, 14.3.2008, p. 1.
Item No. | (Sub) categories | Detailed information
0. | | GENERAL INFORMATION
A. | | General information concerning vehicles
0.1. | L1e — L7e | Make (trade name of manufacturer): …
0.2. | L1e — L7e | Type(17) : …
0.2.1 | L1e — L7e | Variant(s)(17): …
0.2.2 | L1e — L7e | Version(s)(17): …
0.2.3. | L1e — L7e | Commercial name(s) (if available): …
0.3. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2) : …
0.4. | L1e — L7e | Company name and address of manufacturer: …
0.4.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.4.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.5. | L1e — L7e | Manufacturer’s statutory plate(s): …
0.5.1. | L1e — L7e | Location of the manufacturer's statutory plate(15)(18): …
0.5.2. | L1e — L7e | Method of attachment: …
0.5.3. | L1e — L7e | Photographs and/or drawings of the statutory plate (completed example with dimensions): …
0.6. | L1e — L7e | Location of the vehicle identification number(15) : …
0.6.1. | L1e — L7e | Photographs and/or drawings of the locations of the vehicle identification number (completed example with dimensions): …
0.6.1.1. | L1e — L7e | The serial number of the type begins with: …
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21) : …
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
0.11. | L1e — L7e | Type-approval marks for components and separate technical units(19) : …
0.11.1. | L1e — L7e | Method of attachment: …
0.11.2. | L1e — L7e | Photographs and/or drawings of the location of the type-approval mark (completed example with dimensions): …
C. | | General information regarding conformity of production and access to repair and maintenance information
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
0.13. | | Access to repair and maintenance information
0.13.1. | L1e — L7e | Address of principal website for access to vehicle repair and maintenance information: …
0.13.2. | L1e — L7e | In the case of multi-stage type-approval, address of principal website for access to vehicle repair and maintenance information from manufacturer(s) at previous stage(s):
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.1. | L1e — L7e | Photographs and/or drawings of a representative vehicle: …
1.2. | L1e — L7e | Scale drawing of the whole vehicle: …
1.3. | L1e — L7e | Number of axles and wheels: …
1.3.1. | L1e — L7e | Axles with twinned wheels(23): …
1.3.2. | L1e — L7e | Powered axles(23): …
1.4. | L1e — L7e | Chassis (if any) (overall drawing): …
1.5. | L2e, L5e-B, L6e-B, L7e-A2, L7e-B2, L7e-C | Material used for the bodywork:
1.6. | L1e — L7e | Position and arrangement of the propulsion(s): …
1.7. | L4e, L5e-B, L6e-B, L7e-A2, L7e-B2, L7e-C | Hand of drive: left/right/centre(4): …
1.7.1. | L1e — L7e | Vehicle is equipped to be driven in right/left-hand traffic and in countries that use metric/metric and imperial units.(4): …
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: … km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed (22): … km/h and gear in which it is reached: …
1.8.3. | L1e — L7e | Maximum net power combustion engine: … kW at … min-1 at A/F ratio: …
1.8.4. | L1e — L7e | Maximum net torque combustion engine: … Nm at … min-1 at A/F ratio: …
1.8.5. | L1e — L7e | Maximum continuous-rated power electric motor (15/30(4) minutes power(27)): … kW at … min–1
1.8.6. | L1e — L7e | Maximum continuous-rated torque electric motor: … Nm at … min-1
1.8.7. | L1e — L7e | Maximum continuous total power for propulsion(s): …. kW at …. min-1 at A/F ratio: …
1.8.8. | L1e — L7e | Maximum continuous total torque for propulsion(s): … Nm at … min-1 at A/F ratio: …
1.8.9. | L1e — L7e | Maximum peak power for propulsion(s): … kW at … min-1at A/F ratio: …
2. | | MASSES AND DIMENSIONS (in kg and mm.) refer to drawings where applicable
2.1 | | Range of vehicle mass (overall)
2.1.1. | L1e — L7e | Mass in running order: … kg
2.1.1.1. | L1e — L7e | Distribution of mass in running order between the axles: … kg
2.1.2. | L1e — L7e | Actual mass: … kg
2.1.2.1. | L1e — L7e | Distribution of actual mass between the axles: … kg
2.1.3. | L1e — L7e | Technically permissible maximum laden mass: … kg
2.1.3.1. | L1e — L7e | Technically permissible maximum mass on front axle: … kg
2.1.3.2. | L1e — L7e | Technically permissible maximum mass on rear axle: … kg
2.1.3.3. | L4e | Technically permissible maximum mass on sidecar axle: … kg
2.1.4. | L1e — L7e | Maximum hill-starting ability at the maximum technically permissible mass declared by the manufacturer: … % slope
2.1.5. | L1e — L7e | Maximum pay mass declared by manufacturer: … kg
2.1.6. | L1e — L7e | Safe load carrying capacity of load platform declared by manufacturer: … kg
2.1.7. | L1e — L7e | Technically permissible maximum towable mass in case of (4): Braked: … kg Unbraked: … kg
2.1.7.1 | L1e — L7e | Technically permissible maximum laden mass of the combination: … kg
2.1.7.2. | L1e — L7e | Technically permissible maximum mass at the coupling point: … kg
2.1.8. | L1e — L7e | Mass of the optional equipment: … kg
2.1.9. | L1e — L7e | Mass of the superstructure: … kg
2.1.10. | L1e — L7e | Mass of the propulsion battery: … kg
2.1.11. | L2e, L4e, L5e, L6e, L7e | Mass of the doors: … kg
2.1.12. | L2e-U, L5e-B, L6e-BU, L7e-CU | Mass of the machines or equipment installed on the load platform area: … kg
2.1.13. | L1e — L7e | Mass of the gaseous fuel system as well as storage tanks for gaseous fuel: … kg
2.1.14. | L1e — L7e | Mass of the storage tanks to store compressed air: … kg
2.2. | | Range of vehicle dimensions (overall)
2.2.1. | L1e — L7e | Length: … mm
2.2.2. | L1e — L7e | Width: … mm
2.2.3. | L1e — L7e | Height: … mm
2.2.4. | L1e — L7e | Wheelbase: … mm
2.2.4.1. | L4e | Wheelbase sidecar(28): … mm
2.2.5. | | Track width
2.2.5.1. | L1e — L7e if equipped with twinned wheels L2e, L4e, L5e, L6e, L7e | Track width front: … mm.
2.2.5.2. | L1e — L7e if equipped with twinned wheels | Track width rear: … mm.
2.2.5.3. | L2e, L4e, L5e, L6e, L7e | Track width sidecar: … mm.
2.2.6. | L7e-B | Front overhang: … mm.
2.2.7. | L7e-B | Rear overhang: … mm.
2.2.8. | | Load platform dimensions
2.2.8.1. | L2e-U, L5e-B, L6e-BU, L7e-B2, L7e-CU | Length of the load platform: … mm.
2.2.8.2. | L2e-U, L5e-B, L6e-BU, L7e-B2, L7e-CU | Width of load platform: … mm.
2.2.8.3. | L2e-U, L5e-B, L6e-BU, L7e-B2, L7e-CU | Height of load platform: … mm.
2.2.9. | | Centre of gravity
2.2.9.1. | L2e-U, L5e-B, L6e-BU, L7e-B2, L7e-CU | Location of the centre of gravity forward of the rear axle Lcg: … mm.
2.2.9.2. | L2e-U, L5e-B, L6e-BU, L7e-B2, L7e-CU | Location of the centre of gravity above the ground plane Hcg: … mm.
2.2.9.3. | L2e-U, L5e-B, L6e-BU, L7e-B2, L7e-CU | Location centre of gravity of loaded platform forward of the rear axle LcgLP: … mm.
2.2.10. | | Miscellaneous dimensions
2.2.10.1. | L7e-B2 | Approach angle(11): … degrees.
2.2.10.2. | L7e-B2 | Departure angle(11): … degrees.
2.2.10.3. | L7e-B2 | Ramp angle(11): … degrees.
2.2.10.4. | L7e-B2 | Ground clearance under the front axle(11): … mm.
2.2.10.5. | L7e-B2 | Ground clearance under the rear axle(11): … mm.
2.2.10.6. | L3e-AxE (x=1, 2 or 3), L3e-AxT (x=1, 2 or 3) L7e-B | Ground clearance between the axles(11): … mm.
2.2.10.7. | L7e-B | Wheelbase to ground clearance ratio … [no unit]
2.2.10.8. | L7e-B2 | Static stability coefficient — Kst: … [no unit]
2.2.10.9. | L3e-AxE, L3e-AxT | Seat height: … mm
2.2.10.10. | L3e-AxE, L3e-AxT | Ground clearance: … mm
3. | | GENERAL POWERTRAIN CHARACTERISTICS
3.1 | | Manufacturer of the propulsion unit
3.1.1. | | Combustion engine
3.1.1.1. | L1e — L7e | Manufacturer: …
3.1.1.2. | L1e — L7e | Engine code (as marked on the engine or other means of identification): …
3.1.1.3. | L1e — L7e | Fuel identification marking (if available): …
3.1.2. | | Electric motor
3.1.2.1. | L1e — L7e | Manufacturer: …
3.1.2.2. | L1e — L7e | Electric motor code (as marked on the engine or other means of identification): …
3.1.3. | | Hybrid application
3.1.3.1. | L1e — L7e | Manufacturer: …
3.1.3.2. | L1e — L7e | Application code (as marked on the engine or other means of identification): …
3.1.3.3. | L1e — L7e | Fuel identification marking (if available): …
3.1.3.4. | L1e — L7e | Photographs and/or drawings of the location of the code(s) and/or type-approval numbers (completed example with dimensions)(20): …
3.2. | | Combustion engine
3.2.1. | | Specific engine information
3.2.1.1. | L1e — L7e | Number of combustion engines: …
3.2.1.2. | L1e — L7e | Working principle: internal combustion engine (ICE)/positive ignition/compression ignition /external combustion engine (ECE)/turbine/compressed air(4): …
3.2.1.3. | L1e — L7e | Cycle: four-stroke/two-stroke/rotary/other(4): …
3.2.1.4. | L1e — L7e | Cylinders
3.2.1.4.1. | L1e — L7e | Number: …
3.2.1.4.2. | L1e — L7e | Arrangement(26): …
3.2.1.4.3. | L1e — L7e | Bore(12): … mm
3.2.1.4.4. | L1e — L7e | Stroke(12): … mm
3.2.1.4.5. | L1e — L7e | Number and configuration of stators in the case of rotary-piston engine: …
3.2.1.4.6. | L1e — L7e | Volume of combustion chambers in the case of rotary-piston engine: … cm3
3.2.1.4.7. | L1e — L7e | Firing order: …
3.2.1.5. | L1e — L7e | Engine capacity(6): … cm3
3.2.1.6. | L1e — L7e | Volumetric compression ratio(7): …
3.2.1.7. | L1e — L7e | Number of inlet and exhaust valves
* 3.2.1.7.1. | L1e — L7e | Number and minimum cross-sectional areas of inlet and outlet ports: …
* 3.2.1.7.2. | L1e — L7e | Valve timing or equivalent data: …
* 3.2.1.7.3. | L1e — L7e | Maximum lift of valves, angles of opening and closing, or timing details of alternative distribution systems, in relation to dead centres. For variable timing system, minimum and maximum timing: …
* 3.2.1.7.4. | L1e — L7e | Reference and/or setting ranges(4): …
3.2.1.8. | L1e — L7e | Drawings of combustion chamber, cylinder head, piston, piston rings: …
3.2.1.9. | L1e — L7e | Normal warm engine idling speed: … min-1
3.2.1.10. | L1e — L7e | Stop-start system: yes/no(4)
* 3.2.2. | | Powertrain/propulsion/drive-train management system
3.2.2.1. | L1e — L7e | PCUs/ECUs(4) software identification number(s): … and calibration verification number(s): …
3.2.3. | | Fuel
3.2.3.1. | L1e — L7e | Fuel type: (9)
3.2.3.2. | L1e — L7e | Vehicle fuel configuration: mono-fuel/bi- fuel/flex fuel(4)
3.2.3.2.1. | L1e — L7e | Maximum amount of bio-fuel acceptable in fuel: … % by volume
3.2.4. | | Fuel pressure delivery and control
3.2.4.1. | L1e — L7e | Brief description and schematic drawing of low-and/or high-pressure fuelling wet system(s)(4): …
3.2.4.2. | L1e — L7e | Low- and/or high-pressure fuel pump(s): yes/no(4)
3.2.4.2.1. | L1e — L7e | Fuel pump control: mechanical/on/off electric/continuous operation/electronically controlled variable operation(4): …
3.2.4.2.2. | L1e — L7e | For CI combustion engines and dual fuel engines only maximum fuel delivery (4)(7): … g/s or mm3/stroke or cycle at an engine speed of:…min-1 or, alternatively, a characteristic diagram: … (When boost control is supplied, state the characteristic fuel delivery and boost pressure versus engine speed)
3.2.4.3. | L1e — L7e | Common rail: yes/no(4)
3.2.4.4. | L1e — L7e | Fuel distributor/rail/hoses(4): yes/no(4)
3.2.4.5. | L1e — L7e | Fuel pressure and/or fuel flow regulator(s): yes/no(4)
3.2.5. | | Fuel mass metering and control
3.2.5.1. | L1e — L7e | By carburettor(s): yes/no(4)
* 3.2.5.1.1. | L1e — L7e | Operating principle and construction: …
* 3.2.5.1.2. | L1e — L7e | Maximum fuel-flow rate: … g/s at maximum power and torque: …
3.2.5.1.3. | L1e — L7e | Carburettor(s) settings(7): …
* 3.2.5.1.4. | L1e — L7e | Carburettor diffusers: …
* 3.2.5.1.5. | L1e — L7e | Carburettor fuel-level in float chamber: …
* 3.2.5.1.5.1. | L1e — L7e | Carburettor mass of float: …
3.2.5.1.6. | L1e — L7e | Carburettor cold-starting system: manual/automatic(4): yes/no(4)
3.2.5.1.6.1. | L1e — L7e | Carburettor cold-starting system operating principle(s): …
3.2.5.1.7. | L1e — L7e | Mixture scavenging port: yes/no(4)
3.2.5.1.7.1. | L1e — L7e | Mixture scavenging port dimensions: …
3.2.5.2. | L1e — L7e | By mechanically/hydraulically controlled fuel injection(4): yes/no(4)
3.2.5.2.1. | L1e — L7e | Operation principle: …
3.2.5.2.2. | L1e — L7e | Mechanical/electronic(4) adjustment of maximum fuel mass delivery: yes/no(4)
3.2.5.3. | L1e — L7e | By electronically controlled fuel injection system: yes/no(4)
3.2.5.3.1. | L1e — L7e | Operation principle: port injection/direct injection/pre-chamber/swirl chamber(4): …
3.2.5.3.2. | L1e — L7e | Fuel injector(s): single-/multi-point/direct injection/other (specify) (4): …
3.2.5.3.3. | L1e — L7e | Total and per cylinder amount of fuel injectors: …
3.2.5.4. | L1e — L7e | Air-assisted fuel injector: yes/no(4): …
3.2.5.4.1. | L1e — L7e | Description and operating pressure of air-assist: …
3.2.5.5. | L1e — L7e | Cold start system: yes/no(4)
3.2.5.5.1. | L1e — L7e | Description of cold start system: …
3.2.5.6. | L1e — L7e | Auxiliary starting aid: yes/no(4)
3.2.5.7. | L1e — L7e | CI injection specific: yes/no
3.2.5.7.1. | L1e — L7e | Static injection timing(7): …
3.2.5.7.2. | L1e — L7e | Injection advance curve(7): …
3.2.6. | | Gaseous fuelling system and control
3.2.6.1. | L1e — L7e | Brief description and schematic drawing of gaseous fuelling system(s): …
3.2.6.2. | L1e — L7e | Liquefied petroleum gas (LPG) fuelling system: yes/no(4)
3.2.6.2.1. | L1e — L7e | Type-approval number according to UNECE Regulation No 67 : …
3.2.6.2.2. | L1e — L7e | Electronic engine management control unit for LPG fuelling: yes/no(4)
3.2.6.2.2.1. | L1e — L7e | Emission-related adjustment possibilities: …
3.2.6.2.3. | L1e — L7e | Further documentation: …
* 3.2.6.2.3.1 | L1e — L7e | Description of the safeguarding of the catalyst at switch-over from petrol to LPG or back: …
3.2.6.2.3.2 | L1e — L7e | System layout (electrical connections, vacuum connections, compensation hoses, etc.): …
3.2.6.2.4. | L1e — L7e | Drawing of the symbol: …
3.2.6.3. | L1e — L7e | Natural gas (NG) fuelling system: yes/no(4)
3.2.6.3.1. | L1e — L7e | Type-approval number according to UNECE Regulation No 110 : …
3.2.6.3.2. | L1e — L7e | Electronic engine management-control unit for NG fuelling: yes/no(4)
3.2.6.3.2.1. | L1e — L7e | Emission-related adjustment possibilities: …
3.2.6.3.3. | L1e — L7e | Further documentation: …
* 3.2.6.3.3.1. | L1e — L7e | Description of the safeguarding of the catalyst at switch-over from petrol to NG or back: …
3.2.6.3.3.2. | L1e — L7e | System layout (electrical connections, vacuum connections compensation hoses, etc.): …
3.2.6.3.4. | L1e — L7e | Drawing of the symbol: …
3.2.6.4. | L1e — L7e | Gaseous fuel: LPG/NG-H/NG-L/NG-HL(4): yes/no(4)
3.2.6.4.1. | L1e — L7e | Pressure regulator(s) or vaporiser/pressure regulator(s)(4)
* 3.2.6.4.1.1. | L1e — L7e | Number of pressure reduction stages: …
3.2.6.4.1.2. | L1e — L7e | Pressure in final stage, minimum: … kPa — maximum: … kPa
3.2.6.4.1.3. | L1e — L7e | Number of main adjustment points: …
3.2.6.4.1.4. | L1e — L7e | Number of idle adjustment points: …
3.2.6.4.1.5. | L1e — L7e | Type-approval number: …
3.2.6.4.2. | L1e — L7e | Fuelling system: mixing unit/gas injection/liquid injection/direct injection(4)
* 3.2.6.4.2.1. | L1e — L7e | Mixture strength regulation: …
3.2.6.4.2.2. | L1e — L7e | System description and/or diagram and drawings: …
3.2.6.4.2.3. | L1e — L7e | Type-approval number: …
3.2.6.4.3. | L1e — L7e | Mixing unit: yes/no(4)
3.2.6.4.3.1. | L1e — L7e | Number: …
3.2.6.4.3.2. | L1e — L7e | Location: …
3.2.6.4.3.3. | L1e — L7e | Adjustment possibilities: …
3.2.6.4.3.4. | L1e — L7e | Type-approval number: …
3.2.6.4.4. | L1e — L7e | Inlet manifold injection: yes/no(4)
3.2.6.4.4.1. | L1e — L7e | Injection: single-point/multi-point(4)
3.2.6.4.4.2. | L1e — L7e | Injection: continuous/simultaneously timed/sequentially timed(4)
3.2.6.4.5. | L1e — L7e | Injection equipment: yes/no(4)
3.2.6.4.5.1. | L1e — L7e | Adjustment possibilities: …
3.2.6.4.5.2. | L1e — L7e | Type-approval number: …
3.2.6.4.6. | L1e — L7e | Supply pump: yes/no(4)
3.2.6.4.6.1. | L1e — L7e | Type-approval number: …
3.2.6.4.7. | L1e — L7e | Injector(s): …
3.2.6.4.7.1. | L1e — L7e | Type-approval number: …
3.2.6.4.8. | L1e — L7e | Direct/port injection: yes/no(4)
3.2.6.4.9. | L1e — L7e | Injection pump/pressure regulator: yes/no (4)
3.2.6.4.9.1. | L1e — L7e | Type-approval number: …
3.2.6.4.10. | L1e — L7e | Separate electronic control unit (ECU) for gaseous fuelling system: yes/no(4)
3.2.6.4.10.1. | L1e — L7e | Adjustment possibilities: …
3.2.6.4.10.2. | L1e — L7e | Software identification number(s): …
3.2.6.4.10.3. | L1e — L7e | Calibration verification number(s): …
3.2.6.5. | L1e — L7e | NG fuel-specific equipment: …
3.2.6.5.1. | L1e — L7e | Variant 1 (only in the case of approvals of engines for several specific fuel compositions): …
3.2.6.5.2. | L1e — L7e | Fuel composition:
| | Overview methane (CH4): | basis: …%mole | min. …%mole | max. …%mole ethane (C2H6): | basis: …%mole | min. …%mole | max. …%mole propane (C3H8): | basis: …%mole | min. …%mole | max. …%mole butane (C4H 10): | basis: …%mole | min. …%mole | max. …%mole C5/C5+: | basis: …%mole | min. …%mole | max. …%mole oxygen (O2): | basis: …%mole | min. …%mole | max. …%mole inert (N2, He, etc.): | basis: …%mole | min. …%mole | max. …%mole
3.2.6.5.3. | L1e — L7e | Gaseous fuel injector(s): …
3.2.6.5.4. | L1e — L7e | Variant 2 (only in the case of approvals for several specific fuel compositions): …
3.2.6.6. | L1e — L7e | Hydrogen fuel-specific equipment: yes/no(4)
3.2.6.6.1. | L1e — L7e | EC type-approval number according to Regulation (EC) No 79/2009 of the European Parliament and of the Council : …
* 3.2.6.6.2. | L1e — L7e | Further documentation
3.2.6.6.3. | L1e — L7e | System layout (electrical connections, vacuum connections, compensation hoses, etc.): …
* 3.2.6.6.4. | L1e — L7e | Description of the safeguarding of the catalyst at switch-over from petrol to hydrogen/H2NG(4) or back: …
3.2.6.6.5. | L1e — L7e | Drawing of the symbol: …
3.2.6.7. | L1e — L7e | H2NG fuelling system: yes/no(4)
3.2.6.7.1. | L1e — L7e | Percentage of hydrogen in the fuel (the maximum specified by the manufacturer): …
3.2.7. | | Air-induction system
3.2.7.1. | L1e — L7e | Brief description and schematic drawing of gaseous intake air-flow and induction system: …
3.2.7.2. | L1e — L7e | Intake manifold description and working principle (e.g. fixed length/variable length/swirl valves)(4) (include detailed drawings and/or photos): …
* 3.2.7.2.1. | L1e — L7e | Description and drawings of inlet pipes and their accessories (plenum chamber, heating device with control strategy, additional air intakes, etc.): …
3.2.7.3. | L1e — L7e | Intake air pressure charger: yes/no(4)
3.2.7.3.1. | L1e — L7e | Brief description and schematic drawing of the intake air-pressure charger system: …
3.2.7.3.2. | L1e — L7e | Working and control principles: …
3.2.7.3.3. | L1e — L7e | Type(s) (turbo or supercharger, other)(4): …
3.2.7.3.4. | L1e — L7e | Maximum intake air-charge pressure and flow-rate at maximum torque and power: … kPa and g/s or charge pressure and flow-rate map: … kPa and g/s
3.2.7.4. | L1e — L7e | Waste gate: yes/no(4)
3.2.7.5. | L1e — L7e | Intercooler: yes/no(4)
3.2.7.5.1. | L1e — L7e | Type: air-air/air-water/other(4)
* 3.2.7.5.2. | L1e — L7e | Intake depression at rated engine speed and at 100 % load (compression ignition engines only): … kPa
3.2.7.6. | L1e — L7e | Air filter, (drawings, photographs): …
3.2.7.7. | L1e — L7e | Intake air-silencer description (drawings, photographs): …
* 3.2.7.7.1. | L1e — L7e | Working principle: …
3.2.8. | | Air-mass metering and control
3.2.8.1. | L1e — L7e | Brief description and schematic drawing of air-mass metering and control system: …
3.2.8.2. | L1e — L7e | Mechanical throttle body: yes/no(4)
3.2.8.3. | L1e — L7e | Electronic throttle control (ETC): yes/no(4)
3.2.8.3.1. | L1e — L7e | Schematic drawing of electronic throttle control: …
* 3.2.8.3.1.2. | L1e — L7e | Description of ETC hardware redundancies regarding sensors/actuators/electric power/ground/control electronics: …
3.2.9. | | Spark delivery system and control
3.2.9.1. | L1e — L7e | Brief description and schematic drawing of spark delivery and control system: …
3.2.9.1.1. | L1e — L7e | Working principle: …
| L1e — L7e | Ignition advance curve or map(7) at wide open throttle: …
3.2.9.1.3. | L1e — L7e | Static ignition timing (7): … degrees before TDC at maximum torque and power
3.2.9.2. | L1e — L7e | Ion sense capability: yes/no(4)
3.2.9.3. | L1e — L7e | Spark plugs:
3.2.9.3.1. | L1e — L7e | Gap setting: … mm
3.2.9.4. | L1e — L7e | Ignition coil(s):
* 3.2.9.4.1. | L1e — L7e | Working principle: …
* 3.2.9.4.2. | L1e — L7e | Dwell angle and timing at wide open throttle: …
3.2.10. | | Powertrain cooling system and control
3.2.10.1. | L1e — L7e | Brief description and schematic drawing of powertrain cooling and control system: …
3.2.10.2. | L1e — L7e | Cooling system: liquid: yes/no(4)
3.2.10.2.1. | L1e — L7e | Maximum temperature at outlet: … K
3.2.10.2.2. | L1e — L7e | Nominal setting of the engine temperature control mechanism: …
3.2.10.2.3. | L1e — L7e | Nature of liquid: …
3.2.10.2.4. | L1e — L7e | Circulating pump(s): yes/no(4)
3.2.10.2.4.1. | L1e — L7e | Characteristics: …
3.2.10.2.5. | L1e — L7e | Drive ratio(s): …
3.2.10.2.6. | L1e — L7e | Description of the fan and its drive mechanism: …
3.2.10.3. | L1e — L7e | Air cooling: yes/no(4)
3.2.10.3.1. | L1e — L7e | Reference point: …
3.2.10.3.2. | L1e — L7e | Maximum temperature at reference point: … K
3.2.10.3.3. | L1e — L7e) | Fan: yes/no(4)
3.2.10.3.3.1. | L1e — L7e | Characteristics: …
3.2.10.3.3.2. | L1e — L7e | Drive ratio(s): …
3.2.11. | | Powertrain lubrication system and control
3.2.11.1. | L1e — L7e | Brief description and schematic drawing of powertrain lubrication and control system: …
3.2.11.2. | L1e — L7e | Lubrication system configuration(s) (wet sump, dry sump, other, pump/injection into induction system/mixed with the fuel, etc.)(4): …
3.2.11.3. | L1e — L7e | Location of oil reservoir (if any): …
3.2.11.4. | L1e — L7e | Feed system (pump/injection into induction system/mixed with the fuel, etc.)(4): …
3.2.11.5. | L1e — L7e | Lubricating pump: yes/no(4) …
3.2.11.6. | L1e — L7e | Oil cooler: yes/no(4)
3.2.11.6.1. | L1e — L7e | Drawing …
3.2.11.7. | L1e — L7e | Lubricant(s) characteristics: …
3.2.11.8. | L1e — L7e | Lubricant mixed with the fuel: yes/no(4): …
3.2.11.8.1. | L1e — L7e | Percentage range of lubricant mixed with the fuel: …
3.2.12. | | Exhaust system and control
3.2.12.1. | L1e — L7e | Brief description and schematic drawing of exhaust devices for noise and tailpipe emission control: …
3.2.12.2. | L1e — L7e | Description and drawing of the exhaust manifold: …
3.2.12.3. | L1e — L7e | Description and detailed drawing of the exhaust device: …
3.2.12.4. | L1e — L7e | Maximum permissible exhaust back-pressure at rated engine speed and at 100 % load: … kPa(29)
3.2.12.5. | L1e — L7e | Type, marking of exhaust noise-abatement device(s): …
* 3.2.12.6. | L1e — L7e | Noise-reducing measures in the engine compartment and on the engine where relevant for external noise: …
3.2.12.7. | L1e — L7e | Location of the exhaust outlet: …
3.2.12.8. | L1e — L7e | Exhaust noise-abatement device containing fibrous materials: yes/no(4): …
3.2.13. | | Other electrical systems and control than those intended for the electrical propulsion
3.2.13.1. | L1e — L7e | Rated voltage: … V, positive/negative ground(4)
3.2.13.2. | L1e — L7e | Generator: yes/no(4):
3.2.13.2.1. | L1e — L7e | Nominal output: … VA
3.2.13.3. | L1e — L7e | Battery(ies): yes/no(4)
3.2.13.3.1. | L1e — L7e | Capacity and other characteristics (mass,…): …
3.2.13.4. | L1e — L7e | Electric heating systems for the passenger compartment: yes/no(4)
3.3. | | Pure electric and hybrid electric propulsion and control
3.3.1. | L1e — L7e | Electric vehicle configuration: pure electric/hybrid electric/manpower — electric(4):
3.3.2. | L1e — L7e | Brief description and schematic drawing of pure and hybrid electric propulsions and its control system(s): …
3.3.3. | | Electric propulsion motor
3.3.3.1. | L1e — L7e | Number of electric motors for propulsion: …
3.3.3.2. | L1e — L7e | Type (winding, excitation): …
3.3.3.3. | L1e — L7e | Operating voltage: … V
3.3.3.4. | L1e — L7e | 15/30 (4) minutes power (27) : … kW
3.3.4. | | Propulsion batteries
3.3.4.1. | L1e — L7e | Primary propulsion battery
3.3.4.1.1. | L1e — L7e | Number of cells: …
3.3.4.1.2. | L1e — L7e | Mass: … kg
3.3.4.1.3. | L1e — L7e | Capacity: … Ah (Amp-hours) / … V
3.3.4.1.4. | L1e — L7e | Voltage: … V
3.3.4.1.5. | L1e — L7e | Position in the vehicle: …
3.3.4.2. | L1e — L7e | Secondary propulsion battery
3.3.4.2.1. | L1e — L7e | Number of cells: …
3.3.4.2.2. | L1e — L7e | Mass: … kg
3.3.4.2.3. | L1e — L7e | Capacity: … Ah (Amp-hours) / … V
3.3.4.2.4. | L1e — L7e | Voltage: … V
3.3.4.2.5. | L1e — L7e | Position in the vehicle: …
3.3.5. | | Hybrid electric vehicle
3.3.5.1. | L1e — L7e | Engine or motor combination (number of electric motor(s) and/or combustion engine(s)/other)(4): …
3.3.5.2. | L1e — L7e | Category of hybrid electric vehicle: off-vehicle charging/not off-vehicle charging:
3.3.5.3. | L1e — L7e | Operating mode switch: with/without(4)
3.3.5.4. | L1e — L7e | Selectable modes: yes/no(4)
3.3.5.5. | L1e — L7e | Pure fuel consuming: yes/no(4)
3.3.5.6. | L1e — L7e | Vehicle propelled with fuel cell: yes/no(4)
3.3.5.7. | L1e — L7e | Hybrid operation modes: yes/no(4) (if yes, short description): …
3.3.6. | | Energy storage device
3.3.6.1. | L1e — L7e | Description: (battery, capacitor, flywheel/generator)(4)
3.3.6.2. | L1e — L7e | Identification number: …
* 3.3.6.3. | L1e — L7e | Kind of electrochemical couple: …
3.3.6.4. | L1e — L7e | Energy (for battery: voltage and capacity Ah in 2h, for capacitor: J,…, for flywheel/generator: J,…,): …
3.3.6.5. | L1e — L7e | Charger: on-board/external/without(4)
3.3.7. | | Electric motor (describe each type of electric motor separately) …
3.3.7.1. | L1e — L7e | Primary use: propulsion motor/generator(4)
3.3.7.2. | L1e — L7e | When used as propulsion motor: single-/multi-motors (number)(4): …
3.3.7.3. | L1e — L7e | Working principle: …
3.3.7.4. | L1e — L7e | Direct current/alternating current/number of phases: …
3.3.7.5. | L1e — L7e | Separate excitation/series/compound(4):
3.3.7.6. | L1e — L7e | Synchronous/asynchronous(4):
3.3.8. | | Electric motor control unit
3.3.8.1. | L1e — L7e | Identification number: …
3.3.9. | | Power controller
3.3.9.1. | L1e — L7e | Identification number: …
3.4. | | Other engines, electric motors or combinations (specific information concerning the parts of these motors)
3.4.1. | | Cooling system (temperatures permitted by the manufacturer)
3.4.1.1. | L1e — L7e | Liquid cooling: …
3.4.1.1.1. | L1e — L7e | Maximum temperature at outlet: … K
3.4.1.2. | L1e — L7e | Air cooling: …
3.4.1.2.1. | L1e — L7e | Reference point: …
3.4.1.2.2. | L1e — L7e | Maximum temperature at reference point: … K
3.4.2. | | Lubrication system
3.4.2.1. | L1e — L7e | Description of lubrication system: …
3.4.2.2. | L1e — L7e | Location of oil reservoir (if any): …
3.4.2.3. | L1e — L7e | Feed system (pump/injection into induction system/mixed with the fuel, etc.)(4): …
3.4.2.4. | L1e — L7e | Lubricant mixed with the fuel: …
3.4.2.4.1. | L1e — L7e | Percentage: …
3.4.2.5. | L1e — L7e | Oil cooler: yes/no(4): …
* 3.4.2.5.1. | L1e — L7e | Drawing(s): …
3.5. | | Drive-train and control (13)
3.5.1. | L1e — L7e | Brief description and schematic drawing of the vehicle drive-train and its control system (gear shift control, clutch control or any other element of drive-train): …
3.5.2. | | Clutch
3.5.2.1. | L1e — L7e | Brief description and schematic drawing of the clutch and its control system: …
3.5.3. | | Transmission
3.5.3.1. | L1e — L7e | Brief description and schematic drawing of gear shift system(s) and its control: …
3.5.3.2. | L1e — L7e | Drawing of the transmission: …
3.5.3.3. | L1e — L7e | Type (mechanical, hydraulic, electric, manual/manual automated/automatic/CVT/ other (indicate).)(4): …
3.5.3.4. | L1e — L7e | A brief description of the electrical/electronic components (if any): …
3.5.3.5. | L1e — L7e | Location relative to the engine: …
3.5.3.6. | L1e — L7e | Method of control: …
3.5.4. | L1e — L7e | Gear ratios
| | Overview gear ratios Gear (24) | Internal transmission ratios (ratios of engine to transmission output shaft revolutions) | Final drive ratio(s) (ratio of transmission output shaft to driven wheel revolutions) | Total gear ratios | Ratio (engine speed/vehicle speed) for manual transmission only 1 2 3 … | | | | Reverse | | | |
3.5.4.1. | L3e-AxE, L3e-AxT | Final drive ratio: …
3.5.4.2. | L3e-AxE, L3e-AxT | Overall gear ratio in highest gear: …
3.6. | | Safe-cornering device
3.6.1. | L1e — L7e equipped with twinned wheels, L2e, L5e, L6e, L7e | Safe-cornering device (Annex VIII to Regulation (EU) No 168/2013: yes/no(4); differential/other(4)
3.6.2. | L1e — L7e equipped with twinned wheels, L2e, L5e, L6e, L7e | Differential lock: yes/no/optional(4)
3.6.3. | L1e — L7e | Brief description and schematic drawing of the safe-cornering device, the differential lock and their control systems: …
3.7. | | Suspension and control
3.7.1. | L1e — L7e | Brief description and schematic drawing of suspension and its control system: …
3.7.2. | L1e — L7e | Drawing of the suspension arrangements: …
3.7.3. | L1e — L7e | Level adjustment: yes/no/optional(4)
3.7.4. | L1e — L7e | Brief description of the electrical/electronic components: …
3.7.5. | L1e — L7e | Stabilisers: yes/no/optional(4)
3.7.6. | L1e — L7e | Shock absorbers: yes/no/optional(4)
3.8. | | Passenger-compartment heating system and air-conditioning
3.8.1. | | Passenger-compartment heating system
3.8.1.1. | L2e, L5e-B, L6e-B, L7e | An overall drawing of the heating system giving its location on the vehicle (and the arrangement of the sound damping devices (including the position of the heat exchange points)): …
3.8.1.2. | L2e, L5e-B, L6e-B, L7e | An overall drawing of the heat-exchanger used in systems utilising the heat from the exhaust gases, or of the parts where that exchange takes place (in the case of heating systems using the heat provided by the engine cooling air): …
3.8.1.3. | L2e, L5e-B, L6e-B, L7e | A sectional drawing of the heat-exchanger or parts where heat exchange takes place, together with a statement of the wall thickness, of the materials used and the characteristics of their surface: …
3.8.1.4. | L2e, L5e-B, L6e-B, L7e | Specifications regarding the method of manufacture and technical data relating to other major components of the heating system, such as the fan: …
3.8.2. | | Air-conditioning
3.8.2.1. | L2e, L5e-B, L6e-B, L7e | Brief description and schematic drawing of air-conditioning and its control system: …
3.8.2.2. | L2e, L5e-B, L6e-B, L7e | Gas used as refrigerant in the air-conditioning system: …
3.8.2.3. | L2e, L5e-B, L6e-B, L7e | The air-conditioning system is designed to contain fluorinated greenhouse gases with global warming potential higher than 150: yes/no(4). If Yes, fill in the following sections:
3.8.2.3.1. | L2e, L5e-B, L6e-B, L7e | Drawing and brief description of the air-conditioning system, including the reference or part number and material of the leak components: …
3.8.2.3.2. | L2e, L5e-B, L6e-B, L7e | Leakage of the air-conditioning system
3.8.2.3.3. | L2e, L5e-B, L6e-B, L7e | Reference or part number and material of the components of the system and test information (e.g. test report number, Type-approval number, etc.): …
3.8.2.3.4. | L2e, L5e-B, L6e-B, L7e | Overall leakage/year of the entire system: … g/year
3.9. | | Cycles designed to pedal
3.9.1. | L1e | Ratio manpower/electric power: …
3.9.2. | L1e | Maximum assistance factor: …
3.9.3. | L1e | Maximum vehicle speed for which the electric motor gives assistance: … km/h
3.9.4. | L1e | Switch-off distance: … km
4. | | GENERAL INFORMATION ON ENVIRONMENTAL AND PROPULSION PERFORMANCE
4.0 | | General information on environmental and propulsion performance
4.0.1. | L1e — L7e | Environmental step: Euro (3/4/5/5+) (4)
4.0.2. | L1e — L7e | Fuel consumption (provide details for each reference fuel tested) … l/kg (4) /100 km
4.0.3. | L1e — L7e | CO 2 emissions (25) : … g/km
4.0.4. | L1e — L7e | Energy consumption (25) : … Wh/km
4.0.5. | L1e — L7e | Electric range (25) : … km
4.1. | | Tailpipe emission-control system
4.1.1. | L1e — L7e | Brief description and schematic drawing of the tailpipe emission-control system and its control: …
4.1.2. | | Catalytic converter
4.1.2.1. | L1e — L7e | Configuration, number of catalytic converters and elements (information to be provided for each separate unit): …
4.1.2.2. | L1e — L7e | Drawing with dimensions, shape and volume of the catalytic converter(s): …
4.1.2.3. | L1e — L7e | Catalytic reaction: …
* 4.1.2.4. | L1e — L7e | Total charge of precious metals: …
* 4.1.2.5. | L1e — L7e | Relative concentration: …
* 4.1.2.6. | L1e — L7e | Substrate (structure and material): …
* 4.1.2.7. | L1e — L7e | Cell density: …
* 4.1.2.8. | L1e — L7e | Casing for the catalytic converter(s): …
4.1.2.9. | L1e — L7e | Location of the catalytic converter(s) (place and reference distance in the exhaust line): …
4.1.2.10. | L1e — L7e | Catalyst heat-shield: yes/no(4)
4.1.2.11. | L1e — L7e | Brief description and schematic drawing of the regeneration system/method of exhaust after-treatment systems and its control system: …
* 4.1.2.11.1. | L1e — L7e | Normal operating temperature range: … K
4.1.2.11.2. | L1e — L7e | Consumable reagents: yes/no(4)
4.1.2.11.3. | L1e — L7e | Brief description and schematic drawing of the reagent flow (wet) system and its control system: …
4.1.2.11.4. | L1e — L7e | Type and concentration of reagent needed for catalytic action: …
* 4.1.2.11.5. | L1e — L7e | Normal operational temperature range of reagent: … K
4.1.2.11.6. | L1e — L7e | Frequency of reagent refill: continuous/maintenance(4)
4.1.2.12. | L1e — L7e | Identifying part number: …
4.1.3. | | Oxygen sensor(s)
4.1.3.1. | L1e — L7e | Oxygen sensor component(s) drawing(s): …
4.1.3.2. | L1e — L7e | Drawing of exhaust device with oxygen sensor location(s) (dimensions relative to exhaust valves): …
4.1.3.3. | L1e — L7e | Control range(s): …
4.1.3.4. | L1e — L7e | Identifying part number(s): …
4.1.3.5. | L1e — L7e | Description of oxygen sensor heating system and heating strategy: …
4.1.3.6. | L1e — L7e | Oxygen sensor heat shield(s): yes/no(4)
4.1.4. | | Secondary air-injection (air-inject in exhaust)
4.1.4.1. | L1e — L7e | Brief description and schematic drawing of the secondary air-injection system and its control system: …
4.1.4.2. | L1e — L7e | Configuration (mechanical, pulse air, air pump etc.)(4): …
4.1.4.3. | L1e — L7e | Working principle: …
4.1.5. | | External exhaust gas recirculation (EGR)
4.1.5.1. | L1e — L7e | Brief description and schematic drawing of the EGR system (exhaust flow) and its control system: …
4.1.5.2. | L1e — L7e | Characteristics: …
4.1.5.3. | L1e — L7e | Water-cooled EGR system: yes/no(4)
4.1.5.4. | L1e — L7e | Air-cooled EGR system: yes/no(4)
4.1.6. | | Particulate filter
4.1.6.1. | L1e — L7e | PT component drawing with dimensions, shape and capacity of the particulate filter: …
4.1.6.2. | L1e — L7e | Design of the particulate filter: …
4.1.6.3. | L1e — L7e | Brief description and schematic drawing of the particulate filter and its control system: …
4.1.6.4. | L1e — L7e | Location (reference distance in the exhaust line): …
4.1.6.5. | L1e — L7e | Method or system of regeneration, description and drawing: …
4.1.6.6. | L1e — L7e | Identifying part number: …
4.1.7. | | Lean NOx trap
4.1.7.1. | L1e — L7e | Operation principle of lean NOx trap: …
4.1.8. | | Additional tailpipe emission-control devices (if any not covered under another heading)
4.1.8.1. | L1e — L7e | Working principle: …
4.2. | | Crankcase emission control system
4.2.1. | L1e — L7e | Configuration of crank-case gas recycling system (breather system, positive crank-case ventilation system, other)(4) (description and drawings).
4.3. | | Evaporative emission control system
4.3.1. | L1e — L7e | Evaporative emissions control system: yes/no(4)
4.3.2. | L1e — L7e | Drawing of the evaporative control system
4.3.3. | L1e — L7e | Drawing of the canister (including dimensions and indicating vent and purge mechanism)
4.3.4. | L1e — L7e | Working capacity: … g
4.3.5. | L1e — L7e | Adsorption material: … (e.g. charcoal, carbon, synthetic, …)
4.3.6. | L1e — L7e | Housing material: … (e.g. plastic, steel, …)
4.3.7. | L1e — L7e | Schematic drawing of the fuel tank, indicating capacity and material: …
4.3.8. | L1e — L7e | Drawing of the heat-shield between tank and exhaust device: …
4.4. | | Additional information on environmental and propulsion unit performance
4.4.1. | L1e — L7e | Description and/or schematic drawings of additional pollution-control devices: …
4.4.2. | L1e — L7e | Location of the coefficient of absorption symbol (compression-ignition engines only): …
4.4.3. | L1e — L7e | Applicable information document set out in respectively UN Regulation No 9, 41 or 63 shall supplement this information document with regard to the sound level.
4.4.4. | L1e — L7e | Applicable information document set out in respectively UN Regulation No 92 shall supplement this information document with regards to the noise-abatement devices installed on the vehicle.
5. | | VEHICLE PROPULSION FAMILY
5.1. | L1e — L7e | To define the vehicle propulsion family, the manufacturer shall submit the information required for classification criteria set out in point 3 of Annex XI to Commission Delegated Regulation (EU) No 134/2014, if not already provided in the information document.
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.1. | | Audible warning devices
6.1.1. | L1e — L7e | Summary description of device(s) used and their purpose: …
6.1.2. | L1e — L7e | Drawing(s) showing the location of the audible warning device(s) in relation to the structure of the vehicle: …
6.1.3. | L1e — L7e | Details of the method of attachment, including the part of the vehicle structure to which the audible warning device(s) is (are) attached: …
6.1.4. | L1e — L7e | Electrical/pneumatic circuit diagram: …
6.1.4.1. | L1e — L7e | Voltage: AC/DC(4)
6.1.4.2. | L1e — L7e | Rated voltage or pressure: …
6.1.5. | L1e — L7e | Drawing of the mounting device: …
6.2. | | Braking, including anti-lock and combined braking systems
6.2.1. | L1e — L7e | Characteristics of the brakes, including details and drawings of the drums, discs, hoses, make and type of shoe/pad assemblies and/or linings, effective braking areas, radius of drums, shoes or discs, mass of drums, adjustment devices, relevant parts of the axle(s) and suspension, levers, pedals (4): …
6.2.2. | L1e — L7e | Operating diagram, description and/or drawing of the braking system, including details and drawings of the transmission and controls as well as a brief description of the electrical and/or electronic components used in the braking system(4):
6.2.2.1. | L1e — L7e | Front, rear and sidecar brakes, disc and/or drum(4):
6.2.2.2. | L1e — L7e | Parking braking system: …
6.2.2.3. | L1e — L7e | Any additional braking system: …
6.2.3. | L1e — L7e | Vehicle is equipped to tow a trailer with no brake/overrun brake/electric/pneumatic/hydraulic service brakes: yes/no(4): …
6.2.4. | L1e — L7e | Anti-lock/Combined braking system
6.2.4.1. | L1e — L7e | Anti-lock braking system: yes/no/optional(4)
6.2.4.2. | L1e — L7e | Combined braking system: yes/no/optional(4)
6.2.4.3. | L1e — L7e | Anti-lock and combined braking system: yes/no/optional(4)
6.2.4.4. | L1e — L7e | Schematic drawing(s): …
6.2.5. | L1e — L7e | Hydraulic reservoir(s) (volume and location): …
6.2.6. | L1e — L7e | Particular characteristics of the braking system(s)
6.2.6.1. | L1e — L7e | Brake shoes and/or pads(4): …
6.2.6.2. | L1e — L7e | Linings and/or pads (indicate make, type, grade of material or identification mark): …
6.2.6.3. | L1e — L7e | Brake levers and/or pedals(4): …
6.2.6.4. | L1e — L7e | Other devices (where applicable): drawing and description: …
6.3. | | Electrical safety
6.3.1. | L1e — L7e | Brief description of the power circuit components installation and drawings/photographs showing the location of the power circuit components installation: …
6.3.2. | L1e — L7e | Schematic diagram of all electrical functions included in power circuit: …
6.3.3. | L1e — L7e | Working voltage(s) (V): …
6.3.4. | L1e — L7e | Description of protection against electric-shocks: …
6.3.5. | L1e — L7e | Fuse and/or circuit breaker yes/no/optional(4)
6.3.5.1. | L1e — L7e | Diagram showing the functional range: …
6.3.6. | L1e — L7e | Configuration of power wiring harness: …
6.4. | | Front and rear protective structures
6.4.1. | | Front protective structure
6.4.1.1. | L1e — L7e | Detailed technical description (including photographs or drawings): …
6.4.1.2. | L1e — L7e | Materials used: …
6.4.2. | | Rear protective structure
6.4.2.1. | L1e — L7e | Detailed technical description (including photographs or drawings): …
6.4.2.2. | L1e — L7e | Materials used: …
6.5. | | Glazing, windscreen wipers and washers, and defrosting and demisting systems
6.5.1. | | Windscreen
6.5.1.1. | L2e, L5e, L6e, L7e | Materials used: …
6.5.1.2. | L2e, L5e, L6e, L7e | Method of mounting: …
6.5.1.3. | L2e, L5e, L6e, L7e | Angle of inclination: …
6.5.1.4. | L2e, L5e, L6e, L7e | Windscreen accessories and the position in which they are fitted, together with a brief description of any electrical/electronic components: …
6.5.1.5. | L2e, L5e, L6e, L7e | Drawing of the windscreen with dimensions: …
6.5.2. | | Other windows
6.5.2.1. | L2e, L5e, L6e, L7e | Materials used: …
6.5.2.2 | L2e, L5e, L6e, L7e | A brief description of the electrical/electronic components (if any) of the window lifting mechanism: …
6.5.3. | | Opening roof glazing
6.5.3.1. | L2e, L5e, L6e, L7e | Materials used: …
6.5.4. | | Other glass panes
6.5.4.1. | L2e, L5e, L6e, L7e | Materials used: …
6.6. | | Windscreen wiper(s)
6.6.1. | L2e, L5e, L6e, L7e | Detailed technical description (including photographs or drawings): …
6.7. | | Windscreen washer
6.7.1. | L2e, L5e, L6e, L7e | Detailed technical description (including photographs or drawings): …
6.7.2. | L2e, L5e, L6e, L7e | Capacity of the reservoir: … l
6.8. | | Defrosting and demisting
6.8.1. | L2e, L5e, L6e, L7e | Detailed technical description (including photographs or drawings): …
6.9. | | Driver-operated controls including identification of controls, tell-tales and indicators
6.9.1. | L1e — L7e | Arrangement and identification of controls, tell-tales and indicators: …
6.9.2. | L1e — L7e | Photographs and/or drawings of the arrangement of symbols and controls, tell-tales and indicators: …
6.9.3. | L1e — L7e | Controls, tell-tales and indicators for which, when fitted, identification is mandatory, including the identification symbols to be used for that purpose:
6.9.4. | L1e — L7e | Summary table: the vehicle is equipped with the following driver-operated controls, including indicators and tell-tales(4) Controls, tell-tales and indicators for which, when fitted, identification is mandatory, and symbols to be used for that purpose 1. x - yes - - no or not separately available o - optional. 1. d - directly on control, indicator or tell-tale c - in close vicinity. Symbol No | Device | Control / indicator available | Identified by symbol | Where | Tell-tale available | Identified by symbol | Where 1 | Master light | | | | | | 2 | Dipped-beam head lamps | | | | | | 3 | Main-beam head lamps | | | | | | 4 | Position (side) lamps | | | | | | 5 | Front fog lamps | | | | | | 6 | Rear fog lamp | | | | | | 7 | Headlamp levelling device | | | | | | 8 | Parking lamps | | | | | | 9 | Direction indicators | | | | | | 10 | Hazard warning | | | | | | 11 | Windscreen wiper | | | | | | 12 | Windscreen washer | | | | | | 13 | Windscreen wiper and washer | | | | | | 14 | Headlamp cleaning device | | | | | | 15 | Windscreen demisting and defrosting | | | | | | 16 | Rear window demisting and defrosting | | | | | | 17 | Ventilating fan | | | | | | 18 | Diesel pre-heat | | | | | | 19 | Choke | | | | | | 20 | Brake failure | | | | | | 21 | Fuel level | | | | | | 22 | Battery charging condition | | | | | | 23 | Engine coolant temperature | | | | | | 24 | Malfunction indicator light (MI) | | | | | |
6.9.5. | L1e — L7e | Controls, tell-tales and indicators for which, when fitted, identification is optional, and symbols which shall be used if they are to be identified 1. x - yes - - no or not separately available o - optional. 1. d - directly on control, indicator or tell-tale c - in close vicinity. Symbol No | Device | Control / indicator available | Identified by symbol | Where | Tell-tale available | Identified by symbol | Where 1 | Parking brake | | | | | | 2 | Rear window wiper | | | | | | 3 | Rear window washer | | | | | | 4 | Rear window wiper and washer | | | | | | 5 | Intermittent windscreen wiper | | | | | | 6 | Audible warning device (horn) | | | | | | 7 | Front hood (bonnet) | | | | | | 8 | Rear hood (boot) | | | | | | 9 | Seat belt | | | | | | 10 | Engine oil pressure | | | | | | 11 | Unleaded petrol | | | | | | 12 | … | | | | | | 13 | … | | | | | |
6.10. | | Speedometer and odometer
6.10.1. | | Speedometer
6.10.1.1. | L1e — L7e | Photographs and/or drawings of the complete system: …
6.10.1.2. | L1e — L7e | Vehicle speed range displayed: …
6.10.1.3. | L1e — L7e | Tolerance of the measuring mechanism of the speedometer: …
6.10.1.4. | L1e — L7e | Technical constant of the speedometer: …
6.10.1.5. | L1e — L7e | Method of operation and description of the drive mechanism: …
6.10.1.6. | L1e — L7e | Overall transmission ratio of the drive mechanism: …
6.10.2. | | Odometer
6.10.2.1. | L1e — L7e | Tolerance of the measuring mechanism of the odometer: …
6.10.2.2. | L1e — L7e | Method of operation and description of the drive mechanism: …
6.11. | | Installation of lighting, light-signalling devices, including automatic switching of lighting
6.11.1. | L1e — L7e | List of all devices (mentioning the number, make(s),type, component type-approval mark(s), the maximum intensity of the main-beam headlamps, colour, the corresponding tell-tale): …
6.11.2. | L1e — L7e | Diagram showing the location of the lighting and light-signalling devices: …
6.11.3. | L1e — L7e | Hazard warning lamps: …
6.11.4. | L1e — L7e | Brief description of the electrical and/or electronic components used in the lighting system and in the light-signalling system: …
6.11.5. | L1e — L7e | For every lamp and reflector, supply the following information (in writing and/or by diagram):
6.11.5.1. | L1e — L7e | Drawing showing the extent of the illuminating surface: …
6.11.5.2. | L1e — L7e | Method used to define the apparent surface in accordance with point 2.10 of UNECE Regulation No 48 (OJ L 323, 6.12.2011, p. 46): …
6.11.5.3. | L1e — L7e | Axis of reference and centre of reference: …
6.11.5.4. | L1e — L7e | Method of operation of concealable lamps: …
6.11.6. | L1e — L7e | Description/drawing and type of headlamp levelling device (e.g. automatic, stepwise manually adjustable, continuously manually adjustable)(4): …
6.11.6.1. | L1e — L7e | Control device: …
6.11.6.2. | L1e — L7e | Reference marks: …
6.11.6.3. | L1e — L7e | Marks assigned for loading conditions: …
6.12. | | Rearward visibility
6.12.1. | | Rear-view mirrors (stating for each mirror)
6.12.1.1. | L1e — L7e | Drawing(s) for the identification of the mirror showing the position of the mirror relative to the vehicle structure: …
6.12.1.2. | L1e — L7e | Details of the method of attachment including that part of the vehicle structure to which it is attached: …
6.12.1.3. | L1e — L7e | A brief description of the electronic components of the adjustment system: …
6.12.2. | L1e — L7e | Devices for indirect vision other than mirrors
6.12.2.1. | L1e — L7e | Description of the device: …
6.12.2.2. | L1e — L7e | In the case of a camera-monitor device, the detection distance (mm), contrast, luminance range, glare correction, display performance (black and white/colour(4)), image repetition frequency, luminance reach of the monitor(4): …
6.12.2.3. | L1e — L7e | Sufficiently detailed drawings to identify the complete device, including installation instructions; the position for the EU type-approval mark has to be indicated on the drawings: …
6.13. | | Rollover protective structure (ROPS)
6.13.1. | L7e-B2 | Detailed technical description, position, fixing, etc. (including photographs or drawings): …
6.13.2. | | ROPS by Frame(4)
6.13.2.1. | L7e-B2 | Internal and external dimensions: …
6.13.2.2. | L7e-B2 | Material(s) and method of construction: …
6.13.3. | | ROPS by Cab (4)
6.13.3.1. | L7e-B2 | Other weather protection arrangements (description): …
6.13.3.2. | L7e-B2 | Internal and external dimensions: …
6.13.4. | | ROPS by Roll bar(s) mounted at front/rear(4), fold-down/not fold down (4)
6.13.4.1. | L7e-B2 | Dimensions: …
6.13.4.2. | L7e-B2 | Material(s) and method of construction: …
6.14. | | Safety belts and/or other restraints
6.14.1. | L2e, L4e, L5e-B, L6e-B, L7e | Number and position of safety belts and restraint systems and seats on which they can be used, please fill out table below: (L = left side, R = right side, C = centre)
| | Safety belt configuration and associated information L = left, C= centre, R=right | | | Complete EU type-approval mark | Variant, if applicable | Belt adjustment device for height (indicate yes/no/optional) First row of seats | | L | | | C | | | R | | | Second row of seats | | L | | | C | | | R | | |
6.14.2. | L2e, L4e, L5e-B, L6e-B, L7e | Description of a specific type of belt, with one anchorage attached to the seat back-rest or incorporating an energy-dissipation device: …
6.14.3. | L2e, L4e, L5e-B, L6e-B, L7e | Number and location of the anchorages: …
6.14.4. | L2e, L4e, L5e-B, L6e-B, L7e | Brief description of electrical/electronic components: …
6.15. | | Safety belt anchorages
6.15.1. | L2e, L4e, L5e-B, L6e-B, L7e | Photographs and/or drawings of the bodywork showing the true, effective location and dimensions of the anchorages, together with an indication of the R-point: …
6.15.2. | L2e, L4e, L5e-B, L6e-B, L7e | Drawings of the anchorages and the parts of the vehicle structure to which they are attached (together with a statement on the nature of the materials used): …
6.15.3. | L2e, L4e, L5e-B, L6e-B, L7e | Designation of the types of belts(14) authorised for attachment to the anchorages on the vehicle: …
| | Safety-belt anchorage configuration and associated information | Anchorage location Vehicle structure | Seat structure First row of seats | | Right-hand seat | | Lower anchorages Upper anchorages | | outboard inboard | | Centre seat | | Lower anchorages Upper anchorages | | right left | | Left-hand seat | | Lower anchorages Upper anchorages | | outboard inboard | | Second row of seats | | Right-hand seat | | Lower anchorages Upper anchorages | | outboard inboard | | Centre seat | | Lower anchorages Upper anchorages | | right left | | Left-hand seat | | Lower anchorages Upper anchorages | | outboard inboard | |
6.15.4. | L2e, L4e, L5e-B, L6e-B, L7e | Type-approval mark for each position: …
6.15.5. | L2e, L4e, L5e-B, L6e-B, L7e | Special devices (example: seat-height adjustment, preloading device, etc.): …
6.15.6. | L2e, L4e, L5e-B, L6e-B, L7e | Photographs and/or drawings of the bodywork showing the true, effective location and dimensions of the anchorages, together with an indication of the R-point: …
6.15.7. | L2e, L4e, L5e-B, L6e-B, L7e | Observation: …
6.16. | | Seating positions (saddles and seats)
6.16.1. | L1e — L7e | Number of seating positions: …
6.16.1.1. | L2e, L5e, L6e, L7e | Location and arrangement(8): …
6.16.2. | L1e — L7e | Seating position configuration: seat/saddle(4)
6.16.3. | L1e — L7e | Description and drawings of:
6.16.3.1. | L1e — L7e | The seats and their anchorages: …
6.16.3.2. | L1e — L7e | The adjustment system: …
6.16.3.3. | L1e — L7e | The displacement and locking systems: …
6.16.3.4. | L1e — L7e | The seat-belt anchorages incorporated in the seat structure: …
6.16.3.5. | L1e — L7e | The parts of the vehicle used as anchorages: …
6.16.4. | L2e, L4e, L5e-B, L6e-B, L7e | Coordinates or drawing of the R-point(s) of all seating positions: …
6.16.4.1. | L2e, L4e, L5e-B, L6e-B, L7e | Driver’s seat: …
6.16.4.2. | L2e, L4e, L5e-B, L6e-B, L7e | All other seating positions: …
6.16.5. | L1e — L7e | Design torso angle: …
6.16.5.1. | L1e — L7e | Driver’s seat: …
6.16.5.2. | L1e — L7e | All other seating positions: …
6.16.6. | L1e — L7e | Range of seat adjustment: …
6.16.6.1. | L1e — L7e | Driver’s seat: …
6.16.6.2. | L1e — L7e | All other seating positions: …
6.17. | | Steer-ability, cornering properties and turn-ability
6.17.1. | L1e — L7e | Schematic diagram of steered axle(s) showing steering geometry: …
6.17.2. | | Transmission and control of steering
6.17.2.1. | L1e — L7e | Configuration of steering transmission (specify for front and rear): …
6.17.2.2. | L1e — L7e | Linkage to wheels (including other than mechanical means; specify for front and rear): …
6.17.2.2.1. | L1e — L7e | A brief description of the electrical/electronic components: …
6.17.2.3. | L1e — L7e | Diagram of the steering transmission: …
6.17.2.4. | L2e, L5e, L6e, L7e | Schematic diagram(s) of the steering control(s): …
6.17.2.5. | L2e, L5e, L6e, L7e | Range and method of adjustment of the steering control(s): …
6.17.2.6. | L2e, L5e, L6e, L7e | Method of assistance: …
6.17.3. | | Maximum steering angle of the wheels
6.17.3.1. | L1e — L7e | To the right: … degrees; number of turns of the steering wheel (or equivalent data): …
6.17.3.2. | L1e — L7e | To the left: … degrees; number of turns of the steering wheel (or equivalent data): …
6.18. | | Tyres/wheels combination
6.18.1. | | Tyres:
6.18.1.1. | | Size designation
6.18.1.1.1. | L1e — L7e | Axle 1: …
6.18.1.1.2. | L1e — L7e | Axle 2: …
6.18.1.1.3. | L4e | Sidecar wheel: …
6.18.1.2. | L1e — L7e | Minimum load-capacity index: … with the maximum load on each tyre: … kg
6.18.1.3. | L1e — L7e | Minimum-speed category symbol compatible with the theoretical maximum design vehicle speed: …
6.18.1.4. | L1e — L7e | Tyre pressure(s) as recommended by the vehicle manufacturer: … kPa
6.18.2. | | Wheels:
6.18.2.1. | L1e — L7e | Rim size(s): …
6.18.2.2. | L1e — L7e | Categories of use compatible with the vehicle: …
6.18.2.3. | L1e — L7e | Nominal rolling circumference: …
6.19. | | Vehicle maximum speed limitation plate and its location on the vehicle
6.19.1. | L7e-B1 and L7e-B2 | Maximum speed limitation plate (indicate the reflecting material used; drawings and photos may be used as appropriate): …
6.19.2. | L7e-B1 and L7e-B2 | Location of maximum speed limitation plate (indicate variants where necessary; drawings and photos may be used as appropriate): …
6.19.3. | L7e-B1 and L7e-B2 | Height above road surface, upper edge: … mm
6.19.4. | L7e-B1 and L7e-B2 | Height above road surface, lower edge: … mm
6.19.5. | L7e-B1 and L7e-B2 | Distance of the centre line from the longitudinal median plane of the vehicle: … mm
6.19.6. | L7e-B1 and L7e-B2 | Distance from the left vehicle edge: … mm
6.20. | | Vehicle occupant protection, including interior fittings and vehicle doors
6.20.1. | | Bodywork
6.20.1.1. | L2e, L5e-B, L6e-B, L7e | Materials used and methods of construction: …
6.20.2. | | Occupant doors, latches and hinges
6.20.2.1. | L2e, L5e, L6e, L7e | Number of doors, and its configuration, dimensions and maximum angle of opening(5): …
6.20.2.2. | L2e, L5e, L6e, L7e | Drawing of latches and hinges and of their position in the doors: …
6.20.2.3. | L2e, L5e, L6e, L7e | Technical description of latches and hinges: …
6.20.2.4. | L2e, L5e, L6e, L7e | Details, including dimensions, of entrances, steps and necessary handles where applicable: …
6.20.3. | | Interior protection for occupants
6.20.3.1. | L2e, L5e, L6e, L7e | Photographs, drawings and/or an exploded view of the interior fittings, showing the parts in the passenger compartment and the materials used (with the exception of interior rear view mirrors, arrangement of controls, seats and the rear part of seats), roof and opening roof, backrest: …
6.20.4. | | Head restraints
6.20.4.1. | L2e, L5e, L6e, L7e | Head restraints: integrated/detachable/separate(4)
6.20.4.2. | L2e, L5e, L6e, L7e | Detailed description of the head restraint, specifying in particular the nature of the padding material or materials and, where applicable, the position and specifications of the braces and anchorage pieces for the type of seat for which approval is sought: …
6.20.4.3. | L2e, L5e, L6e, L7e | In the case of a ‘separate’ head restraint
6.20.4.3.1. | L2e, L5e, L6e, L7e | Detailed description of the structural zone to which the head restraint is intended to be fixed: …
6.20.4.3.2. | L2e, L5e, L6e, L7e | Scale drawings of the significant parts of the structure and the head restraint: …
6.21. | | Maximum continuous total power and/or maximum vehicle speed limitation by design
6.21.1. | | Propulsion and/or drive-train output governors
6.21.1.1. | L1e — L7e | Number (minimum two, exemption L3e-A3 and L4e-A3):
6.21.1.2. | L1e — L7e | How is the redundancy of governors ensured?: …
6.21.1.3. | L1e — L7e | Nominal cut-off point no 1: …
6.21.1.3.1. | L1e — L7e | Engine/motor/drive-train rotation speed at which cut-off starts under load: … min-1
6.21.1.3.2. | L1e — L7e | Maximum rotation speed at the minimum engine load: … min-1
6.21.1.4. | L1e — L7e | Nominal cut-off point no 2: …
6.21.1.4.1 | L1e — L7e | Engine/motor/drive-train rotation speed at which cut-off starts under load(4): … min-1
6.21.1.4.2. | L1e — L7e | Maximum rotation speed at the minimum engine load: … min-1
6.21.1.5. | L1e — L7e | The stated purpose of governor(s): maximum design vehicle speed limitation/maximum power limitation/engine over-speed protection(4): …
7. | | INFORMATION ON VEHICLE CONSTRUCTION
7.1. | | Coupling devices and attachments
7.1.1. | L1e — L7e | L-category vehicle equipped with coupling device: yes/no/optional(4)
7.1.2. | L1e — L7e | Guidelines and information for consumers in all EU languages regarding the impact on the driveability of using a trailer with an L-category vehicle included in the owner's manual: yes/no(4)
7.1.3. | L1e — L7e | For coupling-device approved as separate technical unit: installation and operating instructions added to documentation: yes/no(4)
7.1.4. | L1e — L7e | Photographs and/or drawings showing the position and the construction of the coupling-devices: …
7.1.5. | L1e — L7e | Instructions for attaching the coupling-type to the vehicle and photographs or drawings of the fixing points on the vehicle as stated by the manufacturer; additional information, if the use of the coupling-type is restricted to certain variants or versions of the vehicle type: …
7.1.6. | L1e — L7e | Attachment points for a secondary coupling and/or breakaway cable (drawings and pictures may be used as appropriate): yes/no(4)
7.2. | | Devices to prevent unauthorised use
7.2.1. | | Protective device
7.2.1.1. | L1e — L7e | Summary description of protective device(s) used: …
7.2.2. | | Vehicle immobiliser
7.2.2.1. | L1e — L7e | Technical description of the vehicle immobiliser and of the measures taken against inadvertent activation: …
7.2.3. | | Alarm system
7.2.3.1. | L1e — L7e | Description of the alarm system and of the vehicle parts involved in its installation: …
7.2.3.2. | L1e — L7e | List of the main components comprising the alarm system: …
7.3. | | Electromagnetic compatibility (EMC)
7.3.1. | L1e — L7e | Requirements under UNECE Regulation No 10 (OJ L 254, 20.9.2012, p. 1) are met with relevant documentation included in the information document: yes/no(4)
7.3.2. | L1e — L7e | Table or drawing of radio-interference control equipment: …
7.3.3. | L1e — L7e | Particulars of the nominal value of the direct-current resistance, and, in the case of resistive ignition cables, of their nominal resistance per metre: …
7.4. | | External projections
7.4.1. | L1e — L7evehicles with bodywork | General arrangement (drawing or photographs accompanied if necessary by dimensional details and/or text) indicating the position of the attached sections and views, of any parts of the exterior surface which can be regarded as critical for external projections, for example, and where relevant: bumpers, floor line, door and window pillars, air-intake grilles, radiator grille, windscreen wipers, rain gutter channels, handles, slide rails, flaps, door hinges and locks, hooks, eyes, winches, decorative trim, badges, emblems and recesses and any other parts of the exterior surface which can be regarded as critical (e.g. lighting equipment): …
7.5. | | Fuel storage
7.5.1. | | Fuel tank(s)
7.5.1.1. | | Main fuel tank(s)
7.5.1.1.1. | L1e — L7e | Maximum capacity: …
7.5.1.1.2. | L1e — L7e | Materials used: …
7.5.1.1.3. | L1e — L7e | Fuel tank inlet: restricted orifice/label(4) …
7.5.1.2. | | Reserve fuel tank(s)
7.5.1.2.1. | L1e — L7e | Maximum capacity: …
7.5.1.2.2. | L1e — L7e | Materials used: …
7.5.1.2.3. | L1e — L7e | Fuel tank inlet: restricted orifice/label(4) …
7.5.1.3. | L1e — L7e | Drawing and technical description of the tank(s) with connections and lines of the breathing and venting system, locks, valves, fastening devices: …
7.5.1.4. | L1e — L7e | Drawing clearly showing the position of the tank(s) in the vehicle: …
7.5.1.5. | L1e — L7e | Drawing of the heat shield between tank and exhaust device: …
7.5.2. | | Compressed natural gas (CNG) container(s)
7.5.2.1. | L1e — L7e | Applicable information document set out in UNECE regulation No 110 as prescribed for vehicle category M1 shall supplement this information document with regards to the CNG tanks installed on the vehicle.
7.5.3. | L1e — L7e | Liquefied petroleum gas (LPG)container(s)
7.5.3.1. | L1e — L7e | Applicable information document set out in UNECE regulation No 67 as prescribed for vehicle category M1 shall supplement this information document with regards to the LPG tanks installed on the vehicle.
7.6. | | On-board diagnostics (OBD) functional requirements
7.6.1 | | On-board diagnostics system
7.6.1.1. | L1e — L7e | Stage I: yes/no(4) and/or
7.6.1.2. | L1e — L7e | Stage II: yes/no(4)
7.6.2. | | OBD system general information
7.6.2.1. | L3e—L7e(10) | Written description and/or drawing of the malfunction indicator (MI): …
7.6.2.2. | L3e—L7e(10) | List and purpose of all components monitored by the OBD system: …
7.6.2.3. | L3e— L7e(10) | Written description (general working principles) for all OBD stage I circuit (open circuit, shorted low and high, rationality) and electronics (PCU/ECU internal and communication) diagnostics: …
7.6.2.4. | L3e—L7e(10) | Written description (general working principles) for all OBD stage I diagnostic functionality triggering any operating mode which significantly reduces engine torque in case of fault detection: …
7.6.2.5. | L3e— L7e(10) | Written description of the communication protocol(s) supported: …
7.6.2.6. | L3e—L7e(10) | Physical location of diagnostic-connector (add drawings and photographs): …
7.6.2.7. | L3e— L7e(10) | Written description in case of voluntary compliance with OBD stage II (general working principles):
7.6.2.7.1. | L3e — L7e(10) | Positive-ignition engines
7.6.2.7.1.1. | L3e — L7e(10) | Catalyst monitoring: …
7.6.2.7.1.2. | L3e — L7e(10) | Misfire detection: …
7.6.2.7.1.3. | L3e — L7e(10) | Oxygen sensor monitoring: …
7.6.2.7.1.4. | L3e — L7e(10) | Other components monitored by the OBD system: …
7.6.2.7.2. | L3e — L7e(10) | Compression-ignition engines
7.6.2.7.2.1. | L3e — L7e(10) | Catalyst monitoring: …
7.6.2.7.2.2. | L3e — L7e(10) | Particulate filter monitoring: …
7.6.2.7.2.3. | L3e — L7e(10) | Electronic fuelling system monitoring: …
7.6.2.7.2.4. | L3e — L7e(10) | deNOx system monitoring: …
7.6.2.7.2.5. | L3e — L7e(10) | Other components monitored by the OBD system: …
7.6.2.7.3 | L3e — L7e(10) | Criteria for MI activation (fixed number of driving cycles or statistical method): …
7.6.2.7.4. | L3e — L7e(10) | List of all OBD output codes and formats used (with explanation of each): …
7.6.3. | | OBD compatibility The following additional information shall be provided by the vehicle manufacturer to enable the manufacture of OBD-compatible replacement or service parts, diagnostic tools and test equipment:
7.6.3.1. | L3e — L7e(10) | A comprehensive document describing all sensed components concerned with the strategy for fault detection and MI activation (fixed number of driving cycles or statistical method). This shall, include a list of relevant secondary sensed parameters for each component monitored by the OBD system. The document shall also list all OBD output codes and formats (with an explanation of each) used in association with individual emission-related powertrain components and individual non-emission-related components, where monitoring the component is used to determine MI activation. This shall contain, in particular, a comprehensive explanation for the data given in service $05 Test ID $ 21 to FF and the data given in service $06: …
7.6.3.2. | L3e — L7e(10) | For vehicle types using a communication link in accordance with ISO 15765-4 ‘Road vehicles, diagnostics on controller area network (CAN) — Part 4: requirements for emissions-related systems’, the manufacturer shall provide a comprehensive explanation for the data given in service $06 Test ID $00 to FF, for each OBD monitor ID supported: …
7.6.3.3. | L3e — L7e(10) | The information required above may be provided in table form as described below.
| Example OBD fault-code overview list Component | Fault code | Monitoring strategy | Fault detection criteria | MI activation criteria | Secondary parameters | Preconditioning | Demonstration test Intake air temperature sensor open circuit | P0xxxxzz | Comparison with temperature model after cold start | > 20 degr difference between measured and modelled intake air temperature | 3 rd cycle | Coolant and intake air temperature sensor signals | Two type I cycles | Type I
7.6.3.4. | L3e — L7e(10) | Description of ETC diagnostic fault codes: …
7.6.3.5. | L3e — L7e (10) | Description of the default modes which a driver may experience in case of an ETC failure
7.6.4. | | Communication protocol information The following information shall be referenced to a specific vehicle make, model and variant, or identified using other workable definitions such as VIN or vehicle and systems identification:
7.6.4.1. | L3e — L7e(10) | Any protocol information system needed to enable complete diagnostics in addition to the standards prescribed in point 3.8. of Appendix 1 to Annex XII to Commission Delegated Regulation (EU) No 44/2014, such as additional hardware or software protocol information, parameter identification, transfer functions, ‘keep alive’ requirements, or error conditions;
7.6.4.2. | L3e — L7e(10) | Details of how to obtain and interpret all fault codes not in accordance with the standards prescribed in point 3.11. of Appendix 1 to Annex XII to Commission Delegated Regulation (EU) No 44/2014
7.6.4.3. | L3e — L7e(10) | A list of all available live data parameters including scaling and access information;
7.6.4.4. | L3e — L7e(10) | A list of all available functional tests including device activation or control and the means to implement them;
7.6.4.5. | L3e — L7e(10) | Details of how to obtain all component and status information, time stamps, pending DTC and freeze frames;
7.6.4.6. | L3e — L7e(10) | PCU/ECU identification and variant coding;
7.6.4.7. | L3e — L7e(10) | Details of how to reset service lights;
7.6.4.8. | L3e — L7e(10) | Location of diagnostic connector and connector details;
7.6.4.9. | L3e — L7e(10) | Engine code identification.
7.6.5. | | Test and diagnosis of OBD monitored components
7.6.5.1. | L3e — L7e(10) | A description of tests to confirm its functionality, at the component or in the harness:
7.7. | | Passenger handholds and footrests
7.7.1. | | Handholds
7.7.1.1. | L1e — L7e | Configuration: strap and/or handle(4)
7.7.1.3. | L1e — L7e | Photographs and/or drawings showing the location and the construction:
7.7.2. | | Footrests
7.7.2.1. | L1e — L7e | Photographs and/or drawings showing the location and the construction:
7.8. | | Registration plate space
7.8.1. | L1e — L7e | Location of rear registration plate (indicate variants where necessary; drawings may be used as appropriate): …
7.8.1.1. | L1e — L7e | Height above road surface, upper edge: … mm
7.8.1.2. | L1e — L7e | Height above road surface, lower edge: … mm
7.8.1.3. | L1e — L7e | Distance of the centre line from the longitudinal median plane of the vehicle: … mm
7.8.1.4. | L1e — L7e | Dimensions (length x width): … mm x … mm
7.8.1.5. | L1e — L7e | Inclination of the plane to the vertical: … degr.
7.8.1.6. | L1e — L7e | Angle of visibility in the horizontal plane: … degr
7.9. | | Stands
7.9.1. | L1e, L3e | Configuration: central and/or side(4): …
7.9.2. | L1e, L3e | Construction material used: …
7.9.3. | L1e, L3e | Photographs and drawings showing the location of the stand(s) in relation to the structure of the vehicle: …
7.9.4. | L1e, L3e | Description of the method to prevent contact of the stand with the ground when the vehicle is being propelled: …
Appendix 1

Model information document relating to EU type-approval of a type of/ a type of a vehicle with regard to(4) a tailpipe pollution-control system
Item No | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21) :
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
0.11. | L1e — L7e | Type-approval marks for components and separate technical units(19) : …
0.11.1. | L1e — L7e | Method of attachment: …
0.11.2. | L1e — L7e | Photographs and/or drawings of the location of the type-approval mark (completed example with dimensions): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: … km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed (22): … km/h and gear in which it is reached: …
1.8.3. | L1e — L7e | Maximum net power combustion engine: … kW at … min–1at A/F ratio: …
1.8.4. | L1e — L7e | Maximum net torque combustion engine: … Nm at … min–1at A/F ratio: …
1.8.5. | L1e — L7e | Maximum continuous-rated power electric motor (15/30(4) minutes power(27)): … kW at … min–1
1.8.6. | L1e — L7e | Maximum continuous-rated torque electric motor: … Nm at … min–1
1.8.7. | L1e — L7e | Maximum continuous total power for propulsion(s): … kW at … min–1 at A/F ratio: …
1.8.8. | L1e — L7e | Maximum continuous total torque for propulsion(s): … Nm at … min–1 at A/F ratio: …
1.8.9. | L1e — L7e | Maximum peak power for propulsion(s): … kW at … min–1at A/F ratio: …
4. | | GENERAL INFORMATION ON ENVIRONMENTAL AND PROPULSION UNIT PERFORMANCE
4.1. | | Tailpipe emission-control system
4.1.1. | L1e — L7e | Brief description and schematic drawing of the tailpipe emission-control system and its control:
4.1.2. | | Catalytic converter
4.1.2.1. | L1e — L7e | Configuration, number of catalytic converters and elements (information to be provided for each separate unit): …
4.1.2.2. | L1e — L7e | Drawing with dimensions, shape and volume of the catalytic converter(s): …
4.1.2.3. | L1e — L7e | Catalytic reaction: …
* 4.1.2.4. | L1e — L7e | Total charge of precious metals: …
* 4.1.2.5. | L1e — L7e | Relative concentration: …
* 4.1.2.6. | L1e — L7e | Substrate (structure and material): …
* 4.1.2.7. | L1e — L7e | Cell density: …
* 4.1.2.8. | L1e — L7e | Casing for the catalytic converter(s): …
4.1.2.9. | L1e — L7e | Location of the catalytic converter(s) (place and reference distance in the exhaust line): …
4.1.2.10. | L1e — L7e | Catalyst heat-shield: yes/no(4)
4.1.2.11. | L1e — L7e | Brief description and schematic drawing of the regeneration system/method of exhaust after-treatment systems and its control system: …
4.1.2.11.1. | L1e — L7e | Normal operating temperature range: … K
4.1.2.11.2. | L1e — L7e | Consumable reagents: yes/no(4)
4.1.2.11.3. | L1e — L7e | Brief description and schematic drawing of the reagent flow (wet) system and its control system: …
4.1.2.11.4. | L1e — L7e | Type and concentration of reagent needed for catalytic action: …
4.1.2.11.5. | L1e — L7e | Normal operational temperature range of reagent: … K
4.1.2.12. | L1e — L7e | Identifying part number: …
4.1.3. | | Oxygen sensor(s)
4.1.3.1. | L1e — L7e | Oxygen sensor component(s) drawing(s): …
4.1.3.2. | L1e — L7e | Drawing of exhaust device with oxygen sensor location(s) (dimensions relative to exhaust valves): …
4.1.3.3. | L1e — L7e | Control range(s): …
4.1.3.4. | L1e — L7e | Identifying part number(s): …
4.1.3.5. | L1e — L7e | Description of oxygen sensor heating system and heating strategy: …
4.1.3.6. | L1e — L7e | Oxygen sensor heat shield(s): yes/no(4)
4.1.4. | | Secondary air-injection (air-inject in exhaust)
4.1.4.1. | L1e — L7e | Brief description and schematic drawing of the secondary air-injection system and its control system: …
4.1.4.2. | L1e — L7e | Configuration (mechanical, pulse air, air pump etc.)(4): …
4.1.4.3. | L1e — L7e | Working principle: …
4.1.5. | | External exhaust gas recirculation (EGR)
4.1.5.1. | L1e — L7e | Brief description and schematic drawing of the EGR system (exhaust flow) and its control system: …
4.1.6. | | Particulate filter
4.1.6.1. | L1e — L7e | PT component drawing with dimensions, shape and capacity of the particulate filter: …
4.1.6.2. | L1e — L7e | Design of the particulate filter: …
4.1.6.3. | L1e — L7e | Brief description and schematic drawing of the particulate filter and its control system: …
4.1.6.4. | L1e — L7e | Location (reference distance in the exhaust line): …
4.1.6.5. | L1e — L7e | Method or system of regeneration, description and drawing: …
4.1.6.6. | L1e — L7e | Identifying part number: …
4.1.7. | | Lean NOx trap
4.1.7.1. | L1e — L7e | Operation principle of lean NOx trap: …
4.1.8. | | Additional tailpipe emission-control devices (if any not covered under another heading)
4.1.8.1. | L1e — L7e | Working principle: …
5. | | VEHICLE PROPULSION FAMILY
5.1. | L1e — L7e | To define the vehicle propulsion family, the manufacturer shall submit the information required for classification criteria set out in point 3 of Annex XI to Commission Delegated Regulation (EU) No 134/2014, if not already provided in the information document.
Appendix 2

Model information document relating to EU type-approval of a type of/a type of a vehicle with regard to(4) a crankcase and evaporative emissions system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21) : …
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
0.11. | L1e — L7e | Type-approval marks for components and separate technical units(19) : …
0.11.1. | L1e — L7e | Method of attachment: …
0.11.2. | L1e — L7e | Photographs and/or drawings of the location of the type-approval mark (completed example with dimensions): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
4. | | GENERAL INFORMATION ON ENVIRONMENTAL AND PROPULSION UNIT PERFORMANCE
4.2. | | Crankcase emission control system
4.2.1. | L1e — L7e | Configuration of crank-case gas recycling system (breather system, positive crank-case ventilation system, other)(4) (description and drawings).
4.3. | | Evaporative emission control system
4.3.1. | L1e — L7e | Evaporative emissions control system: yes/no(4)
4.3.2. | L1e — L7e | Drawing of the evaporative control system: …
4.3.3. | L1e — L7e | Drawing of the canister (including dimensions and indicating vent and purge mechanism): …
4.3.4. | L1e — L7e | Working capacity: … g
4.3.5. | L1e — L7e | Adsorption material: … (e.g. charcoal, carbon, synthetic, …)
4.3.6. | L1e — L7e | Housing material: … (e.g. plastic, steel, …)
4.3.7. | L1e — L7e | Schematic drawing of the fuel tank, indicating capacity and material: …
4.3.8. | L1e — L7e | Drawing of the heat-shield between tank and exhaust device: …
5. | | VEHICLE PROPULSION FAMILY
5.1. | L1e — L7e | To define the vehicle propulsion family, the manufacturer shall submit the information required for classification criteria set out in point 3 of Annex XI to Commission Delegated Regulation (EU) No 134/2014, if not already provided in the information document.
Appendix 3

Model information document relating to EU type-approval of a type of/a type of a vehicle with regard to(4) an on-board diagnostic (OBD) system
Item No | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21):
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
0.11. | L1e — L7e | Type-approval marks for components and separate technical units(19) : …
0.11.1. | L1e — L7e | Method of attachment: …
0.11.2. | L1e — L7e | Photographs and/or drawings of the location of the type-approval mark (completed example with dimensions): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
4. | | GENERAL INFORMATION ON ENVIRONMENTAL AND PROPULSION UNIT PERFORMANCE
4.0 | | General information on environmental and propulsion performance
4.0.1. | L1e — L7e | Environmental step: Euro (3/4/5/5+) (4)
4.0.2. | L1e — L7e | Fuel consumption (provide details for each reference fuel tested) … l/kg (4) /100 km
4.0.3. | L1e — L7e | CO 2 emissions (25) : … g/km
4.0.4. | L1e — L7e | Energy consumption (25) : … Wh/km
4.0.5. | L1e — L7e | Electric range (25) : … km
5. | | VEHICLE PROPULSION FAMILY
5.1. | L1e — L7e | To define the vehicle propulsion family, the manufacturer shall submit the information required for classification criteria set out in point 3 of Annex XI to Commission Delegated Regulation (EU) No 134/2014, if not already provided in the information document.
7. | | INFORMATION ON VEHICLE CONSTRUCTION
7.6. | | On-board diagnostics (OBD) functional requirements
7.6.1 | | On-board diagnostics system
7.6.1.1. | L1e — L7e | Stage I: yes/no(4) and/or
7.6.1.2. | L1e — L7e | Stage II: yes/no(4)
7.6.2. | | OBD system general information
7.6.2.1. | L3e — L7e(10) | Written description and/or drawing of the malfunction indicator (MI): …
7.6.2.2. | L3e — L7e(10) | List and purpose of all components monitored by the OBD system: …
7.6.2.3. | L3e — L7e(10) | Written description (general working principles) for all OBD stage I circuit (open circuit, shorted low and high, rationality) and electronics (PCU/ECU internal and communication) diagnostics: …
7.6.2.4. | L3e — L7e(10) | Written description (general working principles) for all OBD stage I diagnostic functionality triggering any operating mode which significantly reduces engine torque in case of fault detection: …
7.6.2.5. | L3e — L7e(10) | Written description of the communication protocol(s) supported: …
7.6.2.6. | L3e — L7e(10) | Physical location of diagnostic-connector (add drawings and photographs): …
7.6.2.7. | L3e — L7e(10) | Written description in case of voluntary compliance with OBD stage II (general working principles):
7.6.2.7.1. | L3e — L7e(10) | Positive-ignition engines
7.6.2.7.1.1. | L3e — L7e(10) | Catalyst monitoring: …
7.6.2.7.1.2. | L3e — L7e(10) | Misfire detection: …
7.6.2.7.1.3. | L3e — L7e(10) | Oxygen sensor monitoring: …
7.6.2.7.1.4. | L3e — L7e(10) | Other components monitored by the OBD system: …
7.6.2.7.2. | L3e — L7e(10) | Compression-ignition engines
7.6.2.7.2.1. | L3e — L7e(10) | Catalyst monitoring: …
7.6.2.7.2.2. | L3e — L7e(10) | Particulate filter monitoring: …
7.6.2.7.2.3. | L3e — L7e(10) | Electronic fuelling system monitoring: …
7.6.2.7.2.4. | L3e — L7e(10) | deNOx system monitoring: …
7.6.2.7.2.5. | L3e — L7e(10) | Other components monitored by the OBD system: …
7.6.2.7.3 | L3e — L7e(10) | Criteria for MI activation (fixed number of driving cycles or statistical method): …
7.6.2.7.4. | L3e — L7e(10) | List of all OBD output codes and formats used (with explanation of each): …
7.6.3. | | OBD compatibility The following additional information shall be provided by the vehicle manufacturer to enable the manufacture of OBD-compatible replacement or service parts, diagnostic tools and test equipment:
7.6.3.1. | L3e — L7e(10) | A comprehensive document describing all sensed components concerned with the strategy for fault detection and MI activation (fixed number of driving cycles or statistical method). This shall, include a list of relevant secondary sensed parameters for each component monitored by the OBD system. The document shall also list all OBD output codes and formats (with an explanation of each) used in association with individual emission-related powertrain components and individual non-emission-related components, where monitoring the component is used to determine MI activation. This shall contain, in particular, a comprehensive explanation for the data given in service $05 Test ID $ 21 to FF and the data given in service $06: …
7.6.3.2. | L3e — L7e(10) | For vehicle types using a communication link in accordance with ISO 15765-4 ‘Road vehicles, diagnostics on controller area network (CAN) — Part 4: requirements for emissions-related systems’, the manufacturer shall provide a comprehensive explanation for the data given in service $06 Test ID $00 to FF, for each OBD monitor ID supported: …
7.6.3.3. | L3e — L7e(10) | The information required above may be provided in table form as described below.
Example OBD fault-code overview list Component | Fault code | Monitoring strategy | Fault detection criteria | MI activation criteria | Secondary parameters | Preconditioning | Demonstration test Intake air temperature sensor open circuit | P0xxxxzz | Comparison with temperature model after cold start | > 20 degr difference between measured and modelled intake air temperature | 3 rd cycle | Coolant and intake air temperature sensor signals | Two type I cycles | Type I
7.6.3.4. | L3e — L7e(10) | Description of ETC diagnostic fault codes: …
7.6.3.5. | L3e — L7e(10) | Description of the default modes in case of an ETC failure which a driver may experience in case of an ETC failure
7.6.4. | | Communication protocol information The following information shall be referenced to a specific vehicle make, model and variant, or identified using other workable definitions such as VIN or vehicle and systems identification:
7.6.4.1. | L3e — L7e(10) | Any protocol information system needed to enable complete diagnostics in addition to the standards prescribed in point 3.8. of Appendix 1 to Annex XII to Commission Delegated Regulation (EU) No 134/2014, such as additional hardware or software protocol information, parameter identification, transfer functions, ‘keep alive’ requirements, or error conditions;
7.6.4.2. | L3e — L7e(10) | Details of how to obtain and interpret all fault codes not in accordance with the standards prescribed in point 3.1 of Appendix 1 to Annex XII to Commission Delegated Regulation (EU) No 134/2014;
7.6.4.3. | L3e — L7e(10) | A list of all available live data parameters including scaling and access information;
7.6.4.4. | L3e — L7e(10) | A list of all available functional tests including device activation or control and the means to implement them;
7.6.4.5. | L3e — L7e(10) | Details of how to obtain all component and status information, time stamps, pending DTC and freeze frames;
7.6.4.6. | L3e — L7e(10) | PCU/ECU identification and variant coding;
7.6.4.7. | L3e — L7e(10) | Details of how to reset service lights;
7.6.4.8. | L3e — L7e(10) | Location of diagnostic connector and connector details;
7.6.4.9. | L3e — L7e(10) | Engine code identification.
7.6.5. | | Test and diagnosis of OBD monitored components
7.6.5.1. | L3e — L7e(10) | A description of tests to confirm its functionality, at the component or in the harness:
Appendix 4

Model information document relating to EU type-approval of a type of/a type of a vehicle with regard to(4) a sound level system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21):
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
0.11. | L1e — L7e | Type-approval marks for components and separate technical units(19) : …
0.11.1. | L1e — L7e | Method of attachment: …
0.11.2. | L1e — L7e | Photographs and/or drawings of the location of the type-approval mark (completed example with dimensions): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: … km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed (22): … km/h and gear in which it is reached: …
1.8.3. | L1e — L7e | Maximum net power combustion engine: … kW at … min-1 at A/F ratio: …
1.8.4. | L1e — L7e | Maximum net torque combustion engine: … Nm at … min-1 at A/F ratio: …
1.8.5. | L1e — L7e | Maximum continuous-rated power electric motor (15/30(4) minutes power(27)): … kW at … min–1
1.8.6. | L1e — L7e | Maximum continuous-rated torque electric motor: … Nm at … min-1
1.8.7. | L1e — L7e | Maximum continuous total power for propulsion(s): … kW at … min-1 at A/F ratio: …
1.8.8. | L1e — L7e | Maximum continuous total torque for propulsion(s): … Nm at … min-1 at A/F ratio: …
1.8.9. | L1e — L7e | Maximum peak power for propulsion(s): … kW at … min-1at A/F ratio: …
4. | | GENERAL INFORMATION ON ENVIRONMENTAL AND PROPULSION UNIT PERFORMANCE
4.0 | | General information on environmental and propulsion performance
4.0.6. | | Sound level
4.0.6.1. | L3e | Limit value for L urban (16) : … dB(A)
4.4. | | Additional information on environmental and propulsion unit performance
4.4.3. | L1e — L7e | Applicable information document set out in respectively UN Regulation No 9, 41 or 63 shall supplement this information document with regard to the sound level.
Appendix 5

Model information document relating to EU type-approval of a type of/a type of a vehicle with regard to(4) a propulsion unit performance system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21) : …
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
0.11. | L1e — L7e | Type-approval marks for components and separate technical units(19) : …
0.11.1. | L1e — L7e | Method of attachment: …
0.11.2. | L1e — L7e | Photographs and/or drawings of the location of the type-approval mark (completed example with dimensions): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed (22): … km/h and gear in which it is reached: …
1.8.3. | L1e — L7e | Maximum net power combustion engine: … kW at … min-1 at A/F ratio: …
1.8.4. | L1e — L7e | Maximum net torque combustion engine: … Nm at … min–1 at A/F ratio: …
1.8.5. | L1e — L7e | Maximum continuous-rated power electric motor (15/30(4) minutes power(27)): … kW at … min–1
1.8.6. | L1e — L7e | Maximum continuous-rated torque electric motor: … Nm at … min–1
1.8.7. | L1e — L7e | Maximum continuous total power for propulsion(s): … kW at … min–1 at A/F ratio: …
1.8.8. | L1e — L7e | Maximum continuous total torque for propulsion(s): … Nm at … min–1 at A/F ratio: …
1.8.9. | L1e — L7e | Maximum peak power for propulsion(s): … kW at …min–1 at A/F ratio: …
3. | | GENERAL POWERTRAIN CHARACTERISTICS
3.3. | | Pure electric and hybrid electric propulsion and control
3.3.3.4. | L1e — L7e | 15/30(4) minutes power(27): … kW
3.9. | | Cycles designed to pedal
3.9.1. | L1e | Ratio manpower/electric power: …
3.9.2. | L1e | Maximum assistance factor: …
3.9.3. | L1e | Maximum vehicle speed for which the electric motor gives assistance: … km/h
3.9.4. | L1e | Switch-off distance: … m
Appendix 5a

Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a maximum torque and a maximum net power of a propulsion unit system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer's authorised representative, if any: …
0.10. | | Vehicle(s) for which the separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type (17) : …
0.10.2. | L1e — L7e | Variant (17) : …
0.10.3. | L1e — L7e | Version (17) : …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle (2) : …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: … km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed (22) : … km/h and gear in which it is reached: …
1.8.3. | L1e — L7e | Maximum net power combustion engine: … kW at … min -1 at A/F ratio: …
1.8.4. | L1e — L7e | Maximum net torque combustion engine: … Nm at … min -1 at A/F ratio: …
1.8.5. | L1e — L7e | Maximum continuous-rated power electric motor (15/30 (4) minutes power (27) ): … kW at … min –1
1.8.6. | L1e — L7e | Maximum continuous-rated torque electric motor: … Nm at … min -1
1.8.7. | L1e — L7e | Maximum continuous total power for propulsion(s): … kW at … min -1 at A/F ratio: …
1.8.8. | L1e — L7e | Maximum continuous total torque for propulsion(s): … Nm at … min -1 at A/F ratio: …
1.8.9. | L1e — L7e | Maximum peak power for propulsion(s): … kW at … min -1 at A/F ratio: …
3. | | GENERAL POWERTRAIN CHARACTERISTICS
3.2. | | Combustion engine
3.2.1. | | Specific engine information
3.2.1.1. | L1e — L7e | Number of combustion engines: …
3.2.1.2. | L1e — L7e | Working principle: internal combustion engine (ICE)/positive ignition/compression ignition/external combustion engine (ECE)/turbine/compressed air (4) : …
3.2.1.3. | L1e — L7e | Cycle: four-stroke/two-stroke/rotary/other (4) :
3.2.1.4. | L1e — L7e | Cylinders
3.2.1.4.1. | L1e — L7e | Number: …
3.2.1.4.2. | L1e — L7e | Arrangement (26) : …
3.2.1.4.3. | L1e — L7e | Bore (12) : … mm
3.2.1.4.4. | L1e — L7e | Stroke (12) : … mm
3.2.1.4.5. | L1e — L7e | Number and configuration of stators in the case of rotary-piston engine: …
3.2.1.4.6. | L1e — L7e | Volume of combustion chambers in the case of rotary-piston engine: … cm 3
3.2.1.4.7. | L1e — L7e | Firing order: …
3.2.1.5. | L1e — L7e | Engine capacity (6) : … cm 3
3.2.1.6. | L1e — L7e | Volumetric compression ratio (7) : …
3.3. | | Pure electric and hybrid electric propulsion and control
3.3.3.4. | L1e — L7e | 15/30 (4) minutes power (27) : … kW
Appendix 6

Model information document relating to EU type-approval of a pollution-control device as a STU
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21) : …
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed (22): … km/h and gear in which it is reached: …
1.8.3. | L1e — L7e | Maximum net power combustion engine: … kW at … min-1 at A/F ratio: …
1.8.4. | L1e — L7e | Maximum net torque combustion engine: … Nm at … min-1 at A/F ratio: …
1.8.5. | L1e — L7e | Maximum continuous-rated power electric motor (15/30(4) minutes power(27)): … kW at … min–1
1.8.6. | L1e — L7e | Maximum continuous-rated torque electric motor: … Nm at … min-1
1.8.7. | L1e — L7e | Maximum continuous total power for propulsion(s): … kW at … min-1 at A/F ratio: …
1.8.8. | L1e — L7e | Maximum continuous total torque for propulsion(s): … Nm at … min-1 at A/F ratio: …
1.8.9. | L1e — L7e | Maximum peak power for propulsion(s): … kW at … min-1 at A/F ratio: …
4. | | GENERAL INFORMATION ON ENVIRONMENTAL AND PROPULSION UNIT PERFORMANCE
4.0 | | General information on environmental and propulsion performance
4.0.1. | L1e — L7e | Environmental step: Euro (3/4/5/5+) (4)
4.0.2. | L1e — L7e | Fuel consumption (provide details for each reference fuel tested) … l/kg (4) /100 km
4.0.3. | L1e — L7e | CO 2 emissions (25) : … g/km
4.0.4. | L1e — L7e | Energy consumption (25) : … Wh/km
4.0.5. | L1e — L7e | Electric range (25) : … km
4.1. | | Tailpipe emission-control system
4.1.1. | L1e — L7e | Brief description and schematic drawing of the tailpipe emission-control system and its control: …
4.1.2. | | Catalytic converter
4.1.2.1. | L1e — L7e | Configuration, number of catalytic converters and elements (information to be provided for each separate unit): …
4.1.2.2. | L1e — L7e | Drawing with dimensions, shape and volume of the catalytic converter(s): …
4.1.2.3. | L1e — L7e | Catalytic reaction: …
* 4.1.2.4. | L1e — L7e | Total charge of precious metals: …
* 4.1.2.5. | L1e — L7e | Relative concentration: …
* 4.1.2.6. | L1e — L7e | Substrate (structure and material): …
* 4.1.2.7. | L1e — L7e | Cell density: …
* 4.1.2.8. | L1e — L7e | Casing for the catalytic converter(s): …
4.1.2.9. | L1e — L7e | Location of the catalytic converter(s) (place and reference distance in the exhaust line): …
4.1.2.10. | L1e — L7e | Catalyst heat-shield: yes/no(4)
4.1.2.11. | L1e — L7e | Brief description and schematic drawing of the regeneration system/method of exhaust after-treatment systems and its control system: …
4.1.2.11.1. | L1e — L7e | Normal operating temperature range: … K
4.1.2.11.2. | L1e — L7e | Consumable reagents: yes/no(4)
4.1.2.11.3. | L1e — L7e | Brief description and schematic drawing of the reagent flow (wet) system and its control system: …
4.1.2.11.4. | L1e — L7e | Type and concentration of reagent needed for catalytic action: …
4.1.2.11.5. | L1e — L7e | Normal operational temperature range of reagent: … K
4.1.2.11.6. | L1e — L7e | Frequency of reagent refill: continuous/maintenance(4)
4.1.2.12. | L1e — L7e | Identifying part number:
4.1.3. | | Oxygen sensor(s)
4.1.3.1. | L1e — L7e | Oxygen sensor component(s) drawing(s): …
4.1.3.2. | L1e — L7e | Drawing of exhaust device with oxygen sensor location(s) (dimensions relative to exhaust valves): …
4.1.3.3. | L1e — L7e | Control range(s): …
4.1.3.4. | L1e — L7e | Identifying part number(s): …
4.1.3.5. | L1e — L7e | Description of oxygen sensor heating system and heating strategy: …
4.1.3.6. | L1e — L7e | Oxygen sensor heat shield(s): yes/no(4)
4.1.4. | | Secondary air-injection (air-inject in exhaust)
4.1.4.1. | L1e — L7e | Brief description and schematic drawing of the secondary air-injection system and its control system: …
4.1.4.2. | L1e — L7e | Configuration (mechanical, pulse air, air pump etc.)(4): …
4.1.4.3. | L1e — L7e | Working principle: …
4.1.5. | | External exhaust gas recirculation (EGR)
4.1.5.1. | L1e — L7e | Brief description and schematic drawing of the EGR system (exhaust flow) and its control system: …
4.1.5.2. | L1e — L7e | Characteristics: …
4.1.6. | | Particulate filter
4.1.6.1. | L1e — L7e | PT component drawing with dimensions, shape and capacity of the particulate filter: …
4.1.6.2. | L1e — L7e | Design of the particulate filter: …
4.1.6.3. | L1e — L7e | Brief description and schematic drawing of the particulate filter and its control system: …
4.1.6.4. | L1e — L7e | Location (reference distance in the exhaust line): …
4.1.6.5. | L1e — L7e | Method or system of regeneration, description and drawing: …
4.1.7. | | Lean NOx trap
4.1.7.1. | L1e — L7e | Operation principle of lean NOx trap: …
4.1.8. | | Additional tailpipe emission-control devices (if any not covered under another heading)
4.1.8.1. | L1e — L7e | Working principle: …
Appendix 7

Model information document relating to EU type-approval of a noise-abatement device as a STU
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21) :
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: … km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed (22): … km/h and gear in which it is reached: …
1.8.3. | L1e — L7e | Maximum net power combustion engine: … kW at … min-1 at A/F ratio: …
1.8.4. | L1e — L7e | Maximum net torque combustion engine: … Nm at … min-1 at A/F ratio: …
1.8.5. | L1e — L7e | Maximum continuous-rated power electric motor (15/30(4) minutes power(27)): … kW at … min–1
1.8.6. | L1e — L7e | Maximum continuous-rated torque electric motor: … Nm at … min-1
1.8.7. | L1e — L7e | Maximum continuous total power for propulsion(s): … kW at … min-1 at A/F ratio: …
1.8.8. | L1e — L7e | Maximum continuous total torque for propulsion(s): … Nm at … min-1 at A/F ratio: …
1.8.9. | L1e — L7e | Maximum peak power for propulsion(s): … kW at … min-1 at A/F ratio: …
4. | | GENERAL INFORMATION ON ENVIRONMENTAL AND PROPULSION UNIT PERFORMANCE
4.0 | | General information on environmental and propulsion performance
4.0.1. | L1e — L7e | Environmental step: Euro (3/4/5/5+) (4)
4.0.2. | L1e — L7e | Fuel consumption (provide details for each reference fuel tested) … l/kg (4) /100 km
4.0.3. | L1e — L7e | CO 2 emissions (25) : … g/km
4.0.4. | L1e — L7e | Energy consumption (25) : … Wh/km
4.0.5. | L1e — L7e | Electric range (25) : … km
4.0.6. | | Sound level
4.0.6.1. | L3e | Limit value for L urban (16) : … dB(A)
4.4. | | Additional information on environmental and propulsion unit performance
4.4.4. | L1e — L7e | Applicable information document set out in respectively UN Regulation No 92 shall supplement this information document with regards to the noise-abatement devices installed on the vehicle.
Appendix 8

Model information document relating to EU type-approval of an exhaust (pollution-control device and noise-abatement device) as a STU
| (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21) : …
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: … km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed (22): … km/h and gear in which it is reached: …
1.8.3. | L1e — L7e | Maximum net power combustion engine: … kW at … min–1 at A/F ratio: …
1.8.4. | L1e — L7e | Maximum net torque combustion engine: … Nm at … min–1 at A/F ratio: …
1.8.5. | L1e — L7e | Maximum continuous-rated power electric motor (15/30(4) minutes power(27)): … kW at … min–1
1.8.6. | L1e — L7e | Maximum continuous-rated torque electric motor: … Nm at … min–1
1.8.7. | L1e — L7e | Maximum continuous total power for propulsion(s): … kW at … min–1 at A/F ratio: …
1.8.8. | L1e — L7e | Maximum continuous total torque for propulsion(s): … Nm at … min–1 at A/F ratio: …
1.8.9. | L1e — L7e | Maximum peak power for propulsion(s): … kW at … min–1 at A/F ratio: …
4. | | GENERAL INFORMATION ON ENVIRONMENTAL AND PROPULSION UNIT PERFORMANCE
4.0 | | General information on environmental and propulsion performance
4.0.1. | L1e — L7e | Environmental step: Euro (3/4/5/5+) (4)
4.0.2. | L1e — L7e | Fuel consumption (provide details for each reference fuel tested) … l/kg (4) /100 km
4.0.3. | L1e — L7e | CO 2 emissions (25) : … g/km
4.0.4. | L1e — L7e | Energy consumption (25) : … Wh/km
4.0.5. | L1e — L7e | Electric range (25) : … km
4.0.6. | | Sound level
4.0.6.1. | L3e | Limit value for L urban (16) : … dB(A)
4.1. | | Tailpipe emission-control system
4.1.1. | L1e — L7e | Brief description and schematic drawing of the tailpipe emission-control system and its control: …
4.1.2. | | Catalytic converter
4.1.2.1. | L1e — L7e | Configuration, number of catalytic converters and elements (information to be provided for each separate unit): …
4.1.2.2. | L1e — L7e | Drawing with dimensions, shape and volume of the catalytic converter(s): …
4.1.2.3. | L1e — L7e | Catalytic reaction: …
* 4.1.2.4. | L1e — L7e | Total charge of precious metals: …
* 4.1.2.5. | L1e — L7e | Relative concentration: …
* 4.1.2.6. | L1e — L7e | Substrate (structure and material): …
* 4.1.2.7. | L1e — L7e | Cell density: …
* 4.1.2.8. | L1e — L7e | Casing for the catalytic converter(s): …
4.1.2.9. | L1e — L7e | Location of the catalytic converter(s) (place and reference distance in the exhaust line): …
4.1.2.10. | L1e — L7e | Catalyst heat-shield: yes/no(4)
4.1.2.11. | L1e — L7e | Brief description and schematic drawing of the regeneration system/method of exhaust after-treatment systems and its control system: …
4.1.2.11.1. | L1e — L7e | Normal operating temperature range: … K
4.1.2.11.2. | L1e — L7e | Consumable reagents: yes/no(4)
4.1.2.11.3. | L1e — L7e | Brief description and schematic drawing of the reagent flow (wet) system and its control system: …
4.1.2.11.4. | L1e — L7e | Type and concentration of reagent needed for catalytic action:
4.1.2.11.5. | L1e — L7e | Normal operational temperature range of reagent: … K
4.1.2.11.6. | L1e — L7e | Frequency of reagent refill: continuous/maintenance(4)
4.1.2.12. | L1e — L7e | Identifying part number: …
4.1.3. | | Oxygen sensor(s)
4.1.3.1. | L1e — L7e | Oxygen sensor component(s) drawing(s): …
4.1.3.2. | L1e — L7e | Drawing of exhaust device with oxygen sensor location(s) (dimensions relative to exhaust valves): …
4.1.3.3. | L1e — L7e | Control range(s): …
4.1.3.4. | L1e — L7e | Identifying part number(s): …
4.1.3.5. | L1e — L7e | Description of oxygen sensor heating system and heating strategy: …
4.1.3.6. | L1e — L7e | Oxygen sensor heat shield(s): yes/no(4)
4.1.4. | | Secondary air-injection (air-inject in exhaust)
4.1.4.1. | L1e — L7e | Brief description and schematic drawing of the secondary air-injection system and its control system: …
4.1.4.2. | L1e — L7e | Configuration (mechanical, pulse air, air pump etc.)(4): …
4.1.4.3. | L1e — L7e | Working principle: …
4.1.5. | | External exhaust gas recirculation (EGR)
4.1.5.1. | L1e — L7e | Brief description and schematic drawing of the EGR system (exhaust flow) and its control system: …
4.1.5.2. | L1e — L7e | Characteristics: …
4.1.5.3. | L1e — L7e | Water-cooled EGR system: yes/no (4)
4.1.5.4. | L1e — L7e | Air-cooled EGR system: yes/no (4)
4.1.6. | | Particulate filter
4.1.6.1. | L1e — L7e | PT component drawing with dimensions, shape and capacity of the particulate filter: …
4.1.6.2. | L1e — L7e | Design of the particulate filter: …
4.1.6.3. | L1e — L7e | Brief description and schematic drawing of the particulate filter and its control system: …
4.1.6.4. | L1e — L7e | Location (reference distance in the exhaust line): …
4.1.6.5. | L1e — L7e | Method or system of regeneration, description and drawing: …
4.1.7. | | Lean NOx trap
4.1.7.1. | L1e — L7e | Operation principle of lean NOx trap: …
4.1.8. | | Additional tailpipe emission-control devices (if any not covered under another heading)
4.1.8.1. | L1e — L7e | Working principle:
4.4. | | Additional information on environmental and propulsion unit performance
4.4.4. | L1e — L7e | Applicable information document set out in respectively UN Regulation No 92 shall supplement this information document with regards to the noise-abatement devices installed on the vehicle.
Appendix 8a

Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) an installation of audible warning devices system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer's authorised representative, if any: …
0.10. | | Vehicle(s) for which the separate technical unit is intended for (21) : …
0.10.1. | L1e — L7e | Type (17) : …
0.10.2. | L1e — L7e | Variant (17) : …
0.10.3. | L1e — L7e | Version (17) : …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle (2) : …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.1. | | Audible warning devices
6.1.1. | L1e — L7e | Summary description of device(s) used and their purpose: …
6.1.2. | L1e — L7e | Drawing(s) showing the location of the audible warning device(s) in relation to the structure of the vehicle: …
6.1.3. | L1e — L7e | Details of the method of attachment, including the part of the vehicle structure to which the audible warning device(s) is (are) attached: …
6.1.4. | L1e — L7e | Electrical/pneumatic circuit diagram: …
6.1.4.1. | L1e — L7e | Voltage: AC/DC (4)
6.1.4.2. | L1e — L7e | Rated voltage or pressure: …
6.1.5. | L1e — L7e | Drawing of the mounting device: …
Appendix 9

Model information document relating to EU type-approval of a type of a type of a vehicle with regard to(4) a braking system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21) :
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
0.11. | L1e — L7e | Type-approval marks for components and separate technical units(19) : …
0.11.1. | L1e — L7e | Method of attachment: …
0.11.2. | L1e — L7e | Photographs and/or drawings of the location of the type-approval mark (completed example with dimensions): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: … km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed (22): … km/h and gear in which it is reached: …
1.8.3. | L1e — L7e | Maximum net power combustion engine: … kW at … min-1 at A/F ratio: …
1.8.4. | L1e — L7e | Maximum net torque combustion engine: … Nm at … min-1 at A/F ratio: …
1.8.5. | L1e — L7e | Maximum continuous-rated power electric motor (15/30(4) minutes power(27)): … kW at … min–1
1.8.6. | L1e — L7e | Maximum continuous-rated torque electric motor: … Nm at … min-1
1.8.7. | L1e — L7e | Maximum continuous total power for propulsion(s): … kW at … min-1 at A/F ratio: …
1.8.8. | L1e — L7e | Maximum continuous total torque for propulsion(s): … Nm at … min-1 at A/F ratio: …
1.8.9. | L1e — L7e | Maximum peak power for propulsion(s): … kW at … min-1 at A/F ratio: …
2. | | MASSES AND DIMENSIONS
| | (in kg and mm.) Refer to drawings where applicable
2.1 | | Range of vehicle mass (overall)
2.1.1. | L1e — L7e | Mass in running order: … kg
2.1.1.1. | L1e — L7e | Distribution of mass in running order between the axles: … kg
2.1.3. | L1e — L7e | Technically permissible maximum laden mass: … kg
2.1.3.1. | L1e — L7e | Technically permissible maximum mass on front axle: … kg
2.1.3.2. | L1e — L7e | Technically permissible maximum mass on rear axle: … kg
2.1.3.3. | L4e | Technically permissible maximum mass on sidecar axle: … kg
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.2. | | Braking, including anti-lock and combined braking systems
6.2.1. | L1e — L7e | Characteristics of the brakes, including details and drawings of the drums, discs, hoses, make and type of shoe/pad assemblies and/or linings, effective braking areas, radius of drums, shoes or discs, mass of drums, adjustment devices, relevant parts of the axle(s) and suspension, levers, pedals (4): …
6.2.2. | L1e — L7e | Operating diagram, description and/or drawing of the braking system, including details and drawings of the transmission and controls as well as a brief description of the electrical and/or electronic components used in the braking system(4):
6.2.2.1. | L1e — L7e | Front, rear and sidecar brakes, disc and/or drum(4):
6.2.2.2. | L1e — L7e | Parking braking system: …
6.2.2.3. | L1e — L7e | Any additional braking system: …
6.2.3. | L1e — L7e | Vehicle is equipped to tow a trailer with no brake/overrun brake/electric/pneumatic/hydraulic service brakes: yes/no(4): …
6.2.4. | L1e — L7e | Anti-lock/Combined braking system
6.2.4.1. | L1e — L7e | Anti-lock braking system: yes/no/optional(4)
6.2.4.2. | L1e — L7e | Combined braking system: yes/no/optional(4)
6.2.4.3. | L1e — L7e | Anti-lock and combined braking system: yes/no/optional(4)
6.2.4.4. | L1e — L7e | Schematic drawing(s): …
6.2.5. | L1e — L7e | Hydraulic reservoir(s): …
6.2.6. | L1e — L7e | Particular characteristics of the braking system(s): …
6.2.6.1. | L1e — L7e | Brake shoes and/or pads(4): …
6.2.6.2. | L1e — L7e | Linings and/or pads (indicate make, type, grade of material or identification mark): …
6.2.6.3. | L1e — L7e | Brake levers and/or pedals(4): …
6.2.6.4. | L1e — L7e | Other devices (where applicable): drawing and description: …
Appendix 9a

Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) an installation of glazing, windscreen wipers and defrosting and demisting devices system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer's authorised representative, if any: …
0.10. | | Vehicle(s) for which the separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type (17) : …
0.10.2. | L1e — L7e | Variant (17) : …
0.10.3. | L1e — L7e | Version (17) : …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle (2) : …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.7. | L4e, L5e-B, L6e-B, L7e-A2, L7e-B2, L7e-C | Hand of drive: left/right/centre (4) : …
1.7.1. | L1e — L7e | Vehicle is equipped to be driven in right/left-hand traffic and in countries that use metric/metric and imperial units (4) : …
3. | | GENERAL POWERTRAIN CHARACTERISTICS
3.1 | | Manufacturer of the propulsion unit
3.1.1. | | Combustion engine
3.1.1.1. | L1e — L7e | Manufacturer: …
3.1.1.2. | L1e — L7e | Engine code (as marked on the engine or other means of identification): …
3.1.2. | | Electric motor
3.1.2.1. | L1e — L7e | Manufacturer: …
3.1.2.2. | L1e — L7e | Electric motor code (as marked on the engine or other means of identification): …
3.1.3. | | Hybrid application
3.1.3.1. | L1e — L7e | Manufacturer: …
3.1.3.2. | L1e — L7e | Application code (as marked on the engine or other means of identification): …
3.2. | | Combustion engine
3.2.1. | | Specific engine information
3.2.1.2. | L1e — L7e | Working principle: internal combustion engine (ICE)/positive ignition/compression ignition/external combustion engine (ECE)/turbine/compressed air (4) : …
3.2.1.3. | L1e — L7e | Cycle: four-stroke/two-stroke/rotary/other (4) : …
3.2.1.4. | L1e — L7e | Cylinders
3.2.1.4.1. | L1e — L7e | Number: …
3.2.1.4.2. | L1e — L7e | Arrangement (26) : …
3.2.1.5. | L1e — L7e | Engine capacity (6) : … cm 3
3.2.1.9. | L1e — L7e | Normal warm engine idling speed: … min -1
3.2.3. | | Fuel
3.2.3.1. | L1e — L7e | Fuel type: (9)
3.2.3.2. | L1e — L7e | Vehicle fuel configuration: mono-fuel/bi- fuel/flex fuel (4)
3.2.10. | | Powertrain cooling system and control
3.2.10.2. | L1e — L7e | Cooling system: liquid: yes/no (4)
3.2.10.2.2. | L1e — L7e | Nominal setting of the engine temperature control mechanism: …
3.2.10.2.3. | L1e — L7e | Nature of liquid: …
3.2.10.2.4. | L1e — L7e | Circulating pump(s): yes/no (4)
3.2.10.2.4.1. | L1e — L7e | Characteristics: …
3.2.10.2.5. | L1e — L7e | Drive ratio(s): …
3.2.10.2.6. | L1e — L7e | Description of the fan and its drive mechanism: …
3.2.10.3. | L1e — L7e | Air cooling: yes/no (4)
3.2.10.3.3. | L1e — L7e) | Fan: yes/no (4)
3.2.10.3.3.1. | L1e — L7e | Characteristics: …
3.2.13. | | Other electrical systems and control than those intended for the electrical propulsion
3.2.13.1. | L1e — L7e | Rated voltage: … V, positive/negative ground (4)
3.2.13.2. | L1e — L7e | Generator: yes/no (4) :
3.2.13.2.1. | L1e — L7e | Nominal output: … VA
3.3. | | Pure electric and hybrid electric propulsion and control
3.3.3. | | Electric propulsion motor
3.3.3.2. | L1e — L7e | Type (winding, excitation): …
3.3.3.3. | L1e — L7e | Operating voltage: … V
3.3.4. | | Propulsion batteries
3.3.4.1. | L1e — L7e | Primary propulsion battery
3.3.4.1.1. | L1e — L7e | Number of cells: …
3.3.4.1.2. | L1e — L7e | Mass: …kg
3.3.4.1.3. | L1e — L7e | Capacity: … Ah (Amp-hours) / … V
3.3.4.1.5. | L1e — L7e | Position in the vehicle: …
3.3.4.2. | L1e — L7e | Secondary propulsion battery
3.3.4.2.1. | L1e — L7e | Number of cells: …
3.3.4.2.2. | L1e — L7e | Mass: … kg
3.3.4.2.3. | L1e — L7e | Capacity: … Ah (Amp-hours) / … V
3.3.4.2.5. | L1e — L7e | Position in the vehicle: …
3.3.5. | | Hybrid electric vehicle
3.3.5.1. | L1e — L7e | Engine or motor combination (number of electric motor(s) and/or combustion engine(s)/other) (4) : …
3.3.5.2. | L1e — L7e | Category of hybrid electric vehicle: off-vehicle charging/not off-vehicle charging:
3.3.5.3. | L1e — L7e | Operating mode switch: with/without (4)
3.3.5.4. | L1e — L7e | Selectable modes: yes/no (4)
3.3.5.5. | L1e — L7e | Pure fuel consuming: yes/no (4)
3.3.5.6. | L1e — L7e | Vehicle propelled with fuel cell: yes/no (4)
3.3.5.7. | L1e — L7e | Hybrid operation modes: yes/no (4) (if yes, short description): …
3.3.6. | | Energy storage device
3.3.6.1. | L1e — L7e | Description: (battery, capacitor, flywheel/generator) (4)
3.3.6.2. | L1e — L7e | Identification number: …
* 3.3.6.3. | L1e — L7e | Kind of electrochemical couple: …
3.3.6.4. | L1e — L7e | Energy (for battery: voltage and capacity Ah in 2h, for capacitor: J,…, for flywheel/generator: J,…,): …
3.3.6.5. | L1e — L7e | Charger: on-board/external/without (4)
3.4. | | Other engines, electric motors or combinations (specific information concerning the parts of these motors)
3.4.1. | | Cooling system (temperatures permitted by the manufacturer)
3.4.1.1. | L1e — L7e | Liquid cooling: …
3.4.1.1.1. | L1e — L7e | Maximum temperature at outlet: … K
3.4.1.2. | L1e — L7e | Air cooling: …
3.4.1.2.1. | L1e — L7e | Reference point: …
3.4.1.2.2. | L1e — L7e | Maximum temperature at reference point: … K
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.5. | | Glazing, windscreen wipers and washers, and defrosting and demisting systems
6.5.1. | | Windscreen
6.5.1.1. | L2e, L5e, L6e, L7e | Materials used: …
6.5.1.2. | L2e, L5e, L6e, L7e | Method of mounting: …
6.5.1.3. | L2e, L5e, L6e, L7e | Angle of inclination: …
6.5.1.4. | L2e, L5e, L6e, L7e | Windscreen accessories and the position in which they are fitted, together with a brief description of any electrical/electronic components: …
6.5.1.5. | L2e, L5e, L6e, L7e | Drawing of the windscreen with dimensions: …
6.5.2. | | Other windows
6.5.2.1. | L2e, L5e, L6e, L7e | Materials used: …
6.5.2.2 | L2e, L5e, L6e, L7e | A brief description of the electrical/electronic components (if any) of the window lifting mechanism: …
6.5.3. | | Opening roof glazing
6.5.3.1. | L2e, L5e, L6e, L7e | Materials used: …
6.5.4. | | Other glass panes
6.5.4.1. | L2e, L5e, L6e, L7e | Materials used: …
6.6. | | Windscreen wiper(s)
6.6.1. | L2e, L5e, L6e, L7e | Detailed technical description (including photographs or drawings): …
6.7. | | Windscreen washer
6.7.1. | L2e, L5e, L6e, L7e | Detailed technical description (including photographs or drawings): …
6.7.2. | L2e, L5e, L6e, L7e | Capacity of the reservoir: …l
6.8. | | Defrosting and demisting
6.8.1. | L2e, L5e, L6e, L7e | Detailed technical description (including photographs or drawings): …
6.16. | | Seating positions (saddles and seats)
6.16.1. | L1e — L7e | Number of seating positions: …
6.16.1.1. | L2e, L5e, L6e, L7e | Location and arrangement (8) : …
6.16.4. | L2e, L4e, L5e-B, L6e-B, L7e | Coordinates or drawing of the R-point(s) of all seating positions: …
6.16.4.1. | L2e, L4e, L5e-B, L6e-B, L7e | Driver's seat: …
6.16.5. | L1e — L7e | Design torso angle: …
6.16.5.1. | L1e — L7e | Driver's seat: …
6.20. | | Vehicle occupant protection, including interior fittings and vehicle doors
6.20.1. | | Bodywork
6.20.1.1. | L2e, L5e-B, L6e-B, L7e | Materials used and methods of construction: …
6.20.2. | | Occupant doors, latches and hinges
6.20.2.1. | L2e, L5e, L6e, L7e | Number of doors, and its configuration, dimensions and maximum angle of opening (5) : …
6.20.3. | | Interior protection for occupants)
6.20.3.1. | L2e, L5e, L6e, L7e | Photographs, drawings and/or an exploded view of the interior fittings, showing the parts in the passenger compartment and the materials used (with the exception of interior rear view mirrors, arrangement of controls, seats and the rear part of seats), roof and opening roof, backrest: …
Appendix 9b

Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) an identification of controls, te ll-tales and indicators system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer's authorised representative, if any: …
0.10. | | Vehicle(s) for which the separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type (17) : …
0.10.2. | L1e — L7e | Variant (17) : …
0.10.3. | L1e — L7e | Version (17) : …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle (2) : …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.7. | L4e, L5e-B, L6e-B, L7e-A2, L7e-B2, L7e-C | Hand of drive: left/right/centre (4) : …
6.9. | | Driver-operated controls including identification of controls, tell-tales and indicators
6.9.1. | L1e — L7e | Arrangement and identification of controls, tell-tales and indicators: …
6.9.2. | L1e — L7e | Photographs and/or drawings of the arrangement of symbols and controls, tell-tales and indicators: …
6.9.3. | L1e — L7e | Controls, tell-tales and indicators for which, when fitted, identification is mandatory, including the identification symbols to be used for that purpose:
6.9.4. | L1e — L7e | Summary table: the vehicle is equipped with the following driver-operated controls, including indicators and tell-tales (4) Controls, tell-tales and indicators for which, when fitted, identification is mandatory, and symbols to be used for that purpose 1. x - yes - - no or not separately available o - optional. 1. d - directly on control, indicator or tell-tale c - in close vicinity. Symbol No | Device | Control / indicator available | Identified by symbol | Where | Tell-tale available | Identified by symbol | Where 1 | Master light | | | | | | 2 | Dipped-beam head lamps | | | | | | 3 | Main-beam head lamps | | | | | | 4 | Position (side) lamps | | | | | | 5 | Front fog lamps | | | | | | 6 | Rear fog lamp | | | | | | 7 | Headlamp levelling device | | | | | | 8 | Parking lamps | | | | | | 9 | Direction indicators | | | | | | 10 | Hazard warning | | | | | | 11 | Windscreen wiper | | | | | | 12 | Windscreen washer | | | | | | 13 | Windscreen wiper and washer | | | | | | 14 | Headlamp cleaning device | | | | | | 15 | Windscreen demisting and defrosting | | | | | | 16 | Rear window demisting and defrosting | | | | | | 17 | Ventilating fan | | | | | | 18 | Diesel pre-heat | | | | | | 19 | Choke | | | | | | 20 | Brake failure | | | | | | 21 | Fuel level | | | | | | 22 | Battery charging condition | | | | | | 23 | Engine coolant temperature | | | | | | 24 | Malfunction indicator light (MI) | | | | | |
6.9.5. | L1e — L7e | Controls, tell-tales and indicators for which, when fitted, identification is optional, and symbols which shall be used if they are to be identified 1. x - yes - - no or not separately available o - optional. 1. d - directly on control, indicator or tell-tale c - in close vicinity. Symbol No | Device | Control / indicator available | Identified by symbol | Where | Tell-tale available | Identified by symbol | Where 1 | Parking brake | | | | | | 2 | Rear window wiper | | | | | | 3 | Rear window washer | | | | | | 4 | Rear window wiper and washer | | | | | | 5 | Intermittent windscreen wiper | | | | | | 6 | Audible warning device (horn) | | | | | | 7 | Front hood (bonnet) | | | | | | 8 | Rear hood (boot) | | | | | | 9 | Seat belt | | | | | | 10 | Engine oil pressure | | | | | | 11 | Unleaded petrol | | | | | | 12 | … | | | | | | 13 | … | | | | | |
Appendix 10

Model information document relating to EU type-approval of a type of/a type of a vehicle with regard to(4) an installation of lighting and light-signalling devices system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21):
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
0.11. | L1e — L7e | Type-approval marks for components and separate technical units(19): …
0.11.1. | L1e — L7e | Method of attachment: …
0.11.2. | L1e — L7e | Photographs and/or drawings of the location of the type-approval mark (completed example with dimensions): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.11. | | Installation of lighting, light-signalling devices, including automatic switching of lighting
6.11.1. | L1e — L7e | List of all devices (mentioning the number, make(s),type, component type-approval mark(s), the maximum intensity of the main-beam headlamps, colour, the corresponding tell-tale): …
6.11.2. | L1e — L7e | Diagram showing the location of the lighting and light-signalling devices: …
6.11.3. | L1e — L7e | Hazard warning lamps: …
6.11.4. | L1e — L7e | Brief description of the electrical and/or electronic components used in the lighting system and in the light-signalling system: …
6.11.5. | L1e — L7e | For every lamp and reflector, supply the following information (in writing and/or by diagram):
6.11.5.1. | L1e — L7e | Drawing showing the extent of the illuminating surface: …
6.11.5.2. | L1e — L7e | Method used to define the apparent surface in accordance with point 2.10 of UNECE Regulation No 48 (OJ L 323, 6.12.2011, p. 46): …
6.11.5.3. | L1e — L7e | Axis of reference and centre of reference: …
6.11.5.4. | L1e — L7e | Method of operation of concealable lamps: …
6.11.6. | L1e — L7e | Description/drawing and type of headlamp levelling device (e.g. automatic, stepwise manually adjustable, continuously manually adjustable)(4): …
6.11.6.1. | L1e — L7e | Control device: …
6.11.6.2. | L1e — L7e | Reference marks: …
6.11.6.3. | L1e — L7e | Marks assigned for loading conditions: …
Appendix 11

Model information document relating to EU type-approval of a type of/a type of a vehicle with regard to(4) a roll-over protective structure (ROPS) system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21):
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
0.11. | L1e — L7e | Type-approval marks for components and separate technical units(19): …
0.11.1. | L1e — L7e | Method of attachment: …
0.11.2. | L1e — L7e | Photographs and/or drawings of the location of the type-approval mark (completed example with dimensions): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.13. | | Rollover protective structure (ROPS)
6.13.1. | L7e-B2 | Detailed technical description, position, fixing, etc. (including photographs or drawings): …
6.13.2. | | ROPS by Frame(4)
6.13.2.1. | L7e-B2 | Internal and external dimensions: …
6.13.2.2. | L7e-B2 | Material(s) and method of construction: …
6.13.3. | | ROPS by Cab (4)
6.13.3.1. | L7e-B2 | Other weather protection arrangements (description): …
6.13.3.2. | L7e-B2 | Internal and external dimensions: …
6.13.4. | | ROPS by Roll bar(s) mounted at front/rear(4), fold-down/not fold down (4)
6.13.4.1. | L7e-B2 | Dimensions: …
6.13.4.2. | L7e-B2 | Material(s) and method of construction: …
Appendix 11a

Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a safety belt anchorages system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer's authorised representative, if any: …
0.10. | | Vehicle(s) for which the separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type (17) : …
0.10.2. | L1e — L7e | Variant (17) : …
0.10.3. | L1e — L7e | Version (17) : …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle (2) : …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.4. | L1e — L7e | Chassis (if any) (overall drawing): …
1.5. | L2e, L5e-B, L6e-B, L7e-A2, L7e-B2, L7e-C | Material used for the bodywork: …
1.7. | L4e, L5e-B, L6e-B, L7e-A2, L7e-B2, L7e-C | Hand of drive: left/right/centre (4) : …
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.14. | | Safety belts and/or other restraints
6.14.1. | L2e, L4e, L5e-B, L6e-B, L7e | Number and position of safety belts and restraint systems and seats on which they can be used, please fill out table below: (L = left side, R = right side, C = centre)
| | Safety belt configuration and associated information L = left, C = centre, R = right | | | Complete EU type-approval mark | Variant, if applicable | Belt adjustment device for height (indicate yes/no/optional) First row of seats | | L | | | C | | | R | | | Second row of seats | | L | | | C | | | R | | |
6.14.2. | L2e, L4e, L5e-B, L6e-B, L7e | Description of a specific type of belt, with one anchorage attached to the seat back-rest or incorporating an energy-dissipation device: …
6.14.3. | L2e, L4e, L5e-B, L6e-B, L7e | Number and location of the anchorages: …
6.14.4. | L2e, L4e, L5e-B, L6e-B, L7e | Brief description of electrical/electronic components: …
6.15. | | Safety belt anchorages
6.15.1. | L2e, L4e, L5e-B, L6e-B, L7e | Photographs and/or drawings of the bodywork showing the true, effective location and dimensions of the anchorages, together with an indication of the R-point: …
6.15.2. | L2e, L4e, L5e-B, L6e-B, L7e | Drawings of the anchorages and the parts of the vehicle structure to which they are attached (together with a statement on the nature of the materials used): …
6.15.3. | L2e, L4e, L5e-B, L6e-B, L7e | Designation of the types of belts(14) authorised for attachment to the anchorages on the vehicle: …
| | Safety-belt anchorage configuration and associated information | Anchorage location Vehicle structure | Seat structure First row of seats Right-hand seat | | Lower anchorages Upper anchorages | | outboard inboard | | Centre seat | | Lower anchorages Upper anchorages | | right left | | Left-hand seat | | Lower anchorages Upper anchorages | | outboard inboard | | Second row of seats Right-hand seat | | Lower anchorages Upper anchorages | | outboard inboard | | Centre seat | | Lower anchorages Upper anchorages | | right left | | Left-hand seat | | Lower anchorages Upper anchorages | | outboard inboard | |
6.15.4. | L2e, L4e, L5e-B, L6e-B, L7e | Type-approval mark for each position: …
6.15.5. | L2e, L4e, L5e-B, L6e-B, L7e | Special devices (example: seat-height adjustment, preloading device, etc.): …
6.15.6. | L2e, L4e, L5e-B, L6e-B, L7e | Photographs and/or drawings of the bodywork showing the true, effective location and dimensions of the anchorages, together with an indication of the R-point: …
6.15.7. | L2e, L4e, L5e-B, L6e-B, L7e | Observation: …
Appendix 11b

Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a steer-ability, cornering properties and turn ability system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer's authorised representative, if any: …
0.10. | | Vehicle(s) for which the separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type (17) : …
0.10.2. | L1e — L7e | Variant (17) : …
0.10.3. | L1e — L7e | Version (17) : …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle (2) : …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.1. | L1e — L7e | Photographs and/or drawings of a representative vehicle: …
1.3. | L1e — L7e | Number of axles and wheels: …
1.3.1. | L1e — L7e | Axles with twinned wheels (23) : …
1.3.2. | L1e — L7e | Powered axles (23) : …
1.7. | L4e, L5e-B, L6e-B, L7e-A2, L7e-B2, L7e-C | Hand of drive: left/right/centre (4) : …
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: … km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed (22) : … km/h and gear in which it is reached: …
2. | | MASSES AND DIMENSIONS (in kg and mm.) refer to drawings where applicable
2.1 | | Range of vehicle mass (overall)
2.1.3. | L1e — L7e | Technically permissible maximum laden mass: … kg
2.1.3.1. | L1e — L7e | Technically permissible maximum mass on front axle: … kg
2.1.3.2. | L1e — L7e | Technically permissible maximum mass on rear axle: … kg
2.1.3.3. | L4e | Technically permissible maximum mass on sidecar axle: … kg
2.2. | | Range of vehicle dimensions (overall)
2.2.1. | L1e — L7e | Length: … mm
2.2.2. | L1e — L7e | Width: … mm
2.2.3. | L1e — L7e | Height: … mm
2.2.4. | L1e — L7e | Wheelbase: … mm
2.2.4.1. | L4e | Wheelbase sidecar (28) : … mm
2.2.5. | | Track width
2.2.5.1. | L1e — L7e if equipped with twinned wheels L2e, L4e, L5e, L6e, L7e | Track width front: … mm
2.2.5.2. | L1e — L7e if equipped with twinned wheels | Track width rear: … mm
2.2.5.3. | L2e, L4e, L5e, L6e, L7e | Track width sidecar: … mm
2.2.6. | L7e-B | Front overhang: … mm
2.2.7. | L7e-B | Rear overhang: … mm
3. | | GENERAL POWERTRAIN CHARACTERISTICS
3.5. | | Drive-train and control (13)
3.5.1. | L1e — L7e | Brief description and schematic drawing of the vehicle drive-train and its control system (gear shift control, clutch control or any other element of drive-train): …
3.6. | | Safe-cornering device
3.6.1. | L1e — L7e equipped with twinned wheels, L2e, L5e, L6e, L7e | Safe-cornering device (Annex VIII to Regulation (EU) No 168/2013: yes/no (4) ; differential/other (4)
3.6.2. | L1e — L7e equipped with twinned wheels, L2e, L5e, L6e, L7e | Differential lock: yes/no/optional (4)
3.6.3. | L1e — L7e | Brief description and schematic drawing of the safe-cornering device, the differential lock and their control systems: …
3.7. | | Suspension and control
3.7.1. | L1e — L7e | Brief description and schematic drawing of suspension and its control system: …
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.17. | | Steer-ability, cornering properties and turn-ability
6.17.1. | L1e — L7e | Schematic diagram of steered axle(s) showing steering geometry: …
6.17.2. | | Transmission and control of steering
6.17.2.1. | L1e — L7e | Configuration of steering transmission (specify for front and rear): …
6.17.2.2. | L1e — L7e | Linkage to wheels (including other than mechanical means; specify for front and rear): …
6.17.2.2.1. | L1e — L7e | A brief description of the electrical/electronic components: …
6.17.2.3. | L1e — L7e | Diagram of the steering transmission: …
6.17.2.4. | L2e, L5e, L6e, L7e | Schematic diagram(s) of the steering control(s): …
6.17.2.5. | L2e, L5e, L6e, L7e | Range and method of adjustment of the steering control(s): …
6.17.2.6. | L2e, L5e, L6e, L7e | Method of assistance: …
6.17.3. | | Maximum steering angle of the wheels
6.17.3.1. | L1e — L7e | To the right: …degrees; number of turns of the steering wheel (or equivalent data): …
6.17.3.2. | L1e — L7e | To the left: …degrees; number of turns of the steering wheel (or equivalent data): …
6.18. | | Tyres/wheels combination
6.18.1. | | Tyres:
6.18.1.1. | | Size designation
6.18.1.1.1. | L1e — L7e | Axle 1: …
6.18.1.1.2. | L1e — L7e | Axle 2: …
6.18.1.1.3. | L4e | Sidecar wheel: …
6.18.1.4. | L1e — L7e | Tyre pressure(s) as recommended by the vehicle manufacturer: … kPa
Appendix 12

Model information document relating to EU type-approval of a type of/a type of a vehicle with regard to (4) an installation of tyres system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
0.11. | L1e — L7e | Type-approval marks for components and separate technical units (19) : …
0.11.1. | L1e — L7e | Method of attachment: …
0.11.2. | L1e — L7e | Photographs and/or drawings of the location of the type-approval mark (completed example with dimensions):…
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: … km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed (22): … km/h and gear in which it is reached: …
1.8.3. | L1e — L7e | Maximum net power combustion engine: … kW at … min–1 at A/F ratio: …
1.8.4. | L1e — L7e | Maximum net torque combustion engine: … Nm at … min–1 at A/F ratio: …
1.8.5. | L1e — L7e | Maximum continuous-rated power electric motor (15/30(4) minutes power(27)): … kW at … min–1
1.8.6. | L1e — L7e | Maximum continuous-rated torque electric motor: … Nm at … min–1
1.8.7. | L1e — L7e | Maximum continuous total power for propulsion(s): … kW at … min–1 at A/F ratio: …
1.8.8. | L1e — L7e | Maximum continuous total torque for propulsion(s): … Nm at … min–1at A/F ratio: …
1.8.9. | L1e — L7e | Maximum peak power for propulsion(s): … kW at … min–1at A/F ratio: …
2. | | MASSES AND DIMENSIONS
| | (in kg and mm.) Refer to drawings where applicable
2.1 | | Range of vehicle mass (overall)
2.1.1. | L1e — L7e | Mass in running order: … kg
2.1.1.1. | L1e — L7e | Distribution of mass in running order between the axles: … kg
2.1.2. | L1e — L7e | Actual mass: … kg
2.1.2.1. | L1e — L7e | Distribution of actual mass between the axles: … kg
2.1.3. | L1e — L7e | Technically permissible maximum laden mass: … kg
2.1.3.1. | L1e — L7e | Technically permissible maximum mass on front axle: … kg
2.1.3.2. | L1e — L7e | Technically permissible maximum mass on rear axle: … kg
2.1.3.3. | L4e | Technically permissible maximum mass on sidecar axle: … kg
2.1.5. | L1e — L7e | Maximum pay mass declared by manufacturer: … kg
2.1.7. | L1e — L7e | Technically permissible maximum towable mass in case of (4): Braked: … kg Unbraked: … kg
2.1.7.1 | L1e — L7e | Technically permissible maximum laden mass of the combination: … kg
2.1.7.2. | L1e — L7e | Technically permissible maximum mass at the coupling point: … kg
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.18. | | Tyres/wheels combination
6.18.1. | | Tyres:
6.18.1.1. | | Size designation
6.18.1.1.1. | L1e — L7e | Axle 1: …
6.18.1.1.2. | L1e — L7e | Axle 2: …
6.18.1.1.3. | L4e | Sidecar wheel: …
6.18.1.2. | L1e — L7e | Minimum load-capacity index: … with the maximum load on each tyre: … kg
6.18.1.3. | L1e — L7e | Minimum-speed category symbol compatible with the theoretical maximum design vehicle speed:…
6.18.1.4. | L1e — L7e | Tyre pressure(s) as recommended by the vehicle manufacturer: … kPa
6.18.2. | | Wheels:
6.18.2.1. | L1e — L7e | Rim size(s): …
6.18.2.2. | L1e — L7e | Categories of use compatible with the vehicle: …
6.18.2.3. | L1e — L7e | Nominal rolling circumference: …
Appendix 13

Model information document relating to EU type-approval of an audible warning device as a component
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | L1e — L7e | Vehicle(s) for which the system/separate technical unit is intended for (21) : …
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.1. | | Audible warning devices
6.1.1. | L1e — L7e | Summary description of device(s) used and their purpose: …
6.1.2. | L1e — L7e | Drawing(s) showing the location of the audible warning device(s) in relation to the structure of the vehicle: …
6.1.4. | L1e — L7e | Electrical/pneumatic circuit diagram: …
6.1.4.1. | L1e — L7e | Voltage: AC/DC(4)
6.1.4.2. | L1e — L7e | Rated voltage or pressure: …
Appendix 13a

Model information document relating to EU type-approval of a type of (or a type of a vehicle with regard to) a vehicle occupant protection, including interior fittings, head restraint and vehicle doors system
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer's authorised representative, if any: …
0.10. | | Vehicle(s) for which the separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type (17) : …
0.10.2. | L1e — L7e | Variant (17) : …
0.10.3. | L1e — L7e | Version (17) : …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle (2) : …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.7. | L4e, L5e-B, L6e-B, L7e-A2, L7e-B2, L7e-C | Hand of drive: left/right/centre (4) : …
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.16. | | Seating positions (saddles and seats)
6.16.1. | L1e — L7e | Number of seating positions: …
6.16.1.1. | L2e, L5e, L6e, L7e | Location and arrangement (8) : …
6.16.2. | L1e — L7e | Seating position configuration: seat/saddle (4)
6.16.3. | L1e — L7e | Description and drawings of:
6.16.3.1. | L1e — L7e | The seats and their anchorages: …
6.16.3.2. | L1e — L7e | The adjustment system: …
6.16.3.3. | L1e — L7e | The displacement and locking systems: …
6.16.3.4. | L1e — L7e | The seat-belt anchorages incorporated in the seat structure: …
6.16.3.5. | L1e — L7e | The parts of the vehicle used as anchorages: …
6.16.4. | L2e, L4e, L5e-B, L6e-B, L7e | Coordinates or drawing of the R-point(s) of all seating positions: …
6.16.4.1. | L2e, L4e, L5e-B, L6e-B, L7e | Driver's seat: …
6.16.4.2. | L2e, L4e, L5e-B, L6e-B, L7e | All other seating positions: …
6.16.5. | L1e — L7e | Design torso angle: …
6.16.5.1. | L1e — L7e | Driver's seat: …
6.16.5.2. | L1e — L7e | All other seating positions: …
6.20. | | Vehicle occupant protection, including interior fittings and vehicle doors
6.20.1. | | Bodywork
6.20.1.1. | L2e, L5e-B, L6e-B, L7e | Materials used and methods of construction:
6.20.2. | | Occupant doors, latches and hinges
6.20.2.1. | L2e, L5e, L6e, L7e | Number of doors, and its configuration, dimensions and maximum angle of opening (5) : …
6.20.2.2. | L2e, L5e, L6e, L7e | Drawing of latches and hinges and of their position in the doors: …
6.20.2.3. | L2e, L5e, L6e, L7e | Technical description of latches and hinges: …
6.20.2.4. | L2e, L5e, L6e, L7e | Details, including dimensions, of entrances, steps and necessary handles where applicable: …
6.20.3. | | Interior protection for occupants)
6.20.3.1. | L2e, L5e, L6e, L7e | Photographs, drawings and/or an exploded view of the interior fittings, showing the parts in the passenger compartment and the materials used (with the exception of interior rear view mirrors, arrangement of controls, seats and the rear part of seats), roof and opening roof, backrest: …
6.20.4. | | Head restraints
6.20.4.1. | L2e, L5e, L6e, L7e | Head restraints: integrated/detachable/separate (4)
6.20.4.2. | L2e, L5e, L6e, L7e | Detailed description of the head restraint, specifying in particular the nature of the padding material or materials and, where applicable, the position and specifications of the braces and anchorage pieces for the type of seat for which approval is sought: …
6.20.4.3. | L2e, L5e, L6e, L7e | In the case of a ‘ separate ’ head restraint
6.20.4.3.1. | L2e, L5e, L6e, L7e | Detailed description of the structural zone to which the head restraint is intended to be fixed: …
6.20.4.3.2. | L2e, L5e, L6e, L7e | Scale drawings of the significant parts of the structure and the head restraint: …
Appendix 14

Model information document relating to EU type-approval of a non-glazing front windscreen as a component/STU
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.5. | | Glazing, windscreen wipers and washers, and defrosting and demisting systems
6.5.1. | | Windscreen
6.5.1.1. | L2e, L5e, L6e, L7e | Materials used: …
6.5.1.2. | L2e, L5e, L6e, L7e | Method of mounting: …
6.5.1.3. | L2e, L5e, L6e, L7e | Angle of inclination: …
6.5.1.4. | L2e, L5e, L6e, L7e | Windscreen accessories and the position in which they are fitted, together with a brief description of any electrical/electronic components: …
6.5.1.5. | L2e, L5e, L6e, L7e | Drawing of the windscreen with dimensions: …
Appendix 15

Model information document relating to EU type-approval of a windscreen washer device as a component/STU
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.7. | | Windscreen washer
6.7.1. | L2e, L5e, L6e, L7e | Detailed technical description (including photographs or drawings): …
6.7.2. | L2e, L5e, L6e, L7e | Capacity of the reservoir: … l
Appendix 16

Model information document relating to EU type-approval of a rearward visibility device as a component/STU
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.12. | | Rearward visibility
6.12.1. | | Rear-view mirrors (stating for each mirror)
6.12.1.1. | L1e — L7e | Drawing(s) for the identification of the mirror showing the position of the mirror relative to the vehicle structure: …
6.12.1.3. | L1e — L7e | A brief description of the electronic components of the adjustment system: …
6.12.2. | L1e — L7e | Devices for indirect vision other than mirrors
6.12.2.1. | L1e — L7e | Description of the device: …
6.12.2.2. | L1e — L7e | In the case of a camera-monitor device, the detection distance (mm), contrast, luminance range, glare correction, display performance (black and white/colour(4)), image repetition frequency, luminance reach of the monitor(4): …
6.12.2.3. | L1e — L7e | Sufficiently detailed drawings to identify the complete device, including installation instructions; the position for the EU type-approval mark has to be indicated on the drawings: …
Appendix 17

Model information document relating to EU type-approval of safety belts as a STU
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.14. | | Safety belts and/or other restraints
6.14.2. | L2e, L4e, L5e-B, L6e-B, L7e | Description of a specific type of belt, with one anchorage attached to the seat back-rest or incorporating an energy-dissipation device: …
6.14.3. | L2e, L4e, L5e-B, L6e-B, L7e | Number and location of the anchorages: …
6.14.4. | L2e, L4e, L5e-B, L6e-B, L7e | Brief description of electrical/electronic components: …
Appendix 18

Model information document relating to EU type-approval of a seating position (saddle/seat) as a component/STU
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.16. | | Seating positions (saddles and seats)
6.16.1. | L1e — L7e | Number of seating positions: …
6.16.1.1. | L2e, L5e, L6e, L7e | Location and arrangement(8): …
6.16.2. | L1e — L7e | Seating position configuration: seat/saddle(4)
6.16.3. | L1e — L7e | Description and drawings of:
6.16.3.1. | L1e — L7e | The seats and their anchorages: …
6.16.3.2. | L1e — L7e | The adjustment system: …
6.16.3.3. | L1e — L7e | The displacement and locking systems: …
6.16.3.4. | L1e — L7e | The seat-belt anchorages incorporated in the seat structure: …
6.16.3.5. | L1e — L7e | The parts of the vehicle used as anchorages: …
6.16.4. | L2e, L4e, L5e-B, L6e-B, L7e | Coordinates or drawing of the R-point(s) of all seating positions: …
6.16.4.1. | L2e, L4e, L5e-B, L6e-B, L7e | Driver’s seat: …
6.16.4.2. | L2e, L4e, L5e-B, L6e-B, L7e | All other seating positions: …
6.16.5. | L1e — L7e | Design torso angle: …
6.16.5.1. | L1e — L7e | Driver’s seat: …
6.16.5.2. | L1e — L7e | All other seating positions: …
6.16.6. | L1e — L7e | Range of seat adjustment: …
6.16.6.1. | L1e — L7e | Driver’s seat: …
6.16.6.2. | L1e — L7e | All other seating positions: …
Appendix 19

Model information document relating to EU type-approval of a trailer coupling device as a STU
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: … km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed(22): … km/h and gear in which it is reached: …
1.8.3. | L1e — L7e | Maximum net power combustion engine: … kW at … min–1 at A/F ratio: …
1.8.4. | L1e — L7e | Maximum net torque combustion engine: … Nm at … min–1 at A/F ratio: …
1.8.5. | L1e — L7e | Maximum continuous-rated power electric motor (15/30(4) minutes power(27)): … kW at … min–1
1.8.6. | L1e — L7e | Maximum continuous-rated torque electric motor: … Nm at … min–1
1.8.7. | L1e — L7e | Maximum continuous total power for propulsion(s): … kW at … min–1 at A/F ratio: …
1.8.8. | L1e — L7e | Maximum continuous total torque for propulsion(s): … Nm at … min–1at A/F ratio: …
1.8.9. | L1e — L7e | Maximum peak power for propulsion(s): … kW at … min–1 at A/F ratio: …
2. | | MASSES AND DIMENSIONS
| | (in kg and mm.) Refer to drawings where applicable
7. | | INFORMATION ON VEHICLE CONSTRUCTION
7.1. | | Coupling devices and attachments
7.1.1. | L1e — L7e | L-category vehicle equipped with coupling device: yes/no/optional(4)
7.1.2. | L1e — L7e | Guidelines and information for consumers in all EU languages regarding the impact on the driveability of using a trailer with an L-category vehicle included in the owner's manual: yes/no(4)
7.1.3. | L1e — L7e | For coupling-device approved as separate technical unit: installation and operating instructions added to documentation: yes/no(4)
7.1.4. | L1e — L7e | Photograph and/or drawings showing the position and the construction of the coupling-devices: …
7.1.5. | L1e — L7e | Instructions for attaching the coupling-type to the vehicle and photographs or drawings of the fixing points on the vehicle as stated by the manufacturer; additional information, if the use of the coupling-type is restricted to certain variants or versions of the vehicle type: …
7.1.6. | L1e — L7e | Attachment points for a secondary coupling and/or breakaway cable (drawings and pictures may be used as appropriate): yes/no(4)
Appendix 20

Model information document relating to EU type-approval of devices to prevent unauthorised use as a STU
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | | Company name and address of manufacturer:
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for(21) :
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
7. | | INFORMATION ON VEHICLE CONSTRUCTION
7.2. | | Devices to prevent unauthorised use
7.2.1. | | Protective device
7.2.1.1. | L1e — L7e | Summary description of protective device(s) used: …
7.2.2. | | Vehicle immobiliser
7.2.2.1. | L1e — L7e | Technical description of the vehicle immobiliser and of the measures taken against inadvertent activation: …
7.2.3. | | Alarm system
7.2.3.1. | L1e — L7e | Description of the alarm system and of the vehicle parts involved in its installation:. …
7.2.3.2. | L1e — L7e | List of the main components comprising the alarm system: …
Appendix 20a

Model information document relating to EU type-approval of a fuel tank as a STU
OJ L 120, 7.5.2011, p. 1 .
OJ L 72, 14.3.2008, p. 1 .
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer's authorised representative, if any: …
0.10. | | Vehicle(s) for which the separate technical unit is intended for (21) :
0.10.1. | L1e — L7e | Type (17) : …
0.10.2. | L1e — L7e | Variant (17) : …
0.10.3. | L1e — L7e | Version (17) : …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle (2) : …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
4. | | GENERAL INFORMATION ON ENVIRONMENTAL AND PROPULSION PERFORMANCE
4.3. | | Evaporative emission control system
4.3.7. | L1e — L7e | Schematic drawing of the fuel tank, indicating capacity and material:
7. | | INFORMATION ON VEHICLE CONSTRUCTION
7.5. | | Fuel storage
7.5.1.1. | | Fuel tank
7.5.1.1.1. | L1e — L7e | Maximum capacity: …
7.5.1.1.2. | L1e — L7e | Materials used: …
7.5.1.1.3. | L1e — L7e | Fuel tank inlet: restricted orifice/label (4) …
7.5.1.3. | L1e — L7e | Drawing and technical description of the tank with connections and lines of the breathing and venting system, locks, valves, fastening devices: …
7.5.2. | | Compressed natural gas (CNG) container
7.5.2.1. | L1e — L7e | Applicable information document set out in UNECE regulation No 110 as prescribed for vehicle category M1 shall supplement this information document with regards to the CNG container and related equipment.
7.5.3. | L1e — L7e | Liquefied petroleum gas (LPG)container(s)
7.5.3.1. | L1e — L7e | Applicable information document set out in UNECE regulation No 67 as prescribed for vehicle category M1 shall supplement this information document with regards to the LPG container and related equipment.
Appendix 21

Model information document relating to EU type-approval of passenger handholds as a STU
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for (21) : …
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
7. | | INFORMATION ON VEHICLE CONSTRUCTION
7.7. | | Passenger handholds and footrests
7.7.1. | | Handholds
7.7.1.1. | L1e — L7e | Configuration: strap and/or handle(4)
7.7.1.2. | L1e — L7e | Photographs and/or drawings showing the location and the construction: …
Appendix 22

Model information document relating to EU type-approval of footrests as a STU
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L1e — L7e | Make(s) (trade name(s) of manufacturer): …
0.8. | L1e — L7e | Type: …
0.8.1. | L1e — L7e | Commercial name(s) (if available): …
0.8.2. | L1e — L7e | Type-approval number(s) (if available): …
0.8.3. | L1e — L7e | Type-approval(s) issued on (date, if available): …
0.9. | L1e — L7e | Company name and address of manufacturer: …
0.9.1. | L1e — L7e | Name(s) and address(es) of assembly plants: …
0.9.2. | L1e — L7e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for (21) : …
0.10.1. | L1e — L7e | Type(17): …
0.10.2. | L1e — L7e | Variant(17): …
0.10.3. | L1e — L7e | Version(17): …
0.10.4. | L1e — L7e | Commercial name(s) (if available): …
0.10.5. | L1e — L7e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L1e — L7e | Description of overall quality-assurance management systems.
7.7. | | Passenger handholds and footrests
7.7.2. | | Footrests
7.7.2.2. | L1e — L7e | Photographs and/or drawings showing the location and the construction: …
Appendix 23

Model information document relating to EU type-approval of a side-car as a STU
Item No. | (Sub) categories | Detailed information
B. | | General information concerning systems, components or separate technical units
0.7. | L4e | Make(s) (trade name(s) of manufacturer): …
0.8. | L4e | Type: …
0.8.1. | L4e | Commercial name(s) (if available): …
0.8.2. | L4e | Type-approval number(s) (if available): …
0.8.3. | L4e | Type-approval(s) issued on (date, if available): …
0.9. | | Company name and address of manufacturer: …
0.9.1. | L4e | Name(s) and address(es) of assembly plants: …
0.9.2. | L4e | Name and address of manufacturer’s authorised representative, if any: …
0.10. | | Vehicle(s) for which the system/separate technical unit is intended for (21) :
0.10.1. | L4e | Type(17): …
0.10.2. | L4e | Variant(17): …
0.10.3. | L4e | Version(17): …
0.10.4. | L4e | Commercial name(s) (if available): …
0.10.5. | L4e | Category, subcategory and sub-subcategory of vehicle(2): …
C. | | General information concerning vehicle, systems, components or separate technical units
0.12. | | Conformity of production
0.12.1. | L4e | Description of overall quality-assurance management systems.
1. | | GENERAL CONSTRUCTION CHARACTERISTICS
1.8. | | Propulsion unit performance
1.8.1. | L3e, L4e, L5e, L7e-A, L7e-B2 | Declared maximum vehicle speed: … km/h
1.8.2. | L1e, L2e, L6e, L7e-B1, L7e-C | Maximum design vehicle speed(22): … km/h and gear in which it is reached: …
1.8.3. | L1e — L7e | Maximum net power combustion engine: … kW at … min–1 at A/F ratio: …
1.8.4. | L1e — L7e | Maximum net torque combustion engine: … Nm at … min–1 at A/F ratio: …
1.8.5. | L1e — L7e | Maximum continuous-rated power electric motor (15/30(4) minutes power(27)): … kW at … min–1
1.8.6. | L1e — L7e | Maximum continuous-rated torque electric motor: … Nm at … min–1
1.8.7. | L1e — L7e | Maximum continuous total power for propulsion(s): … kW at … min–1 at A/F ratio: …
1.8.8. | L1e — L7e | Maximum continuous total torque for propulsion(s): … Nm at … min–1at A/F ratio: …
1.8.9. | L1e — L7e | Maximum peak power for propulsion(s): … kW at … min–1at A/F ratio: …
2. | | MASSES AND DIMENSIONS
| | (in kg and mm.) Refer to drawings where applicable
2.1 | | Range of vehicle mass (overall)
2.1.1. | L4e | Mass in running order: … kg
2.1.1.1. | L4e | Distribution of mass in running order between the axles: … kg
2.1.2. | L4e | Actual mass: … kg
2.1.2.1. | L4e | Distribution of actual mass between the axles: … kg
2.1.3. | L4e | Technically permissible maximum laden mass: … kg
2.1.3.1. | L1e — L7e | Technically permissible maximum mass on front axle: … kg
2.1.3.2. | L1e — L7e | Technically permissible maximum mass on rear axle: … kg
2.1.3.3. | L4e | Technically permissible maximum mass on sidecar axle: … kg
2.1.4. | L4e | Maximum hill-starting ability at the maximum technically permissible mass declared by the manufacturer: … % slope
2.1.5. | L4e | Maximum pay mass declared by manufacturer: … kg
2.1.8. | L4e | Mass of the optional equipment: … kg
2.2. | | Range of vehicle dimensions (overall)
2.2.1. | L4e | Length: … mm
2.2.2. | L4e | Width: … mm
2.2.3. | L4e | Height: … mm
2.2.4. | L4e | Wheelbase: … mm Wheelbase sidecar(28): … mm
2.2.5. | | Track width
2.2.5.1. | L4e equipped with twinned wheels | Track width front: … mm.
2.2.5.2. | L4e equipped with twinned wheels | Track width rear: … mm.
2.2.5.3. | L4e | Track width sidecar: … mm.
6. | | INFORMATION ON FUNCTIONAL SAFETY
6.2. | | Braking, including anti-lock and combined braking systems
6.2.1. | L4e | Characteristics of the brakes, including details and drawings of the drums, discs, hoses, make and type of shoe/pad assemblies and/or linings, effective braking areas, radius of drums, shoes or discs, mass of drums, adjustment devices, relevant parts of the axle(s) and suspension, levers, pedals (4): …
6.2.2. | L4e | Operating diagram, description and/or drawing of the braking system, including details and drawings of the transmission and controls as well as a brief description of the electrical and/or electronic components used in the braking system(4) : …
6.2.2.1. | L4e | Front, rear and sidecar brakes, disc and/or drum(4): …
6.2.2.2. | L4e | Parking braking system: …
6.2.2.3. | L4e | Any additional braking system: …
6.2.4. | L4e | Anti-lock/Combined braking system
6.2.4.1. | L4e | Anti-lock braking system: yes/no/optional(4)
6.2.4.2. | L4e | Combined braking system: yes/no/optional(4)
6.2.4.3. | L4e | Anti-lock and combined braking system: yes/no/optional(4)
6.2.4.4. | L4e | Schematic drawing(s): …
6.2.5. | L4e | Hydraulic reservoir(s): …
6.2.6. | L4e | Particular characteristics of the braking system(s): …
6.2.6.1. | L4e | Brake shoes and/or pads(4): …
6.2.6.2. | L4e | Linings and/or pads (indicate make, type, grade of material or identification mark):. …
6.2.6.3. | L4e | Brake levers and/or pedals(4): …
6.2.6.4. | L4e | Other devices (where applicable): drawing and description: …
6.5. | | Glazing, windscreen wipers and washers, and defrosting and demisting systems
6.5.1. | | Windscreen
6.5.1.1. | L4e | Materials used: …
6.5.1.2. | L4e | Method of mounting: …
6.5.1.3. | L4e | Angle of inclination: …
6.5.1.4. | L4e | Windscreen accessories and the position in which they are fitted, together with a brief description of any electrical/electronic components: …
6.5.1.5. | L4e | Drawing of the windscreen with dimensions: …
6.11. | | Installation of lighting, light-signalling devices, including automatic switching of lighting
6.11.1. | L4e | List of all devices (mentioning the number, make(s),type, component type-approval mark(s), the maximum intensity of the main-beam headlamps, colour, the corresponding tell-tale): …
6.11.2. | L4e | Diagram showing the location of the lighting and light-signalling devices: …
6.11.3. | L4e | Hazard warning lamps: …
6.11.4. | L4e | Brief description of the electrical and/or electronic components used in the lighting system and in the light-signalling system: …
6.11.5. | L4e | For every lamp and reflector, supply the following information (in writing and/or by diagram): …
6.11.5.1. | L4e | Drawing showing the extent of the illuminating surface: …
6.11.5.2. | L4e | Method used to define the apparent surface in accordance with point 2.10 of UNECE Regulation No 48 (OJ L 323, 6.12.2011, p. 46): …
6.11.5.3. | L4e | Axis of reference and centre of reference: …
6.11.5.4. | L4e | Method of operation of concealable lamps: …
6.11.6. | L4e | Description/drawing and type of headlamp levelling device (e.g. automatic, stepwise manually adjustable, continuously manually adjustable)(4) : …
6.11.6.1. | L4e | Control device: …
6.11.6.2. | L4e | Reference marks: …
6.11.6.3. | L4e | Marks assigned for loading conditions: …
6.12. | | Rearward visibility
6.12.1. | | Rear-view mirrors (stating for each mirror)
6.12.1.1. | L4e | Drawing(s) for the identification of the mirror showing the position of the mirror relative to the vehicle structure: …
6.12.1.2. | L4e | Details of the method of attachment including that part of the vehicle structure to which it is attached: …
6.12.1.3. | L4e | A brief description of the electronic components of the adjustment system: …
6.12.2. | L4e | Devices for indirect vision other than mirrors
6.12.2.1. | L4e | Description of the device: …
6.12.2.2. | L4e | In the case of a camera-monitor device, the detection distance (mm), contrast, luminance range, glare correction, display performance (black and white/colour(4)), image repetition frequency, luminance reach of the monitor(4): …
6.12.2.3. | L4e | Sufficiently detailed drawings to identify the complete device, including installation instructions; the position for the EU type-approval mark has to be indicated on the drawings: …
6.14. | | Safety belts and/or other restraints
6.14.1. | L4e | Number and position of safety belts and restraint systems and seats on which they can be used, please fill out table below: (L = left side, R = right side, C = centre)
| | Safety belt configuration and associated information L = left, C= centre, R=right | | | Complete EU type-approval mark | Variant, if applicable | Belt adjustment device for height (indicate yes/no/optional) First row of seats | | C | | |
6.14.2. | L4e | Description of a specific type of belt, with one anchorage attached to the seat back-rest or incorporating an energy-dissipation device: …
6.14.3. | L4e | Number and location of the anchorages: …
6.14.4. | L4e | Brief description of electrical/electronic components: …
6.15. | L4e | Safety belt anchorages
6.15.1. | L4e | Photographs and/or drawings of the bodywork showing the true, effective location and dimensions of the anchorages, together with an indication of the R-point: …
6.15.2. | L4e | Drawings of the anchorages and the parts of the vehicle structure to which they are attached (together with a statement on the nature of the materials used): …
6.15.3. | L4e | Designation of the types of belts(14) authorised for attachment to the anchorages on the vehicle: …
| | Safety-belt anchorage configuration and associated information | Anchorage location Vehicle structure | Seat structure Centre seat | | Lower anchorages Upper anchorages | | right left | |
6.15.4. | L4e | Type-approval mark for each position: …
6.15.5. | L4e | Special devices (example: seat-height adjustment, preloading device, etc.): …
6.15.6. | L4e | Photographs and/or drawings of the bodywork showing the true, effective location and dimensions of the anchorages, together with an indication of the R-point: …
6.15.7. | L4e | Observation: …
6.16. | | Seating positions (saddles and seats)
6.16.1. | L4e | Number of seating positions: …
6.16.1.1. | L4e | Location and arrangement(8): …
6.16.2. | L4e | Seating position configuration: seat/saddle(4)
6.16.3. | L4e | Description and drawings of: …
6.16.3.1. | L4e | The seats and their anchorages: …
6.16.3.2. | L4e | The adjustment system: …
6.16.3.3. | L4e | The displacement and locking systems: …
6.16.3.4. | L4e | The seat-belt anchorages incorporated in the seat structure: …
6.16.3.5. | L4e | The parts of the vehicle used as anchorages: …
6.16.4. | L4e | Coordinates or drawing of the R-point(s) of all seating positions: …
6.16.4.1. | L4e | Driver’s seat: …
6.16.4.2. | L4e | All other seating positions: …
6.16.5. | L4e | Design torso angle: …
6.16.6. | L4e | Range of seat adjustment: …
6.16.6.1. | L4e | Driver’s seat: …
6.16.6.2. | L4e | All other seating positions: …
6.17. | | Steer-ability, cornering properties and turn-ability
6.17.1. | L4e | Schematic diagram of steered axle(s) showing steering geometry: …
6.17.2. | | Transmission and control of steering
6.17.2.1. | L4e | Configuration of steering transmission (specify for front and rear): …
6.17.2.2. | L4e | Linkage to wheels (including other than mechanical means; specify for front and rear): …
6.17.2.2.1. | L4e | A brief description of the electrical/electronic components: …
6.17.2.3. | L4e | Diagram of the steering transmission: …
6.17.2.4. | L4e | Schematic diagram(s) of the steering control(s): …
6.17.2.5. | L4e | Range and method of adjustment of the steering control(s): …
6.17.2.6. | L4e | Method of assistance: …
6.17.3. | | Maximum steering angle of the wheels
6.17.3.1. | L4e | To the right: … degrees; number of turns of the steering wheel (or equivalent data):
6.17.3.2. | L4e | To the left: … degrees; number of turns of the steering wheel (or equivalent data):
6.18. | | Tyres/wheels combination
6.18.1. | | Tyres:
6.18.1.1. | | Size designation
6.18.1.1.1. | L4e | Axle 1: …
6.18.1.1.2. | L4e | Axle 2: …
6.18.1.1.3. | L4e | Sidecar wheel: …
6.18.1.2. | L4e | Minimum load-capacity index: … with the maximum load on each tyre: … kg
6.18.1.3. | L4e | Minimum-speed category symbol compatible with the theoretical maximum design vehicle speed: …
6.18.1.4. | L4e | Tyre pressure(s) as recommended by the vehicle manufacturer: … kPa
6.18.2. | | Wheels:
6.18.2.1. | L4e | Rim size(s): …
6.18.2.2. | L4e | Categories of use compatible with the vehicle: …
6.18.2.3. | L4e | Nominal rolling circumference: …
6.20. | | Vehicle occupant protection, including interior fittings and vehicle doors
6.20.3. | | Interior protection for occupants)
6.20.3.1. | L4e | Photographs, drawings and/or an exploded view of the interior fittings, showing the parts in the passenger compartment and the materials used (with the exception of interior rear view mirrors, arrangement of controls, seats and the rear part of seats), roof and opening roof, backrest: …
6.20.4. | | Head restraints
6.20.4.1. | L4e | Head restraints: integrated/detachable/separate(4)
6.20.4.2. | L4e | Detailed description of the head restraint, specifying in particular the nature of the padding material or materials and, where applicable, the position and specifications of the braces and anchorage pieces for the type of seat for which approval is sought: …
6.20.4.3. | L4e | In the case of a ‘separate’ head restraint
6.20.4.3.1. | L4e | Detailed description of the structural zone to which the head restraint is intended to be fixed: …
6.20.4.3.2. | L4e | Scale drawings of the significant parts of the structure and the head restraint: …
7. | | INFORMATION ON VEHICLE CONSTRUCTION
7.4. | | External projections
7.4.1. | L4e | General arrangement (drawing or photographs accompanied if necessary by dimensional details and/or text) indicating the position of the attached sections and views, of any parts of the exterior surface which can be regarded as critical for external projections, for example, and where relevant: bumpers, floor line, door and window pillars, air-intake grilles, radiator grille, windscreen wipers, rain gutter channels, handles, slide rails, flaps, door hinges and locks, hooks, eyes, winches, decorative trim, badges, emblems and recesses and any other parts of the exterior surface which can be regarded as critical (e.g. lighting equipment): …
7.7. | | Passenger handholds and footrests
7.7.1. | | Handholds
7.7.1.1. | L4e | Configuration: strap and/or handle(4)
7.7.2. | | Footrests
7.7.2.2. | L4e | Photographs and/or drawings showing the location and the construction: …
Appendix 24

Manufacturer's declaration for vehicles capable of converting their performance level from subcategory (L3e/L4e)-A2 to (L3e/L4e)-A3 and vice versa
Manufacturer's declaration of conversion of (L3e/L4e)-A2 to (L3e/L4e)-A3 motorcycle characteristics and vice-versa
A duly-completed version of this statement shall be included in the information folder.
The undersigned: […(full name and position)]
0.4.
Company name and address of manufacturer: …
0.4.2.
Name and address of the manufacturer's representative (if any)
(0)
: …
Declares that
The (L3e/L4e)-A2 or (L3e/L4e)-A3
(1)
motorcycle:
0.2.
Type
(4)
: …
0.2.1.
Variant(s)
(4)
: …
0.2.2.
Version(s)
(4)
: …
0.2.3.
Commercial name(s) (if available): …
0.3.
Category, subcategory and sub-subcategory of vehicle
(5)
: …
1.
Type-approval number (if available): …
1.1.
Type-approval issued on (date, if available): …
3.2.2.1.
PCUs/ECUs
(1)
software identification number(s): … and calibration verification number(s): …
is technically suitable to be retrofitted to the (L3e/L4e)-A2 or (L3e/L4e)-A3
(1)
vehicle identified below:
0.2.
Type
(4)
: …
0.2.1.
Variant(s)
(4)
: …
0.2.2.
Version(s)
(4)
: …
0.2.3.
Commercial name(s) (if available): …
0.3.
Category, subcategory and sub-subcategory of vehicle
(5)
: …
1.
Type-approval number (if available): …
1.1.
Type-approval issued on (date, if available): …
3.2.2.1.
PCUs/ECUs
(1)
software identification number(s): … and calibration verification number(s): …
With the following technical characteristics:
General construction characteristics
(3)
1.8.
Maximum design vehicle speed: … km/h
1.9.
Maximum net power: … kW (at … min
-1
)
(1)
1.10.
Ratio maximum net power/mass of the vehicle in running order: … kW/kg
Environmental performance
(3)
4.0.6.
Sound level measured according to
(2)
: …
4.0.6.1.
Stationary: … dB(A) at engine speed: … min
-1
4.0.6.2.
Drive-by: … dB(A)
4.0.6.3.
Limit value for L
urban
(0)(7)
: … dB(A)
3.2.15.
Exhaust emissions measured according to
(2)
: …
3.2.15.1.
Type I test: tailpipe emissions after cold start, including the deterioration factor:
- CO: … mg/km
- THC: … mg/km
- NMHC
(0)
: … mg/km
- NOx: … mg/km
- THC+NOx
(0)
: … mg/km
- PM
(0)
: … mg/km
8.7.3.2.
Type II test: tailpipe emissions at (increased) idle and free acceleration:
- HC: … ppm at normal idling speed and: … ppm at high idle speed
- CO: …% vol. at normal idling speed and: …% vol. at high idle speed
8.7.3.2.1.
Smoke corrected absorption coefficient: … m
–1
Energy efficiency measured according to
(2)(3)
:
4.0.2.
Fuel consumption
(0)(6)
: … l or kg/100 km
4.0.3.
CO
2
emissions
(0)(6)
: … g/km
4.0.4.
Energy consumption
(0)(6)
: … Wh/km
4.0.5.
Electric range
(0)
: … km
by modifying the following components, parts, software, etc.: …
…
Place: …
Date: …
Signature: …
Name and position in the company: …

Explanatory notes relating to Appendix 24

(Footnotes and explanations not to be stated on the Manufacturer's declaration)
(0)
Suppress the entry if not applicable.
(1)
Delete where not applicable (no deletion required when more than one entry is applicable).
(2)
Number of the Commission Delegated Regulation and latest amending Commission Delegated Regulation applicable to the type-approval. In the case of a Commission Delegated Regulation with two or more implementation stages; indicate also the implementation stage and/or code. Alternatively indicate the number of the applicable UNECE Regulation.
(3)
Round the units of measure to the nearest whole number for dB(A), Wh/ km, mg/ km, g/km, ppm and km; to the nearest tenth for kW, l/ 100 km, kg/ 100 km, m
3
/ 100 km and for % vol; and to the nearest hundredth for kW/ kg and for m
–1
.
(4)
Indicate the alphanumeric code Type-Variant-Version or
‘
TVV
’
allocated to each type, variant and version as set out in point 2.3 of Part B of Annex I.
(5)
Classified according to Article 4 of and Annex I to Regulation (EU) No 168/2013, the coding shall be indicated, e.g.
‘
L3e-A2
’
for a medium-performance motorcycle.
(6)
For externally chargeable hybrid electric vehicles, the
‘
weighted, combined
’
values for CO
2
, fuel consumption and electric energy consumption shall be indicated.
(7)
Only applicable for vehicle category L3e.
Appendix 25

Manufacturer’s declaration on powertrain tampering prevention measures (anti-tampering)
1.

Vehicle manufacturer’s declaration on powertrain tampering prevention measures (anti-tampering):
- not to market interchangeable components which could enable propulsion unit performance to exceed levels applicable to the relevant (sub) category;
- manufacturer-facilitated modifications shall not increase the propulsion unit performance of the vehicle;
- modifications and interchangeability of parts and components

Manufacturer’s declaration not to market interchangeable components which could enable propulsion unit performance to exceed levels applicable to the relevant (sub) category
A duly-completed version of this statement shall be included in the information folder.
0.4.
Company name and address of manufacturer: …
0.4.2.
Name and address of the manufacturer’s representative (if any) : …
Hereby declares that:
For the L1e/L2e, (L3e/L4e)-A1/(L3e/L4e)-A2/L6e/L7e
category vehicle:
0.1.
Make (trade name of the manufacturer): …
0.2.
Type : …
0.2.1.
Variant(s) : …
0.2.2.
Version(s) : …
0.2.3.
Commercial name(s) (if available): …
0.3.
Category, subcategory and sub-subcategory of vehicle : …

Will not market interchangeable components which could enable propulsion unit performance to exceed levels applicable to the relevant (sub) category;
and that
The manufacturer-facilitated modifications of the following characteristics:
1. spark delivery of the ignition system if applicable;
2. fuel feed and delivery system;
3. air-intake system including air filter(s) (modification or removal);
4. propulsion battery configuration or electric power to the electric motor(s) if applicable;
5. drive-train;
6. and the control unit(s) that control(s) the propulsion unit performance of the powertrain.

shall comply with the requirements set out in point 2.6. of Annex II to Commission Delegated Regulation (EU) No 44/2014
For L3e-A2/L4e-A2/L7e
category vehicles the manufacturer
declares that:
The modifications and interchangeability of:
1. spark delivery of the ignition system, if applicable;
2. fuel feed and delivery system;
3. air-intake system including air filter(s) (modification or removal);
4. the drive-train;
5. the control unit(s) for the propulsion unit performance of the powertrain;
6. removal of any component (mechanical, electrical, structural, etc.) which limits full engine load, leading to any change in the propulsion unit performance as approved in accordance with Annex II (A) to Regulation (EU) No 168/2013

shall comply with the requirements set out in point 5.2. of Annex II to Commission Delegated Regulation (EU) No 44/2014
Place: … Date: …
Signature: … Name and position in the company: …

Propulsion unit performance
Explanatory notes relating to Appendix 25

(Footnotes and explanations not to be stated on the Manufacturer’s declaration)

Explanatory notes relating to Annex I
(1)
For internal combustion engine.
(2)
Classified according to Article 4 of and Annex I to Regulation (EU) No 168/2013, the coding shall be indicated, e.g. ‘L3e-A1E’ for a low-performance Enduro motor-cycle.
(3)
Suppress the entry if not applicable.
(4)
Delete where not applicable (no deletion required when more than one entry is applicable).
(5)

Indicate the configuration by following codes:
- R: right side of the vehicle
- L: left side of the vehicle
- F: front side of the vehicle
- RE: rear side of the vehicle
Example for a vehicle with 2 left-side doors and 1 right-side door:
2 L, 1R
(6)
This value shall be calculated (π = 3.1416) and rounded off to the nearest cm3.
(7)
Specify the tolerance.
(8)

Indicate the position by the following codes:
- rx: row number
- R: right side of the vehicle
- C: centre of the vehicle
- L: left side of the vehicle
Example for a vehicle with a first row with 2 front seating positions, 1 right, 1 left and a second row with 1 rear seating position, 1 centre:
r1: 1R,1L r2: 1C
(9)

Indicate fuel type by the following codes:
- P: petrol
- B5: diesel
- M: mixture
- LPG: liquid petroleum gas
- NG: natural gas
- BM: biomethane
- E5: petrol E5
- E10:petrol E10
- E85: ethanol E85
- BD: biodiesel
- H2: hydrogen
- H2NG: mixture of hydrogen and natural gas
- A: compressed air
- O: other.
Note: vehicles can be fuelled with both petrol and a gaseous fuel but, where the petrol system is fitted for emergency purposes or starting only and of which the petrol tank cannot contain more than 5 litres of petrol, shall be regarded for the test as vehicles which can only run a gaseous fuel.
(10)
L-category vehicles equipped with OBD according to Article 21 of Regulation (EU) No 168/2013.
(11)
Standard ISO 612:1978 — Road vehicles — dimensions of motor vehicles and towed vehicles — terms and definitions.
(12)
This figure shall be rounded off to the nearest tenth of a millimetre.
(13)
The specified particulars are to be given for any proposed variants.
(14)

‘A’: for a three-point belt;
‘B’: for a lap belt;
‘S’: for special types of belt (in this case provide specific information on the nature of these types under observation in point 6.15.7.);
‘Ar’, ‘Br’ or ‘Sr’: for a belt incorporating an inertia reel;
‘Are’, ‘Bre’ and ‘Sre’: for a belt equipped with an inertia reel and an energy-absorption device on at least one anchorage.
(15)

Indicate the location of the centre of the VIN/statutory plate by the following codes:
- R. right side of the vehicle
- C: centre of the vehicle
- L: left side of the vehicle
- x: horizontal distance (in mm) from the front-most axle (preceded by ‘-’ (i.e. minus) if located in front of the front axle)
- y: horizontal distance (in mm) from the longitudinal centre line of the vehicle
- z: distance (in mm) from the ground
- (r/o): parts needing to be removed or opened for access to the marking.
Example for a VIN fitted on the right side of a motorcycle steering head-pipe, 500 mm behind the front axle, 30 mm from the centre-line and 1 100 mm high:
R, x500, y30, z1100
Example for a statutory plate fitted to a quadricycle, on the right side of the vehicle, 100 mm in front of the front axle, 950 mm from the longitudinal centre line of the vehicle and 700 mm high, under the bonnet:
R, x-100, y950, z700 (r/o)
(16)
Rounded to the nearest whole number for dB(A).
(17)
Indicate the alphanumeric code Type-Variant-Version or ‘TVV’ allocated to each type, variant and version as set out in point 2.3 of Part B of this Annex. For the identification of variant and versions it may be employed the matrix set out in point 2.3 of Part B of this Annex.
(18)
In case of multi-stage approval, supply this information for each stage.
(19)
Provide this information for each component and separate technical unit installed in the vehicle or system.
(20)
Provide this information for each combustion engine, electric motor and hybrid application.
(21)
Provide this information for each vehicle type.
(22)
For cycles designed to pedal indicate the maximum speed for which the electric motor provides assistance.
(23)

Axles with twinned wheels/powered:
- F: front
- R: rear
- M: middle (for vehicles with sidecar)
- F & R: front and rear
Examples:
- twinned wheels: F (front twinned wheels for a vehicle of subcategory L5e-A)
- powered axles: R (rear powered axle for a L3e-A1 motorcycle)
(24)
For vehicles equipped with CVT indicate the following: 1
‘
gear ratio at maximum design vehicle speed
’
; 2
‘
gear ratio at maximum peak power
’
; 3
‘
gear ration at maximum peak torque
’
. The gear ratios shall include the gear ratio of the primary transmission ratio (if applicable) and be supplemented with an acceptable tolerance band to the satisfaction of the approval authority. For wheel hub engines without gear drive, indicate
‘
n/a
’
or
‘
1
’ .
(25)
For externally chargeable hybrid electric vehicles, the ‘weighted, combined’ values for CO2, fuel consumption and electric energy consumption shall be indicated.
(26)

Indicate the arrangement of the cylinders by following codes:
- LI: in line
- V: in V
- O: opposed-cylinder engine
- S: single-cylinder engine
R: rotatory piston engine.
(27)
In the case of more than one electric motor indicate the addition of all the engines.
(28)
Indicate the longitudinal distance between front axle and sidecar axle.
(29)
For compression ignition engines only.
ANNEX II

Templates for the manufacturer’s statements on endurance testing and vehicle structure integrity
1.

General requirements
1.1.
The vehicle manufacturer shall provide, in accordance with Article 22(2) of Regulation (EU) No 168/2013, a signed statement (see model in point 1.3.), confirming that each vehicle shall operate as intended throughout its normal life, if used under normal conditions and serviced according to the manufacturer’s recommendations, and that the endurance of the systems, parts and equipment critical for functional safety is ensured through appropriate testing and the use of good engineering practice.
1.2.
The vehicle manufacturer shall provide, in accordance with point 1.1. of Annex XIX to Commission Delegated Regulation (EU) No 3/2014, a signed statement (see model in point 1.4.), confirming that all vehicles shall be constructed in a proper manner and that the vehicle type has been designed to be sufficiently robust to withstand its intended use over its lifetime.
1.3.
Model of the manufacturer’s statement on endurance testing (Annex V to Commission Delegated Regulation (EU) No 3/2014)

Manufacturer’s statement on endurance testing (Annex V to Commission Delegated Regulation (EU) No 3/2014)
A duly completed version of this statement shall be included in the information folder
The undersigned: [… (full name and position)]
Company name and address of the manufacturer: …
Name and address of the manufacturer’s representative (if any): …
Hereby states that the vehicles:
0.1.
Make (trade name of the manufacturer): …
0.2.
Type : …
0.2.1.
Variant(s) : …
0.2.2.
Version(s) : …
0.2.3.
Commercial name(s) (if available): …
0.3.
Category, subcategory and sub-subcategory of vehicle : …
for which type-approval is sought shall withstand normal use as intended for at least … km travelled within five years of first registration, taking into account regular and scheduled maintenance and specific equipment adjustments, as described clearly and unambiguously in the instructions manual delivered with the vehicles.
The undersigned furthermore confirms that the endurance of the systems, parts and equipment critical for functional safety is ensured through appropriate testing and the use of good engineering practice.
This declaration has no bearing on any vehicle warranty.
Place: … Date: …
Signature: … Name and position in the company: …
1.4.
Model of the manufacturer’s statement on structure integrity (point 1.1. of Annex XIX to Commission Delegated Regulation (EU) No 3/2014)

Manufacturer’s statement on structure integrity (Annex XIX to Commission Delegated Regulation (EU) No 3/2014)
A duly completed version of this statement shall be included in the information folder.
The undersigned: [… (full name and position)]
Company name and address of the manufacturer: …
Name and address of the manufacturer’s representative (if any): …
Hereby states that the vehicles:
0.1.
Make (trade name of the manufacturer): …
0.2.
Type : …
0.2.1.
Variant(s) : …
0.2.2.
Version(s) : …
0.2.3.
Commercial name(s) (if available): …
0.3.
Category, subcategory and sub-subcategory of vehicle : …
shall be constructed in a proper manner and are designed to be sufficiently robust to withstand the intended use over the vehicle’s lifetime, taking into account regular and scheduled maintenance and specific equipment adjustments, as described clearly and unambiguously in the instructions manual delivered with the vehicles.
The undersigned furthermore agrees to and guarantees that specific analyses of vehicle structures, components and/or parts using engineering calculations, virtual testing methods and/or structural testing shall be made available in a timely manner to the approval authority and the European Commission upon request in case of a recall due to a serious safety risk.
This declaration applies to all vehicles covered by the type-approval to which this statement is annexed and has no bearing on any vehicle warranty.
Place: … Date: …
Signature: … Name and position in the company: …
Explanatory notes relating to Annex II

(Footnotes and explanations not to be stated on the Manufacturer’s statements)
ANNEX III

Templates for the manufacturer’s certificates providing proof of compliance to the type-approval authority on access to vehicle on-board diagnostics (OBD) and to vehicle repair and maintenance information
1.
The vehicle manufacturer shall provide, in accordance with Article 57(8) of Regulation (EU) No 168/2013 the certificates providing proof of compliance to the type-approval authority on access to vehicle OBD and vehicle repair and maintenance information which shall take the form set out in points 2. and 3.
1.1.
The certificates shall have a reference number supplied by the manufacturer.
2.
Manufacturer’s certificate on access to vehicle OBD stage I and vehicle repair and maintenance information.
2.1.

Template of manufacturer’s certificate on access to vehicle OBD (stage I) and vehicle repair and maintenance information.

Manufacturer’s certificate on access to vehicle OBD (stage I) and vehicle repair and maintenance information
A duly completed version of this certificate shall be included in the information folder.
Reference number: …
The undersigned: [… (full name and position)]
Company name and address of the manufacturer: ….
Name and address of the manufacturer’s representative (if any) : …
Hereby certifies that:
it provides access to vehicle OBD and vehicle repair and maintenance information in compliance with
- Chapter XV of Regulation (EU) No 168/2013
with respect to the types of vehicle, engine and pollution-control device listed in Addendum 1 to this certificate.
The following derogation is applied: carry-over systems .
The principal website addresses, through which the relevant information may be accessed and which are hereby certified to be in compliance with the above provisions, are listed in Addendum 2 to this certificate along with the contact details of the manufacturer’s representative listed in Addendum 3 to this certificate, whose signature is below.
Where applicable: The manufacturer hereby also certifies that it has complied with the obligation in Article 57(8) of Regulation (EU) No 168/2013 to provide the relevant information for previous approvals of these vehicle types no later than six months after the date of type-approval.
Place: … Date: …
Signature: … Name and position in the company: …
Addenda:
1
- List of the types of vehicle, engine and pollution-control device
2
- Web sites addresses
3
- Contact details
2.1.1.

Template of Addendum 1 to the manufacturer’s certificate on access to vehicle OBD (stage I) and repair and maintenance information.
Addendum 1

to

Manufacturer’s certificate with reference number … on access to vehicle OBD (stage I) and vehicle repair and maintenance information

List of the types of vehicle:
0.2.
Type : …
0.2.1.
Variant(s) : …
0.2.2.
Version(s) : …
0.2.3.
Commercial name(s) (if available): …
0.3.
Category, subcategory and sub-subcategory of vehicle : …
1.
Type-approval number including extension number (if available): …
1.1.
Type-approval issued on (date, if available): …

List of the types of engines:
3.
Combustion engine/ electric motor/hybrid application code: …
3.1.
Type-approval number (if available): …
3.2.
Type-approval issued on (date, if available): …

List of the types of pollution-control devices:
0.7.
Make(s) (trade name(s) of manufacturer): …
0.8.
Type: …
0.8.1.
Commercial name(s) (if available): …
0.8.2.
Type-approval number including extension number (if available): …
0.8.3.
Type-approval issued on (date, if available): …
2.1.2.

Template of Addendum 2 to the manufacturer’s certificate on access to vehicle OBD (stage I) and repair and maintenance information.
Addendum 2

to

Manufacturer’s certificate with reference number … on access to vehicle OBD (stage I) and vehicle repair and maintenance information
Web site addresses referred to in this certificate
… … …
2.1.3.

Template of Addendum 3 to the manufacturer’s certificate on access to vehicle OBD (stage I) and repair and maintenance information.
Addendum 3

to

Manufacturer’s certificate with reference number … on access to vehicle OBD (stage I) and vehicle repair and maintenance information
Contact details of the manufacturer’s representative referred to in this certificate
… … …
3.
For vehicles complying with OBD stage II as referred to in Annex XII to Commission Delegated Regulation (EU) No 44/2014, the manufacturer may fill out the certificate set out in point 3.2 on a voluntary basis and add this to the information folder.
3.1.
The certificate shall have a reference number supplied by the manufacturer.
3.2.

Template of certificate supplementing the manufacturer’s certificate on access to vehicle OBD (stage II) and repair and maintenance information.

Manufacturer’s certificate on access to vehicle OBD (stage II) and vehicle repair and maintenance information
A duly completed version of this certificate shall be included in the information folder.
Reference number: …
The undersigned: [… (full name and position)]
Company name and address of the manufacturer: …
Name and address of the manufacturer’s representative (if any) : …
Hereby certifies that:
- the vehicle types listed in Addendum 1 to this certificate are in compliance with the provisions of Article 16 and point 4 of Appendix 1 to Annex XII to Commission Delegated Regulation (EU) No 44/2014 relating to the in-use performance of the OBD system under all reasonable foreseeable driving conditions.
- the plans describing the detailed technical criteria for incrementing the numerator and denominator of each monitor in Addendum 2 to this certificate are correct and complete for all types of vehicles to which this certificate applies.
Place: … Date: …
Signature: … Name and position in the company: …
Addenda:
- List of vehicle types to which this certificate applies.
- Plan(s) describing the detailed technical criteria for incrementing the numerator and denominator of each monitor as well as plan(s) for disabling numerators, denominators and general denominator.
3.2.1.

Template of Addendum 1 to the manufacturer’s certificate on access to vehicle OBD (stage II) and repair and maintenance information.
Addendum 1

to

Manufacturer’s certificate with reference number … on access to vehicle OBD (stage II) and vehicle repair and maintenance information

List of the types of vehicle:
0.2.
Type : …
0.2.1.
Variant(s) : …
0.2.2.
Version(s) : …
0.2.3.
Commercial name(s) (if available): …
0.3.
Category, subcategory and sub-subcategory of vehicle : …
1.
Type-approval number (if available): …
1.1.
Type-approval issued on (date, if available): …
3.2.2.

Template of Addendum 2 to the manufacturer’s certificate of compliance with the OBD in-use performance requirements.
Addendum 2

to

Manufacturer’s certificate with reference number … on access to vehicle OBD (stage II) and vehicle repair and maintenance information
Plan(s) describing the detailed technical criteria for incrementing the numerator and denominator of each monitor as well as plan(s) for disabling numerators, denominators and general denominator. …
… …
Explanatory notes relating to Annex III

(Footnotes and explanations not to be stated on the Manufacturer’s declaration)
ANNEX IV

Templates for the certificates of conformity

LIST OF APPENDICES
Appendix Number | Appendix title
1 | Models for the certificate of conformity
2 | Information and entries to be included in the certificates of conformity issued in accordance with the template set out in Annex IV to Directive 2002/24/EC
0.

Objectives
The certificate of conformity enables the competent authorities of the Member States to register vehicles without requiring the applicant to supply additional technical documentation. For these purposes, the certificate of conformity has to include:
1. the vehicle identification number;
2. the exact technical characteristics of the vehicle (e.g. it is not permitted to mention any range of value in the various entries).
1.

General requirements
1.1.
The vehicle manufacturer shall provide, in accordance with Article 38(1) of Regulation (EU) No 168/2013, a certificate of conformity for each vehicle in the series of the type which has been approved, which template is set out in the Appendix 1.
1.2.

The certificate of conformity shall consist of two sections.
1. Section 1 contains a statement of compliance by the manufacturer. There are different templates for section 1 according to the vehicles covered, as specified in point 2.
2. Section 2 is a technical description of the main characteristics of the vehicle. The template for section 2 is common to all vehicle categories. Those entries which are not applicable to the certified vehicle can be supressed.
1.3.
The certificate of conformity shall be no bigger than A4 paper format (210 × 297 mm).
1.4
All information on the Certificate of Conformity shall be provided in ISO 8859 series characters (for Certificates of Conformity issued in Bulgarian Language in Cyril characters, for Certificates of Conformity issued in Greek Language in Greek characters) and Arabic numerals.
1.5.
Without prejudice to the provisions in section 0(b), the values and units indicated in Section 2 shall be those given in the type-approval documentation of this implementing act. In the case of conformity of production checks, the values shall be verified according to the methods laid down in Annex IV to Commission Delegated Regulation (EU) No 44/2014. The tolerances allowed are those indicated in the relevant delegated acts.
1.6.
The vehicle manufacturer shall endeavour to make available an electronic version of the certificate of conformity to the registration authority of the Member State performing the first registration of the vehicle containing the identical information as stated on the certificate of conformity of the vehicle.
1.7.
The certificate of conformity of vehicles of category L3 capable of converting their performance levels between subcategories (L3e/L4e)-A2 and (L3e/L4e)-A3 according to the procedure established in point 4. of Annex III to Commission Delegated Regulation (EU) No 44/2014 shall bear the data of the vehicle configuration at the end of the production line in the factory when finally set to one of the two possible configurations. In addition, it shall bear certain characteristics of the vehicle configuration in case it is retrofitted after first registration, which are identified as corresponding to the converted vehicle (CV), as well as entry 8.1. to clearly state that the vehicle is appropriate for converting its performance level.
1.8.
Relevant information and entries of the certificate of conformity which are not present in the template set out in Annex IV to Directive 2002/24/EC shall be introduced respectively in the entries No 04 ‘Vehicle category’ and 50 ‘Remarks’ of the certificates of conformity issued according to that template, as indicated in Appendix 2.
2.

Special provisions
2.1.
Model A of the certificate of conformity (complete vehicles) shall cover vehicles which can be used on the road without further approval.
2.2.

Model B of the certificate of conformity (completed vehicles) shall cover vehicles which can also be used on the road without requiring any further approval, and which have previously undergone an additional approval stage.
This is the normal result of the multi-stage approval process (e.g. a commercial tricycle (L5e-B) built by a second-stage manufacturer on a chassis built by another vehicle manufacturer).
The additional features added during the multi-stage process shall be described briefly and the certificates of conformity obtained at the previous stages shall be annexed.
2.3.
Model C of the certificate of conformity (incomplete vehicles) shall cover vehicles which need a further stage for their approval and cannot be permanently registered or used on the road (e.g. a heavy quadri-mobile for utility purposes (L7e-CU) chassis).
3.

Paper and security printing features to prevent forgery
3.1.
In accordance with Article 38(2) of Regulation (EU) No 168/2013, the certificate of conformity shall be made in such a way as to prevent any forgery. For this purpose, the paper used for the certificate of conformity shall be protected by a watermark in the form of the registered mark of the manufacturer and by coloured graphics.
3.2.
As an alternative to the requirements set out in point 3.1., the paper of the Certificate of conformity may be not protected by a watermark in the form of the registered mark of the manufacturer. In this case, the coloured graphics shall be supplemented with at least one additional security printing feature (e.g. ultraviolet fluorescent ink, inks with viewing angle-dependent colour, inks with temperature-dependent colour, micro printing, guilloche printing, iridescent printing, laser engraving, custom holograms, variable laser images, optical variable images, physically embossed or engraved manufacturer's logo, etc.)
3.3.
Manufacturers may provide the certificate of conformity with security printing features additional to those set out in points 3.1. and 3.2.
Appendix 1

Models for the certificate of conformity

CERTIFICATE OF CONFORMITY ACCOMPANYING EACH VEHICLE IN THE SERIES OF THE TYPE WHICH HAS BEEN APPROVED
MODEL A — Section 1

Maximum format: A4 (210 × 297 mm) or folded to A4 format

COMPLETE VEHICLES
[Year](0)(1) | [Sequential number](0)(1)

EU CERTIFICATE OF CONFORMITY
The undersigned: [… (full name and position)]
hereby certifies that the following complete vehicle:
0.1.
Make (trade name of the manufacturer):
0.2.
Type(5): … (CV* Type(5)(3i)): …
0.2.1.
Variant(5): … (CV* Variant(5)(3i)): …
0.2.2.
Version(5): … (CV* Version(5)(3i)): …
0.2.3.
Commercial name (if available): … (CV* Commercial name (if available)(3i)): …
0.3.
Category, subcategory and sub-subcategory of vehicle(6): … (CV* Category, subcategory and sub-subcategory of vehicle(6)(3i)) …
0.4.
Company name and address of manufacturer: …
0.4.2.
Name and address of manufacturer’s authorised representative (if any)(3): …
0.5.1.
Location of the manufacturer's statutory plate(s)(7)(8): …
0.5.2.
Method of attachment of the manufacturer's statutory plate(s): …
0.6.
Location of the vehicle identification number(7): …
1.
Vehicle identification number: …
conforms in all respects to the type described in EU type-approval (…
type-approval number including extension number
) (CV*…
type-approval number including extension number
)
(3i)
issued on ( …
date of issue
) (CV* …
date of issue
)
(3i)
and
can be permanently registered in Member States having right/left(1)-hand traffic and using metric/imperial(1) units for the speedometer(e).
(Place) (Date) … Signature: …

NB:
- If this model is used for type-approval of a vehicle as an exemption for new technology or new concept, pursuant to Article 40 of Regulation (EU) No 168/2013, the heading of the certificate shall read ‘PROVISIONAL EU-CERTIFICATE OF CONFORMITY VALID ONLY ON THE TERRITORY OF …(MS)’. The provisional certificate of conformity shall also display in its title, instead of ‘COMPLETE VEHICLES’ the phrase: ‘FOR COMPLETE VEHICLES, TYPE-APPROVED IN APPLICATION OF ARTICLE 40(2) OF REGULATION (EU) No 168/2013 OF THE EUROPEAN PARLIAMENT AND OF THE COUNCIL OF 15 JANUARY OF 2013 ON THE APPROVAL AND MARKET SURVEILLANCE OF TWO- OR THREE-WHEEL VEHICLES AND QUADRICYCLES (PROVISIONAL APPROVAL)’ in accordance with Article 38(7) of Regulation (EU) No 168/2013.
- If this model is used for vehicle type-approval for a national small series, pursuant to Article 42 of Regulation (EU) No 168/2013, it shall display in its title, instead of ‘COMPLETE VEHICLES’ the phrase: ‘FOR COMPLETE VEHICLES TYPE-APPROVED IN SMALL SERIES’ and in close proximity the year and the sequential number of production in accordance with Article 38(8) of Regulation (EU) No 168/2013.

CERTIFICATE OF CONFORMITY ACCOMPANYING EACH VEHICLE IN THE SERIES OF THE TYPE WHICH HAS BEEN APPROVED
MODEL B — Section 1

Maximum format: A4 (210 × 297 mm) or folded to A4 format

COMPLETED VEHICLES
[Year](0)(1) | [Sequential number](0)(1)

EU CERTIFICATE OF CONFORMITY
The undersigned: [… (full name and position)]
hereby certifies that the following completed vehicle:
0.1.
Make (trade name of the manufacturer): …
0.2.
Type(5): … (CV* Type(5)(3i)): …
0.2.1.
Variant(5): … (CV* Variant(5)(3i)): …
0.2.2.
Version(5): … (CV* Version(5)(3i)): …
0.2.3.
Commercial name (if available): … (CV* Commercial name (if available)(3i)): …
0.3.
Category, subcategory and sub-subcategory of vehicle(6): … (CV* Category, subcategory and sub-subcategory of vehicle(6)(3i)) …
0.4.
Company name and address of manufacturer: …
0.4.2.
Name and address of manufacturer’s authorised representative (if any)(3): …
0.5.1.
Location of the manufacturer's statutory plate(s)(7)(8): …
0.5.2.
Method of attachment of the manufacturer's statutory plate(s): …
0.6.
Location of the vehicle identification number(7): …
1.
Vehicle identification number: …
has been completed and altered as follows: … and
conforms in all respects to the type described in EU type-approval (…
type-approval number including extension number
) (CV*…
type-approval number including extension number
)
(3i)
issued on ( …
date of issue
) (CV* …
date of issue
)
(3i)
and
can be permanently registered in Member States having right/left(1)-hand traffic and using metric/imperial(1) units for the speedometer(e).
(Place) (Date) … Signature: …
Attachment: Certificates of conformity delivered at previous stages.

NB:
- If this model is used for type-approval of a vehicle as an exemption for new technology or new concept, pursuant to Article 40 of Regulation (EU) No 168/2013, the heading of the certificate shall read ‘PROVISIONAL EU-CERTIFICATE OF CONFORMITY VALID ONLY ON THE TERRITORY OF …(MS)’. The provisional certificate of conformity shall also display in its title, instead of ‘COMPLETED VEHICLES’ the phrase: ‘FOR COMPLETED VEHICLES, TYPE-APPROVED IN APPLICATION OF ARTICLE 40(2) OF REGULATION (EU) No 168/2013 OF THE EUROPEAN PARLIAMENT AND OF THE COUNCIL OF 15 JANUARY OF 2013 ON THE APPROVAL AND MARKET SURVEILLANCE OF TWO- OR THREE-WHEEL VEHICLES AND QUADRICYCLES (PROVISIONAL APPROVAL)’ in accordance with Article 38(7) of Regulation (EU) No 168/2013.
- If this model is used for vehicle type-approval for a national small series, pursuant to Article 42 of Regulation (EU) No 168/2013, it shall display in its title, instead of ‘COMPLETED VEHICLES’ the phrase: ‘FOR COMPLETED VEHICLES TYPE-APPROVED IN SMALL SERIES’ and in close proximity the year and the sequential number of production in accordance with Article 38(8) of Regulation (EU) No 168/2013.

CERTIFICATE OF CONFORMITY ACCOMPANYING EACH VEHICLE IN THE SERIES OF THE TYPE WHICH HAS BEEN APPROVED
MODEL C — Section 1

Maximum format: A4 (210 × 297 mm) or folded to A4 format

INCOMPLETE VEHICLES

EU CERTIFICATE OF CONFORMITY
The undersigned: [… (full name and position)]
hereby certifies that the following incomplete vehicle:
0.1.
Make (trade name of the manufacturer): …
0.2.
Type(5): … (CV* Type(5)(3i)): …
0.2.1.
Variant(5): … (CV* Variant(5)(3i)): …
0.2.2.
Version(5): … (CV* Version(5)(3i)): …
0.2.3.
Commercial name (if available): … (CV* Commercial name (if available)(3i)): …
0.3.
Category, subcategory and sub-subcategory of vehicle(6): … (CV* Category, subcategory and sub-subcategory of vehicle(6)(3i)) …
0.4.
Company name and address of manufacturer: …
0.4.2.
Name and address of manufacturer’s authorised representative (if any)(3): …
0.5.1.
Location of the manufacturer's statutory plate(7)(8): …
0.5.2.
Method of attachment of the manufacturer's statutory plate(s): …
0.6.
Location of the vehicle identification number(7): …
1.
Vehicle identification number: …
conforms in all respects to the type described in EU type-approval (…
type-approval number including extension number
) (CV*…
type-approval number including extension number
)
(3i)
issued on ( …
date of issue
) (CV* …
date of issue
)
(3i)
and
cannot be permanently registered without further approvals.
(Place) (Date) … Signature: …
Attachment: Certificates of conformity delivered at previous stages.
Section 2
(o)
VEHICLE CATEGORY L

(COMPLETE, COMPLETED AND INCOMPLETE VEHICLES)

General construction characteristics
1.3.
Number of axles: … and wheels: …
1.3.1.
Axles with twinned wheels(2)(3): …
1.3.2.
Powered axles(2): …
6.2.4.
Advanced braking system: ABS / CBS / Both ABS and CBS / None (1)(3): …

Main dimensions
2.2.1.
Length: … mm
2.2.2.
Width: … mm
2.2.3.
Height: … mm
2.2.4.
Wheelbase: … mm
2.2.4.1.
Wheelbase sidecar(3a)(3k): … mm
2.2.5.
Track width(3)
2.2.5.1.
Track width front(3c): … mm.
2.2.5.2.
Track width rear(3c): … mm.
2.2.5.3.
Track width sidecar(3k): … mm.
2.2.10.6.
Ground clearance between the axles(3d): … mm
2.2.15.
Wheelbase to ground clearance ratio(3f): … [no unit]
2.2.17.
Seat height(3d): … mm

Masses
2.1.1.
Mass in running order: … kg
2.1.2.
Actual mass: … kg
2.1.3.
Technically permissible maximum laden mass: … kg
2.1.3.1.
Technically permissible maximum mass on front axle: … kg
2.1.3.2.
Technically permissible maximum mass on rear axle: … kg
2.1.3.3.
Technically permissible maximum mass on sidecar axle(3k): … kg
2.1.7.
Technically permissible maximum towable mass(3): Braked: … kg Unbraked: … kg
2.1.7.1.
Technically permissible maximum laden mass of the combination(3): … kg
2.1.7.2.
Technically permissible maximum mass at the coupling point(3): … kg

Powertrain
3.1.1.1.
Manufacturer(3n): …
3.1.1.2.
Engine code (as marked on the engine or other means of identification)(3n): …
3.2.1.2.
Working principle of the combustion engine: internal combustion engine (ICE)/positive ignition/compression ignition/external combustion engine (ECE)/turbine/compressed air(1)(3n):
3.2.1.4.1.
Number of cylinders(3n): …
3.2.1.4.2.
Arrangement of cylinders(3n)(f): …
3.2.1.5.
Engine capacity: … cm 3(3n)
1.9.
Maximum net power(3n): … kW (at … min–1)(3n) (CV*: … kW (at … min–1)((3n))(3i)
1.10.
Ratio maximum net power/mass of the vehicle in running order(3n): … kW/kg (CV*: … kW/kg)((3n)(3i)
3.2.3.1.
Fuel type: … (3n)(g)
3.2.3.2.
Vehicle fuel combination: mono-fuel/bi-fuel/flex-fuel(1)(3n)
3.2.3.2.1.
Maximum amount of bio-fuel acceptable in fuel(3n): … % by volume
3.1.2.1.
Manufacturer(3o): …
3.1.2.2.
Electric motor code (as marked on the engine or other means of identification)(3o): …
3.3.3.4.
15/30(1) minutes power(3o)(r): … kW
3.1.3.1.
Manufacturer(3p): …
3.1.3.2.
Application code (as marked on the engine or other means of identification)(3p): …
3.3.1.
Electric vehicle configuration: pure electric/hybrid electric/manpower — electric(1)((3o)(3p):
3.3.5.2.
Category of hybrid electric vehicle: off-vehicle charging/not off-vehicle charging(1)(3p)
3.9.2.
Maximum assistance factor(3q): …

Maximum speed
1.8.
Maximum speed of vehicle(9): … km/h (CV*: … km/h)((9)(3i)
3.9.3.
Maximum vehicle speed for which the electric motor gives assistance(3q): … km/h

Drive-train and control
3.5.3.9.
Transmission (type)(h): …
3.5.4.
Gear ratios(t): 1 … 2 … 3 … 4 … 5 … 6 …
3.5.4.1.
Final drive ratio: …
3.5.4.2.
Overall gear ratio in highest gear(3d): …

Installation of tyres
6.18.1.1.
Tyre size designation(s): Axle 1: … Axle 2 … sidecar wheel …

Bodywork
6.20.2.1.
Door configuration and number of doors(3g) (i) (j): …
6.16.1.
Number of seating positions: …
6.16.1.1.
Location and arrangement(3g)(k): …

Coupling devices
7.2.8.
Type-approval number of coupling-device(3):

Environmental performance
4.0.1.
Environmental step: Euro (3/4/5/5+)
(1)
4.0.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.0.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.0.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.0.6.
Sound level measured according to
(m)
:
4.0.6.1.
Stationary: …dB(A) (CV*: …dB(A))
(3i)
at engine speed: …min
-1
(CV*: …min
-1
)
(3i)
4.0.6.2.
Drive-by: …dB(A) (CV*: …dB(A))
(3i)
4.0.6.3.
Limit value for L
urban
(3r)
: …dB(A) (CV*: …dB(A))
(3i)
3.2.15.
Exhaust emissions measured according to(m)(o)
3.2.15.1.

Type I test: tailpipe emissions after cold start, including the deterioration factor, if applicable:
CO: | mg/km | (CV*:… mg/km) (3i)
THC: | mg/km | (CV*:… mg/km) (3i)
NMHC: | mg/km (3) | (CV*:… mg/km) (3i)
NOx: | mg/km | (CV*:… mg/km) (3i)
THC+NOx: | mg/km (3) | (CV*:… mg/km) (3i)
PM: | mg/km (3) | (CV*:… mg/km) (3i)
3.2.15.2.

Type II test: tailpipe emissions at (increased) idle and free acceleration:
HC: … ppm (CV*: … ppm)(3i) at normal idling speed and: … ppm (CV*: … ppm)(3i) at high idle speed
CO: …% vol. (CV*: … % vol.)(3i) at normal idling speed and: …% vol. (CV*: … % vol.)(3i) at high idle speed
3.2.15.3.
Smoke corrected absorption coefficient: … m–1(3e) (CV*: … m–1) (3e)(3i)
Energy efficiency
(m)(o)
:
4.0.2. | Fuel consumption (3)(q) : | l or kg/100 km | (CV*:… l or kg/100 km) (3)(q)(3i)
4.0.3. | CO 2 emissions (3)(q)(n) : | g/km | (CV*:… g/km) (3)(q)(3i)
4.0.4. | Energy consumption (3)(q) : | Wh/km | (CV*:… Wh/km) (3)(q)(3i)
4.0.5. | Electric range (3) : | km | (CV*:… km) (3)(3i)

Conversion of the performance of the vehicle (3i):
8.1.
Vehicle appropriate for converting its performance level between subcategories (L3e/L4e)-A2 and (L3e/L4e)-A3 and vice versa: yes/no(1)(3i)

Additional information (3):
9.1.
Remarks(3):
9.2.
Exemptions(3):
Appendix 2

Information and entries to be included in the certificates of conformity issued in accordance with the template set out in Annex IV to Directive 2002/24/EC
I)

Information to be included in entry No 04
0.3.
Category, subcategory and sub-subcategory of vehicle : …
II)

Entries to be included in entry No 50

General construction characteristics
6.2.4.
Advanced braking system: ABS / CBS / Both ABS and CBS / None :

Masses
2.1.2.
Actual mass: … kg

Powertrain
3.3.3.4.
15/30 minutes power (3o) : … kW
3.9.2.
Maximum assistance factor (3q): …

Maximum speed
3.9.3.
Maximum vehicle speed for which the electric motor gives assistance (3q): … km/h

Energy efficiency :
4.0.2. | Fuel consumption (3)(q) : | l or kg/100 km | (CV*:… l or kg/100 km) (3)(q)(3i)
4.0.3. | CO 2 emissions (3)(q)(n) : | g/km | (CV*:… g/km) (3)(q)(3i)
4.0.4. | Energy consumption (3)(q) : | Wh/km | (CV*:… Wh/km) (3)(q)(3i)
4.0.5. | Electric range (3) : | km | (CV*:… km) (3)(3i)

Conversion of the performance of the vehicle (3i):
8.1.
Vehicle appropriate for converting its performance level between subcategories (L3e/L4e)-A2 and (L3e/L4e)-A3 and vice versa: yes/no (3i)
Explanatory notes relating to Annex IV

(Footnotes and explanations not to be stated on the certificate of conformity) with the exception of footnote (*))
(0)
Applicable only for vehicle type-approval for a national small series, pursuant to Article 42 of Regulation (EU) No 168/2013.
(MS)
Indicate the Member State.
(2)

Axles with twinned wheels/powered:
F
- front
R
- rear
M
- middle (for vehicles with sidecar)
F & R
- front and rear
Examples:
— twinned wheels
- F (front twinned wheels for a vehicle of subcategory L5e-A)
— powered axles
- R (rear powered axle for a L3e-A1 motorcycle)
(5)
Indicate the alphanumeric code Type-Variant-Version or ‘TVV’ allocated to the vehicle as set out in point 2.3 of Part B of Annex I.
(7)

Indicate the location of the centre of the VIN/statutory plate by the following codes:
- R. right side of the vehicle
- C: centre of the vehicle
- L: left side of the vehicle
- x: horizontal distance (in mm) from the front-most axle (preceded by ‘-’ (i.e. minus) if located in front of the front axle)
- y: horizontal distance (in mm) from the longitudinal centre line of the vehicle
- z: distance (in mm) from the ground
- (r/o): parts needing to be removed or opened for access to the marking.
Example for a VIN fitted on the right side of a motorcycle steering head-pipe, 500 mm behind the front axle, 30 mm from the centre-line and 1 100 mm high:
R, x500, y30, z1100
Example for a statutory plate fitted to a quadricycle, on the right side of the vehicle, 100 mm in front of the front axle, 950 mm from the longitudinal centre line of the vehicle and 700 mm high, under the bonnet:
R, x-100, y950, z700 (r/o)
(8)
In case of multi-stage approval, supply this information for each stage.
( 9 )

Indicate the following value according to the category of the vehicle:
— for (sub) categories: L1e, L2e, L6e, L7e-B1, L7e-C
- the measured maximum speed of the vehicle;
— for (sub) categories L3e, L4e, L5e, L7e-A and L7e-B2
- the maximum design vehicle speed;
— for cycles designed to pedal (L1e)
- suppress this entry of the certificate of conformity.
(e)
This statement does not restrict the right of any Member State to require technical adaptations in order to allow the registration of a vehicle in a Member State other than that for which it was intended and where traffic drives on the opposite side of the road.
(f)

Indicate the arrangement of the cylinders by following codes:
— LI
- in line
— V
- in V
— O
- opposed-cylinder engine
— S
- single-cylinder engine
— R
- rotatory piston engine.
(g)

Indicate fuel type by the following codes:
— P
- petrol
— B5
- diesel
— M
- mixture
— LPG
- liquid petroleum gas
— NG
- natural gas
— BM
- biomethane
— E5
- petrol E5
— E10
- petrol E10
— E85
- ethanol E85
— BD
- biodiesel
— H2
- hydrogen
— H2NG
- mixture of hydrogen and natural gas
— A
- compressed air
— O
- other.
(h)

Indicate the transmission type by the following codes:
— M
- manual
— A
- automatic
— C
- CVT.
— O
- other
— W
- wheel-hub engine
(i)
For vehicles with bodywork.
(j)

Indicate the configuration by following codes:
— R
- right side of the vehicle
— L
- left side of the vehicle
— F
- front side of the vehicle
— RE
- rear side of the vehicle
Example for a vehicle with 2 left-side doors and 1 right door:
2 L, 1R
(k)

Indicate the position by the following codes:
— rx
- row number
— R
- right side of the vehicle
— C
- centre of the vehicle
— L
- left side of the vehicle
Example for a vehicle with a first row with 2 front seating positions, 1 right, 1 left and a second row with 1 rear seating positions, 1 centre:
r1: 1R,1L r2: 1C
(m)
Number of the Commission Delegated Regulation and latest amending Commission Delegated Regulation applicable to the type-approval. In the case of a Commission Delegated Regulation with two or more implementation stages; indicate also the implementation stage and/or code. Alternatively indicate the number of the applicable UNECE Regulation.
( n ) . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
( o )
Round the values to the nearest whole number for dB(A), Wh/ km, mg/ km, g/km, ppm, mm, kg, km and km/ h; to the nearest tenth for kW, l/ 100 km, kg/ 100 km, m
3
/ 100 km and for % vol; and to the nearest hundredth for kW/ kg and for m
-1
.
( p ) . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(q)
For externally chargeable hybrid electric vehicles, the ‘weighted, combined’ values for CO2, fuel consumption and electric energy consumption shall be indicated.
(r)
In the case of more than one electric motor indicate the addition of all the engines.
(s)
Indicate: tyre size designation, minimum load-capacity index, minimum-speed category symbol, tyre pressure(s) as recommended by the vehicle manufacturer (kPa) and rim size.
(t)
For vehicles equipped with CVT indicate the following: 1 ‘gear ratio at maximum design vehicle speed’ 2 ‘gear ratio at maximum peak power’; 3: ‘gear ration at maximum peak torque’. The gear ratios shall include the gear ratio of the primary transmission ratio (if applicable) and be supplemented with an acceptable tolerance band to the satisfaction of the approval authority. For wheel hub engines without gear drive indicate ‘n/a’ or ‘1’.
( s ) . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
( u )
The information contained in this entry shall be stated in entry No 04.
‘
Vehicle category
’
of the certificates of conformity issued in accordance with the template set out in Annex IV to Directive 2002/24/EC.
ANNEX V

Models for the statutory plate and EU type-approval mark

LIST OF APPENDICES
Appendix Number | Appendix title
1 | Examples of the manufacturer’s data plate
2 | Examples of EU separate technical unit or component type-approval mark
1.

General requirements for vehicle marking
1.1.
All vehicles shall be provided with the plate described in this section in conformity with Article 39(1) of Regulation (EU) No 168/2013. The plate shall be attached by the vehicle manufacturer.
1.2.
Characters
1.2.1.
Alphanumeric characters (roman letters or Arabic numerals) shall be used for the markings in points 2.1.1.1. to 2.1.2., 3.2.2. to 3.2.5. and 4.2.1.1. to 4.2.1.9. However, markings in section 3. shall use capital roman letters (upper case).
1.2.2.
In addition, the manufacturer’s name or trade name and the vehicle type designation may include the following symbols/characters: ‘*’ (the asterisk symbol), ‘&’ (the and mark), ‘-’ (hyphen or minus mark) and the ‘′’ (the prime or apostrophe mark). The stationary sound level may include the character ‘-’.
1.3.
Minimum height of letters and figures.
1.3.1.
Characters marked directly on the chassis, frame or similar structure of the vehicle shall have a minimum height of 4.0 mm.
1.3.2.
Characters marked on the statutory plate shall have a minimum height of 2,0 mm.
2.

Statutory plate
2.1.
A statutory plate, using the model set out in Appendix 1 shall be firmly attached in a conspicuous and readily accessible position to part of the vehicle which is unlikely to be replaced during normal use, regular maintenance or repair (e.g. due to accident damage).
2.1.1.
The information on the plate shall be clearly legible, indelible and shall contain the following information in the order given below and on the same line, if possible:
2.1.1.1.
The name of the manufacturer or the trade name;
2.1.1.2.
Vehicle category including the subcategory and the sub-subcategory(1);
2.1.1.3.
The EU type-approval number in accordance with point 3 of Annex VII to this Regulation;
2.1.1.4.
The vehicle identification number (VIN); consisting of a structured combination of characters in accordance with the requirements set out in section 3. of this Annex;
2.1.1.5.
The stationary sound level in the following format: ‘… dB(A) — … min–1’ (in case of vehicles not being subject to the stationary sound level test, the information shall be displayed as ‘- - - dB(A) — - - - min–1’);
2.1.1.6.
Engine power in the following format: ‘… kW’ (this entry shall be omitted for vehicles with no restrictions on maximum engine power); .maximum vehicle design speed in the following format: ‘… km/h’ (this entry shall be omitted for vehicles with no restrictions on maximum speed); and technically permissible maximum laden mass in the following format: ‘max … kg’. Each entry separated by one or more spaces.
2.1.2.
The manufacturer may give additional information below or to the side of the prescribed statutory plate, outside a clearly marked rectangle which shall enclose only the information prescribed in points 2.1.1.1. to 2.1.1.8. (see examples in Appendix 1)
3.

Requirements for the VIN
The VIN shall meet the following requirements:
3.1.
General requirements
3.1.1.
A VIN shall be marked on each vehicle.
3.1.2.
The VIN shall be unique and unequivocally attributed to a particular vehicle.
3.1.3.
The VIN shall be marked on the statutory plate, as well as on the chassis, frame or a similar structure of the vehicle when the vehicle leaves the production line.
3.1.4.
It shall be hammered, punched, etched or laser-engraved directly onto an easily accessible part on the right side of the vehicle in a way which avoids obliteration, alteration and removal
3.1.5.
The manufacturer shall ensure the traceability of the vehicle by means of the VIN over a period of 30 years.
3.1.6.
The existence of measures taken by the manufacturer to ensure the traceability of the vehicle referred to in point 3.1.5. needs not be checked at the time of the type-approval.
3.2.
Composition of the VIN
3.2.1.

The VIN shall consist of three sections:
1. the world manufacturer identifier (WMI);
2. the vehicle descriptor section (VDS);
3. the vehicle indicator section (VIS).
3.2.2.
The WMI shall consist of a code assigned to the vehicle manufacturer to enable that person to be identified.
3.2.2.1.
The code shall comprise three alphanumeric characters which shall be assigned by the competent authority in the country where the manufacturer has his principal place of business.
3.2.2.2.
The competent authority shall act in agreement with the international organisation referred to in Standard ISO 3780: 2009 on ‘Road vehicles — World manufacturer identifier (WMI) code’.
3.2.2.3.
Where the manufacturer’s global production is less than 150 vehicles per annum, the third character shall always be ‘9’. In order to identify such manufacturers, the competent authority referred to in point 3.2.2.2. shall assign the third, the fourth and the fifth character of the VIS.
3.2.3.
The VDS shall consist of six alphanumeric characters which shall serve to indicate the general characteristics of the vehicle. Where the manufacturer does not use one or more of the six characters, the unused spaces shall be filled in with alphanumeric characters at the manufacturer’s discretion in order that the total number of characters required shall be 6.
3.2.4.

The VIS shall consist of eight alphanumeric characters of which the last four shall consist of digits only.
It shall provide, in conjunction with the WMI and the VDS, clear identification of a particular vehicle. Any unused space shall be filled in with the digit ‘0’ in order that the total number of characters required shall be 8.
3.2.5.
The VDS and the VIS shall be in accordance with the requirements set out in the Standard ISO 3779: 2009 on ‘Road vehicles — Vehicle identification number (VIN) – Content and structure’.
3.2.6.
There shall be no space between the characters.
3.2.7.
The use of the letters ‘I’, ‘O’ or ‘Q’ shall not be permitted.
3.2.8.
The vehicle identification number shall, if possible, be presented on a single line. When the VIN is marked on two lines, the beginning and the end of the VIN shall be limited by one symbol at the choice of the manufacturer which should neither be a Roman capital letter nor an Arabic numeral.
4.

Marking requirements for a multi-stage approval
4.1.

Base vehicle identification number
The VIN of the base vehicle conforming to the requirements set out in section 3. Of this Annex shall be retained during all subsequent stages of type-approval to ensure the ‘traceability’ of the process.
4.2.
Additional statutory plate.
4.2.1.
At the second and subsequent stages, in addition to the statutory plate prescribed in section 2., each manufacturer shall affix to the vehicle an additional plate, based on the model set out in Appendix 1 to this Annex. This plate shall be firmly attached, in a conspicuous and readily accessible position to a part which is not subject to replacement during normal use, regular maintenance or repair. It shall show clearly and indelibly the following information in the order listed:
4.2.1.1.
Name of the manufacturer,
4.2.1.2.
The EU type-approval number in accordance with point 3 of Annex VII to this Regulation,
4.2.1.3.
Vehicle category including the subcategory and the sub-subcategory(1); and the stage of approval (in case of base vehicles, this first-stage identification shall be omitted; in the case of subsequent stages, the information shall indicate the stage: e.g. ‘STAGE 3’ for the third stage). Each entry separated by one or more spaces,
4.2.1.4.
VIN,
4.2.1.5.
The stationary sound level in the following format: ‘… dB(A) — … min–1’ (in case of vehicles exempt from the stationary sound level test, the information shall be displayed as ‘- - - dB(A) — - - - min–1’)(2),
4.2.1.6.
Engine power in the following format: ‘… kW’ (this entry shall be omitted for vehicles with no restrictions on maximum engine power)(2); maximum vehicle design speed in the following format: ‘… km/h’ (this entry shall be omitted for vehicles with no restrictions on maximum speed)(2); and maximum permissible laden mass of the vehicle(2). Each entry separated by one or more spaces.
5.

Marking requirements for components or separate technical units
5.1.
Each separate technical unit or component, whether or not part of a system, which has been EU type-approved and manufactured in conformity with the approved type shall be marked with an EU type-approval mark in conformity with Article 39(2) of Regulation (EU) No 168/2013.
5.2.
The EU type-approval mark for a separate technical unit or component shall consist of:
5.2.1.
A rectangle surrounding the lower-case letter ‘e’ followed by the distinguishing number (as set out in point 2.1 of Annex VII) of the Member State which has granted the EU type approval for the separate technical unit or component.
5.2.2.
In the vicinity of the rectangle, the ‘Sequential number for type-approval certificates’ contained in section 4 of the EU type-approval number as set out in point 2.4. of Annex VII. In addition, it shall be indicated the alphanumerical character as set out in Table-1 of Annex VII to clearly identify the type of component or separate technical unit.
5.2.3.
The EU separate technical unit or component type-approval mark shall be affixed to the separate technical unit or component in a way which is indelible (e.g. stamped, etched, laser-engraved, self-destructing adhesive label), clearly legible and visible in the place at which it is to be fitted to the vehicle without the need to remove any parts with the use of tools.
5.2.4.
Examples of the EU type-approval mark for a separate technical unit or component are shown in Appendix 2 to this Annex. The dimensions of ‘a’ shall be ≥ 3 mm.
5.3.
In addition, the make, trade name or trade mark shall be marked in the vicinity of the EU type-approval mark.
Appendix 1

Examples of the manufacturer’s data plate
1.

Example for a moped:
BIANCA SCOOTER LTD.
L1e-B
e6*168/2013*01223
5DRH123UPAX000001
90 dB(A) — 3 750 min–1
4 kW 45 km/h max 190 kg
2.

Example for a motorcycle of subcategory A2 with electric propulsion:
LOUIS’ ELECTRIC MOTORCYCLE
L3e-A2
e12*168/2013*10920
PC9JZCTMYCVWS0002
- - - dB(A) — - - - min–1
35 kW max 380 kg
3.

Example for a passenger tricycle:
F.M. & U.Y.
L5e-A
e4*168/2013*30069
1FY1HAZ433K849622
93 dB(A) — 4 750 min–1
max 935 kg
4.

Example for a multi-stage (stage 2) heavy quadri-mobile for carriage of goods:
FOURGON-MOTORS S.A.R.L
L7e-CU STAGE 2
e50*168/2013*25089
VTFXXXXXXCL780002
101 dB(A) — 4 100 min–1
15 kW 78 km/h max 1 460 kg
5.

Example for a L3e-A3 motorcycle with additional information for the converted vehicle (CV), a L3e-A2 motorcycle, outside the clearly marked rectangle. In this case for the purpose of a temporary and reversible manufacturer's authorised modification to the first registered L3e-A3 motorcycle in order to register it nationally after its conversion as a reduced-power L3e-A2 configuration (e.g. for vehicle operators with A2 driving licence):
MOTORUDOLPH
L3e-A3
e4*168/2013*2691
JRM00DBP008002211
84 dB(A) —
4 250
min
–1
max 352 kg
L3e-A2
e4*168/2013*2692
83 dB(A) —
3 750
min
–1
35 kW
Appendix 2

Examples of EU separate technical unit or component type-approval mark

Figure 1

Example of a EU separate technical unit or component type-approval mark for an exhaust device (pollution-control device and noise-abatement device)

Explanatory note relating to figure 1
The above EU type-approval mark was issued by Portugal under number 00024 for an exhaust device (pollution-control device and noise-abatement device).

Figure 2

Example of EU separate technical unit or component type-approval mark of a noise-abatement device

Explanatory note relating to figure 2
The above EU type-approval mark was issued by Austria under number 00456 for a noise-abatement device.

Figure 3

Example of EU separate technical unit or component type-approval mark of a pollution-control device

Explanatory note relating to figure 3
The above EU type-approval mark was issued by Croatia under number 10678 for a pollution-control device.

Figure 4

Example of EU separate technical unit or component type-approval mark of a rearward visibility device

Explanatory note relating to figure 4
The above EU type-approval mark was issued by Finland under number 02884 for a rearward visibility device.

Figure 5

Example of EU separate technical unit or component type-approval mark of a trailer coupling device

Explanatory note relating to figure 5
The above EU type-approval mark was issued by Bulgaria under number 00134 for a trailer coupling device.
Explanatory notes relating to Annex V

(Footnotes and explanations not to be stated on the Manufacturer’s statutory plate)
(1)
Classified according to Article 4 of and Annex I to Regulation (EU) No 168/2013, the coding shall be indicated, (e.g. ‘L3e-A1E’ for a low-performance Enduro motorcycle).
(2)
Only where the value has changed during the current stage of approval.
ANNEX VI

Templates for the EU type-approval certificate

LIST OF APPENDICES
Appendix Number | Appendix title
1 | Model of the EU whole-vehicle type-approval certificate for a complete vehicle type
2 | Model of the EU whole-vehicle type-approval certificate for an incomplete type, a vehicle type with complete and incomplete variants, a vehicle type with completed and incomplete variants or a completed vehicle type
3 | Model of the addendum to the EU type-approval certificate
4 | Model of the EU type-approval certificate for a vehicle system
5 | Model of the EU type-approval certificate for a separate technical unit or component
6 | Model of the addendum to the EU type-approval certificate for a separate technical unit or component
1.

General requirements
1.1.
Model A of the EU whole-vehicle type-approval certificate for a complete vehicle type is set out in Appendix 1.
1.2.
Model B of the EU whole-vehicle type-approval certificate for an incomplete vehicle type, a vehicle type with complete and incomplete variants, a vehicle type with completed and incomplete variants or a completed vehicle type is set out in Appendix 2.
1.3.
The list of applicable requirements or acts to which the type of vehicle complies and which are appended to the EU whole-vehicle type-approval certificate when the manufacturer chooses the single-step type-approval procedure according to Article 30(6) of Regulation (EU) No 168/2013 is set out in Appendix 3.
1.4.
Model C of the EU type-approval certificate for a vehicle system is set out in Appendix 4.
1.5.
Model D of the EU type-approval certificate for a separate technical unit or component is set out in Appendix 5.
1.5.1.

The addendum to the separate technical unit or component type-approval certificate is set out in Appendix 6.
When a component/separate technical unit has any restrictions on use, those restrictions shall be verified at the time of vehicle type-approval and indicated in this addendum.
This addendum also identifies the separate technical units and components which can be EU type-approved and under which conditions.
1.6.
The type-approval certificate shall be no bigger than A4 paper format (210 × 297 mm) or a folder of maximum A4 format.
Appendix 1
Model of the EU whole-vehicle type-approval certificate for a complete vehicle type

EU type-approval certificate

MODEL A

(to be used for type-approval of a complete vehicle)

Format: A4 (210 × 297 mm)

EU WHOLE-VEHICLE TYPE-APPROVAL CERTIFICATE
Identification of type-approval authority
Communication concerning:
- EU whole-vehicle type-approval(1) - extension of EU whole-vehicle type-approval(1) - refusal of EU whole-vehicle type-approval(1) - withdrawal of EU whole-vehicle type-approval(1) | of a complete vehicle type
with regard to Regulation (EU) No 168/2013, as last amended by (Commission Delegated) Regulation (EU) No …/…
EU type-approval number: …
Reason for extension: …
SECTION I
0.1.
Make (trade name of manufacturer): …
0.2.
Type : …
0.2.1.
Variant(s) : …
0.2.2.
Version(s) : …
0.2.3.
Commercial name(s) (if available): …
0.3.
Category, subcategory and sub-subcategory of vehicle : …
0.4.
Company name and address of manufacturer of the complete vehicle: …
0.4.1.
Name(s) and address(es) of assembly plants: …
0.4.2.
Name and address of manufacturer’s authorised representative, if any: …
SECTION II
1.
Technical service responsible for carrying out the tests: …
2.
Date of test report: …
3.
Number of test report: …
SECTION III
The undersigned hereby certifies the accuracy of the manufacturer’s description in the attached information document of the vehicle type described above, for which one or more representative samples, selected by the EU type-approval authority, have been submitted as prototypes of the vehicle type and that the attached test results apply to the vehicle type.
1.
The complete vehicle type meets/does not meet all relevant requirements as listed in Annex II to Regulation (EU) No 168/2013.
1.1.
Restrictions of validity : …
1.2.
Waivers applied : …
1.2.1.
Reasons for the waivers : …
1.2.2.
Alternative requirements : …
2.
The approval is granted/extended/refused/withdrawn
2.1.
The approval is granted in accordance with Article 40 of Regulation (EU) No 168/2013 and the validity of the approval is thus limited to dd/mm/yyyy .
Place: …
Date: …
Name and signature (or visual representation of an ‘advanced electronic signature’ according to Directive 1999/93/EC, including data for verification): …
Attachments:
- Information package
- Test results
- Name(s) and specimen(s) of the signature(s) of the person(s) authorised to sign certificates of conformity and a statement of their position in the company
- A completed specimen of the certificate of conformity

NB:
- If this model is used for type-approval of a vehicle as an exemption for new technology or new concept, pursuant to Article 40 of Regulation (EU) No 168/2013, the heading of the certificate shall read ‘EU WHOLE-VEHICLE PROVISIONAL TYPE-APPROVAL CERTIFICATE VALID ONLY ON THE TERRITORY OF … ’. The provisional type-approval certificate shall also specify the restrictions that have been imposed as to its validity and the waivers which have been applied in accordance with Article 30(4) of Regulation (EU) No 168/2013.
- If this model is used for vehicle type-approval for a national small series, pursuant to Article 42 of Regulation (EU) No 168/2013, it shall not bear the heading ‘EU VEHICLE TYPE-APPROVAL CERTIFICATE’. The text shall specify the nature of the waivers, the reasons which support them and the alternative requirements granted pursuant to Article 42(2) of Regulation (EU) No 168/2013.
Explanatory notes relating to Appendix 1

(Footnotes and explanations not to be stated on the type-approval certificate)
Appendix 2
Model of the EU whole-vehicle type-approval certificate for an incomplete type, a vehicle type with complete and incomplete variants, a vehicle type with completed and incomplete variants or a completed vehicle type

EU type-approval certificate

MODEL B

(to be used for type-approval of a completed or incomplete vehicle or a vehicle type with complete and incomplete variants or with completed and incomplete variants)

Format: A4 (210 × 297 mm)

EU WHOLE-VEHICLE TYPE-APPROVAL CERTIFICATE
Stamp of approval authority
Communication concerning:
- EU whole-vehicle type-approval(1) - extension of EU whole-vehicle type-approval(1) - refusal of EU whole-vehicle type-approval(1) - withdrawal of EU whole-vehicle type-approval(1) | - of a completed vehicle type(1) - of an incomplete vehicle type(1) - of a vehicle type with complete and incomplete variants(1) - of a vehicle type with completed and incomplete variants (1)
with regard to Regulation (EU) No 168/2013, as last amended by (Commission Delegated) Regulation (EU) No …/…
EU type-approval number : ….
Reason for extension : ….
SECTION I
0.1.
Make (trade name of manufacturer): …
0.2.
Type : …
0.2.1.
Variant(s) : …
0.2.2.
Version(s) : …
0.2.3.
Commercial name(s) (if available): …
0.3.
Category, subcategory and sub-subcategory of vehicle : …
0.4.

Company name and address of the manufacturer of the complete vehicle :
Company name and address of the manufacturer of the complete variant :
Company name and address of the manufacturer of the completed vehicle/variant :
Company name and address of the manufacturer of the latest built stage of the incomplete vehicle :
Company name(s) and address(es) of the manufacturer(s) of all previous stage(s) :
0.4.1.
Name(s) and address(es) of assembly plant(s): …
0.4.2.
Name and address of the manufacturer’s representative (if any): …
SECTION II
Technical service responsible for carrying out the tests:….
Date of test report:….
Number of test report:….
SECTION III
The undersigned hereby certifies the accuracy of the manufacturer’s description in the attached information document of the vehicle type described above, for which one or more representative samples, selected by the EU approval authority, have been submitted as prototypes of the vehicle type and that the attached test results apply to the vehicle type.
1.
For complete variants
1.1.
The complete variants of the vehicle type meet/do not meet all relevant requirements as listed in Annex II to Regulation (EU) No 168/2013.
2.
For completed vehicles/variants
2.1.
The completed vehicle type/completed variant of the vehicle type meets/does not meet all relevant requirements as listed in Annex II to Regulation (EU) No 168/2013 :
2.1.1.
The approval authority has verified that the completed vehicle/variant of the vehicle type meets all applicable technical requirements at the time of granting this type-approval (cf Article 25(6) of Regulation (EU) No 168/2013).
3.
For incomplete vehicles/variants
3.1.
The incomplete vehicle type/incomplete variants of the vehicle type meets/does not meet the technical requirements of the regulatory acts listed in the table in point 2 of section 2 .
4.
The approval is granted/extended/refused/withdrawn
4.1.
The approval is granted in accordance with Article 40 of Regulation (EU) No 168/2013 and the validity of the approval is thus limited to dd/mm/yyyy .
5.
Restrictions of validity : …
6.
Waivers applied : …
6.1.
Reasons for the waivers : …
6.2.
Alternative requirements : …
Place: …
Date: …
Name and signature (or visual representation of an ‘advanced electronic signature’ according to Directive 1999/93/EC, including data for verification):….
Attachments:
- Information package
- Test results
- Name(s) and specimen(s) of the signature(s) of the person(s) authorised to sign certificates of conformity and a statement of their position in the company
- A completed specimen of the certificate of conformity

NB:
- If this model is used for type-approval of a vehicle as an exemption for new technology or new concept, pursuant to Article 40 of Regulation (EU) No 168/2013, the heading of the certificate shall read
‘
EU WHOLE-VEHICLE PROVISIONAL TYPE-APPROVAL CERTIFICATE VALID ONLY ON THE TERRITORY OF …
(5)
’
. The provisional type-approval certificate shall also specify the restrictions that have been imposed as to its validity and the waivers which have been applied in accordance with Article 30(4) of Regulation (EU) No 168/2013.
- If this model is used for vehicle type-approval for a national small series, pursuant to Article 42 of Regulation (EU) No 168/2013, it shall not bear the heading ‘EU VEHICLE TYPE-APPROVAL CERTIFICATE’. The text shall specify the nature of the waivers, the reasons which support them and the alternative requirements granted pursuant to Article 42(2) of Regulation (EU) No 168/2013.

EU WHOLE-VEHICLE TYPE-APPROVAL CERTIFICATE
SECTION 2
This EU type-approval concerns incomplete and completed vehicles, variants or versions.
1.

Previous stage(s) approval(s) for the vehicles.
In the case where the approval includes one or more incomplete variants or versions (as appropriate), list those variants or versions (as appropriate) which are complete or completed.
Stage | EU type-approval number | Dated | Applicable to (as appropriate) | Variants or versions which are complete or completed (as appropriate)
1 (base vehicle) | | | |
2 | | | |
2.

List of requirements applicable to the approved incomplete vehicle type, variant or version (as appropriate, taking account of the scope and latest amendment to each of the regulatory acts listed below).
Item | Subject | Regulatory act reference | As amended by | Applicable to variant or, if need be, to version
(List only subjects for which an EU type-approval/UNECE approval exists.)

Explanatory notes relating to Appendix 2

(Footnotes and explanations not to be stated on the type-approval certificate)
(1)
Delete where not applicable.
(2)
Indicate the alphanumeric code Type-Variant-Version or
‘
TVV
’
allocated to each type, variant and version as set out in point 2.3 of Part B of Annex I.
(3)
Classified according to Article 4 of and Annex I to Regulation (EU) No 168/2013, the coding shall be indicated, e.g.
‘
L3e-A1E
’
for a low-performance Enduro motor-cycle.
(4)
See section 2.
(5)
Indicate the Member State.
(6)
Applicable only for type-approval of a vehicle as an exemption for new technology or new concept, pursuant to Article 40 of Regulation (EU) No 168/2013.
(7)
Applicable only for vehicle type-approval for a national small series, pursuant to Article 42 of Regulation (EU) No 168/2013.
(8)
Indicate only the latest amendment in case of an amendment of one or more Articles of Regulation (EU) 168/2013, according to the amendment applied for the EU type-approval.
Appendix 3
Model of the addendum to the EU type-approval certificate

Addendum to the EU type-approval certificate

List of regulatory acts with which the type of vehicle complies
To be filled in only in the case of type-approval in accordance with Article 30(6) of Regulation (EU) No 168/2013
Item | Subject | Regulatory act reference | As amended by | Applicable to version
ENVIRONMENTAL AND PROPULSION UNIT PERFORMANCE REQUIREMENTS (EPPR)
1 | Tailpipe emissions after cold start | Commission Delegated Regulation (EU) No 134/2014 Annex II | |
2 | Tailpipe emissions at (increased idle)/ free acceleration test | Commission Delegated Regulation (EU) No 134/2014 Annex III | |
3 | Emissions crank-case gases | Commission Delegated Regulation (EU) No 134/2014 Annex IV | |
4 | Evaporative emissions | Commission Delegated Regulation (EU) No 134/2014 Annex V | |
5 | Durability of pollution-control devices | Commission Delegated Regulation (EU) No 134/2014 Annex VI | |
6 | Measurement of CO2 emissions, fuel consumption, electric energy consumption and electric range determination | Commission Delegated Regulation (EU) No 134/2014 Annex VII | |
7 | Environmental on-board diagnosis (OBD) tests | Commission Delegated Regulation (EU) No 134/2014 Annex VIII | |
8 | Permissible sound level | Commission Delegated Regulation (EU) No 134/2014 Annex IX | |
9 | Procedures and technical requirements on maximum vehicle design speed, maximum torque, maximum continuous total power and maximum peak power | Commission Delegated Regulation (EU) No 134/2014 Annex X | |
10 | Vehicle propulsion family definition | Commission Delegated Regulation (EU) No 134/2014 Annex XI | |
VEHICLE FUNCTIONAL SAFETY REQUIREMENTS
1 | Audible warning devices | Commission Delegated Regulation (EU) No 3/2014 Annex II | |
2 | Braking, including anti-lock and combined brake systems | Commission Delegated Regulation (EU) No 3/2014 Annex III | |
3 | Electrical safety | Commission Delegated Regulation (EU) No 3/2014 Annex IV | |
4 | Manufacturer declaration requirements regarding endurance testing of functional safety-critical systems, parts and equipment | Commission Delegated Regulation (EU) No 3/2014 Annex V | |
5 | Front and rear protective structures | Commission Delegated Regulation (EU) No 3/2014 Annex VI | |
6 | Glazing, windscreen wipers and washers, and defrosting and demisting systems | Commission Delegated Regulation (EU) No 3/2014 Annex VII | |
7 | Driver-operated controls including identification of controls, tell-tales and indicators | Commission Delegated Regulation (EU) No 3/2014 Annex VIII | |
8 | Installation of lighting and light-signalling devices, including automatic switching of lighting | Commission Delegated Regulation (EU) No 3/2014 Annex IX | |
9 | Rearward visibility | Commission Delegated Regulation (EU) No 3/2014 Annex X | |
10 | Rollover protective structure (ROPS) | Commission Delegated Regulation (EU) No 3/2014 Annex XI | |
11 | Safety-belt anchorages and safety-belts | Commission Delegated Regulation (EU) No 3/2014 Annex XII | |
12 | Seating positions (saddles and seats) | Commission Delegated Regulation (EU) No 3/2014 Annex XIII | |
13 | Steer-ability, cornering properties and turn-ability | Commission Delegated Regulation (EU) No 3/2014 Annex XIV | |
14 | Installation of tyres | Commission Delegated Regulation (EU) No 3/2014 Annex XV | |
15 | Vehicle maximum speed limitation plate and its location on the vehicle | Commission Delegated Regulation (EU) No 3/2014 Annex XVI | |
16 | Vehicle occupant protection, including interior fittings and vehicle doors | Commission Delegated Regulation (EU) No 3/2014 Annex XVII | |
17 | Maximum continuous total power and/or maximum vehicle speed limitation by design | Commission Delegated Regulation (EU) No 3/2014 Annex XVIII | |
18 | Requirements on vehicle structure integrity | Commission Delegated Regulation (EU) No 3/2014 Annex XIX | |
VEHICLE CONSTRUCTION AND GENERAL TYPE-APPROVAL REQUIREMENTS
1 | Powertrain tampering prevention measures (anti-tampering) | Commission Delegated Regulation (EU) No 44/2014 Annex II | |
2 | Arrangements for type-approval procedures | Commission Delegated Regulation (EU) No 44/2014 Annex III | |
3 | Conformity of production | Commission Delegated Regulation (EU) No 44/2014 Annex IV | |
4 | Coupling devices and attachments | Commission Delegated Regulation (EU) No 44/2014 Annex V | |
5 | Devices to prevent unauthorised use | Commission Delegated Regulation (EU) No 44/2014 Annex VI | |
6 | Electromagnetic compatibility (EMC) | Commission Delegated Regulation (EU) No 44/2014 Annex VII | |
7 | External projections | Commission Delegated Regulation (EU) No 44/2014 Annex VIII | |
8 | Fuel storage | Commission Delegated Regulation (EU) No 44/2014 Annex IX | |
9 | Load platforms | Commission Delegated Regulation (EU) No 44/2014 Annex X | |
10 | Masses and dimensions | Commission Delegated Regulation (EU) No 44/2014 Annex XI | |
11 | On-board diagnostics (OBD) functional requirements | Commission Delegated Regulation (EU) No 44/2014 Annex XII | |
12 | Passenger handholds and footrests | Commission Delegated Regulation (EU) No 44/2014 Annex XIII | |
13 | Registration plate space | Commission Delegated Regulation (EU) No 44/2014 Annex XIV | |
14 | Access to repair and maintenance information | Commission Delegated Regulation (EU) No 44/2014 Annex XV | |
15 | Stands | Commission Delegated Regulation (EU) No 44/2014 Annex XVI | |
Appendix 4
Model of the EU type-approval certificate for a vehicle system

EU type-approval certificate

MODEL C

(to be used for type-approval of a vehicle system)

Format: A4 (210 × 297 mm)

EU TYPE-APPROVAL CERTIFICATE
Stamp of approval authority
Communication concerning:
- EU type-approval(1) - extension of EU type-approval(1) - refusal of EU type-approval(1) - withdrawal of EU type-approval(1) | of a type of system/a type of a vehicle with regard to a system(1) (0)
with regard to Annex(es) … to Commission Delegated Regulation(s) (EU) No …/…, (and Annex(es) … to Commission Delegated Regulation (EU) No …/…) as last amended by (Commission Delegated) Regulation (EU) No …/…
EU type-approval number …
Reason for extension …
SECTION I
0.7.
Make(s) (trade name(s) of manufacturer): …
0.8.
Type: …
0.8.1.
Commercial name(s) (if available): …
0.9.
Company name and address of the manufacturer: …
0.9.1.
Name(s) and address(es) of assembly plant(s): …
0.9.2.
Name and address of the manufacturer’s representative (if any): …
0.10.
Vehicle(s) for which the system is intended for :
0.10.1.
Type :
0.10.2.
Variant(s) :
0.10.3.
Version(s) :
0.10.4.
Commercial name(s) (if available):
0.10.5.
Category, subcategory and sub-subcategory of vehicle :
SECTION II
1.
Technical service responsible for carrying out the tests: …
2.
Date of test report(s): …
3.
Number of test report(s): …
4.
Remarks (if any): …
4a.
The approval is granted/extended/refused/withdrawn …
4a.1.
The approval is granted in accordance with Article 40 of Regulation (EU) No 168/2013 and its validity is thus limited to dd/mm/yyyy …
5.
Restrictions of validity …
6.
Waivers applied …
Place: …
Date: …
Name and signature (or visual representation of an ‘advanced electronic signature’ according to Directive 1999/93/EC, including data for verification): …
Attachments:
- Information package
- Test report

NB:
- If this model is used for type-approval of a system as an exemption for new technology or new concept, pursuant to Article 40 of Regulation (EU) No 168/2013, the heading of the certificate shall read ‘EU PROVISIONAL TYPE-APPROVAL CERTIFICATE VALID ONLY ON THE TERRITORY OF … ’, The provisional type-approval certificate shall also specify the restrictions that have been imposed as to its validity and the waivers which have been applied in accordance with Article 30(4) of Regulation (EU) No 168/2013.
Explanatory notes relating to Appendix 4:

(Footnotes and explanations not to be stated on the type-approval certificate)
(0)
Indicate the system according to first column of Table 1 in point 6 of Annex VII (e.g. installation of lighting and light-signalling devices).
Appendix 5
Model of the EU type-approval certificate for a separate technical unit or component

EU type-approval certificate

MODEL D

(to be used for component/separate technical unit type-approval)

Format: A4 (210 × 297 mm)

EU TYPE-APPROVAL CERTIFICATE
Stamp of approval authority
Communication concerning:
- EU type-approval(1) - extension of EU type-approval(1) - refusal of EU type-approval(1) - withdrawal of EU type-approval(1) | of a type of component/separate technical unit(1) (0)
with regard to Annex(es) … to Commission Delegated Regulation (EU) No …/… (and Annex(es) … to Commission Delegated Regulation (EU) No …/…) , as last amended by (Commission Delegated) Regulation (EU) No …/… …
EU type-approval number : …
Reason for extension : …
SECTION I
0.7.
Make(s) (trade name(s) of manufacturer): …
0.8.
Type: …
0.8.1.
Commercial name(s) (if available): …
0.9.
Company name and address of the manufacturer: …
0.9.1.
Name(s) and address(es) of assembly plant(s): …
0.9.2.
Name and address of the manufacturer’s representative (if any): …
0.10.
In the case of separate technical unit, vehicle(s) for which is intended for :
0.10.1.
Type …
0.10.2.
Variant(s) : …
0.10.3.
Version(s) : …
0.10.4.
Commercial name(s) (if available): …
0.10.5.
Category, subcategory and sub-subcategory of vehicle : …
SECTION II
1.
Technical service responsible for carrying out the tests: …
2.
Date of test report(s): …
3.
Number of test report(s): …
4.
Remarks (see addendum): …
4a.
The approval is granted/extended/refused/withdrawn …
4a.1.
The approval is granted in accordance with Article 40 of Regulation (EU) No 168/2013 and its validity is thus limited to dd/mm/yyyy
(5)
…
5.
Restrictions of validity : …
6.
Waivers applied : …
Place: …
Date: …
Name and signature (or visual representation of an ‘advanced electronic signature’ according to Directive 1999/93/EC, including data for verification): …
Attachments:
- Information package
- Test report

NB:
- If this model is used for type-approval of a component or separate technical unit as an exemption for new technology or new concept, pursuant to Article 40 of Regulation (EU) No 168/2013, the heading of the certificate shall read ‘EU PROVISIONAL TYPE-APPROVAL CERTIFICATE VALID ONLY ON THE TERRITORY OF … ’, The provisional type-approval certificate shall also specify the restrictions that have been imposed as to its validity and the waivers which have been applied in accordance with Article 30(4) of Regulation (EU) No 168/2013.
Explanatory notes relating to Appendix 5

(Footnotes and explanations not to be stated on the type-approval certificate)
(0)
Indicate the component/separate technical unit according to first column of Table 1 in point 6 of Annex VII (e.g. devices to prevent unauthorised use)
(5)
Applicable only for type-approval of a component or separate technical unit as an exemption for new technology or new concept, pursuant to Article 40 of Regulation (EU) No 168/2013
Appendix 6
Model of the addendum to the EU type-approval certificate for a separate technical unit or component

Addendum to the EU type-approval certificate

ADDENDUM TO THE EU TYPE-APPROVAL CERTIFICATE WITH EU TYPE-APPROVAL NUMBER …
1.

Restriction of use of the … : …
… …
2.

Special conditions for the mounting of the … : …
… …
3.

Remarks : …
… …
Explanatory notes relating to Appendix 6

(Footnotes and explanations not to be stated on the addendum to the type-approval certificate)
ANNEX VII

Numbering system of the EU type-approval certificate
1.
EU type-approval certificates shall be numbered in accordance with the method set out in this Annex.
2.
The EU type-approval number shall consist of a total of four sections for whole-vehicle type-approvals and five sections for type-approval of systems, components, and separate technical units as detailed below. In all cases, the sections shall be separated by an asterisk (‘*’).
2.1.

Section 1: The lower-case letter ‘e’ followed by the distinguishing number of the Member State issuing the EU type-approval, applicable for all type-approval numbers.
1 | Germany
2 | France
3 | Italy
4 | The Netherlands
5 | Sweden
6 | Belgium
7 | Hungary
8 | Czech Republic
9 | Spain
11 | United Kingdom
12 | Austria
13 | Luxembourg
17 | Finland
18 | Denmark
19 | Romania
20 | Poland
21 | Portugal
23 | Greece
24 | Ireland
25 | Croatia
26 | Slovenia
27 | Slovakia
29 | Estonia
32 | Latvia
34 | Bulgaria
36 | Lithuania
49 | Cyprus
50 | Malta
2.2.

Section 2: The number of the applicable Regulation or Commission Delegated Regulation.
- in case of EU whole-vehicle type-approval ‘168/2013’ shall be indicated;
- in the case of national small-series whole-vehicle type-approvals in accordance with Article 42 of Regulation (EU) No 168/2013, the letters NKS in block capitals shall precede the ‘168/2013’;
- in the case of a system, component or separate technical unit type-approval, the number of the corresponding Commission Delegated Regulation supplementing Regulation (EU) No 168/2013: ‘3/2014’, ‘44/2014’ or ‘134/2014’ shall be indicated.
2.3.

Section 3: the latest amending Commission Delegated Regulation (e.g. ‘RRR/2016’) followed by the identification code of the system, component or separate technical unit and the stage of implementation applicable to the type-approval according to Table 1 of point 5.:
- In the case of EU whole-vehicle type-approval, section 3 shall be omitted;
- In the case of EU type-approval of a system, component or separate technical unit, the number of the last amending Commission Delegated Regulation followed with an alphanumerical character as set out in Table 1 of point 5. to clearly identify the type of system, component or separate technical unit shall be indicated.
2.4.

Section 4: Sequential number for type-approval certificates.
- A sequential number with leading zeros (as applicable), to denote the type-approval number. The sequential number shall have five digits starting from ‘00001’.
2.5.

Section 5: Sequential number to denote the extension number of the type-approval
- a two-digit sequential number, with leading zero as applicable, starting from ‘00’ for each type-approval number issued.
3.
On the vehicle’s statutory plate(s) only, section 5 shall be omitted.
4.

Lay-out of the type-approval numbers (with fictive sequential numbers and fictive amending Commission Delegated Regulation number (‘RRR/2016’) for explanation purposes)
Example of a component/separate technical unit type-approval of an audible warning device, which has not yet been extended, issued by France:
- e2*3/2014*3/2014N*00003*00
— e2
  - France (section 1)
— 3/2014
  - Commission Delegated Regulation (EU) No 3/2014) (section 2)
— 3/2014N
  - repeat the Commission Delegated Regulation (EU) No 3/2014) to denote that it has not been amended and the letter ‘N’ to indicate that is an audible warning device (section 3)
— 00003
  - type-approval sequential number (section 4)
— 00
  - extension number (section 5)
Example of a vehicle system type-approval of an engine emissions (Euro 4 stage), amended by another Commission Delegated Regulation RRR/2016 which has been extended twice, issued by the Bulgaria:
- e34*134/2014*RRR/2016A1*00403*02
— e34
  - Bulgaria (section 1)
— 134/2014
  - Commission Delegated Regulation (EU) No 134/2014) (section 2)
— RRR/2016A1
  - amending Commission Delegated Regulation number (RRR/2016) and the letter and number ‘A1’ to indicate that is a engine emissions (Euro 4 stage) (section 3)
— 00403
  - type-approval sequential number (section 4)
— 02
  - extension number (section 5)
Example of a national small series whole vehicle type-approval, which has been extended once, issued by Austria and granted in accordance with Article 42 of Regulation (EU) No 168/2013:
- e12*NKS168/2013*00001*01
— e12
  - Austria (section 1)
— NKS168/2013
  - Regulation (EU) 168/2013 precede by the national small-series denominator (section 2)
— 00001
  - type-approval sequential number (section 4)
— 01
  - extension number (section 5)
Example of a whole vehicle type-approval number, which has been extended five times, issued by the Netherlands:
- e4*168/2013*10690*05
— e4
  - the Netherlands (section 1)
— 168/2013
  - Regulation (EU) 168/2013 (section 2)
— 10690
  - type-approval sequential number (section 4)
— 05
  - extension number (section 5)
Example of a type-approval number to be indicated on a vehicle’s statutory plate
- e50*168/2013*20089
— e50
  - Malta (section 1)
— 168/2013
  - Regulation (EU) 168/2013 (section 2)
— 20089
  - type-approval sequential number (section 4)
5.

Codification for the numbering system of EU type-approval certificates of systems, components and separate technical units

Table 1

Codification for the numbering system of EU type-approval certificates of systems, components and separate technical units
LIST I — Environmental and propulsion unit performance requirements
System or component/separate technical unit (STU) | Commission Delegated Regulation (EU) No | alphanumerical character
System: engine emissions (Euro 4 stage) | 134/2014 | A1
System: engine emissions (Euro 5 stage) | 134/2014 | A2
System: engine emissions (Euro 5+ stage) | 134/2014 | A3
System: crankcase (point 1.3.1. and 1.3.2.) and evaporative emissions (point 1.4.1. to 1.4.3 of Annex IV to Regulation (EU) 168/2013) | 134/2014 | B1
System: crankcase (point 1.3.1. and 1.3.2.) and evaporative emissions (point 1.4.4. to 1.4.6 of Annex IV to Regulation (EU) 168/2013) | 134/2014 | B2
System: crankcase (point 1.3.1. and 1.3.2.) and evaporative emissions (point 1.4.7. to 1.4.8 of Annex IV to Regulation (EU) 168/2013) | 134/2014 | B3
System: environmental on-board diagnostic (OBD Stage I: point 1.8.1. to 1.8.2 of Annex IV to Regulation (EU) No 168/2013 in its version applicable on 19.2.2019 ) | 134/2014 | C1
System: environmental on-board diagnostic (OBD Stage II: point 1.8.3. of Annex IV to Regulation (EU) No 168/2013 in its version applicable on 19.2.2019 ) | 134/2014 | C2
System: environmental on-board diagnostic (OBD Stage I: point 1.8.3. of Annex IV to Regulation (EU) No 168/2013) | 134/2014 | C3
System: environmental on-board diagnostic (OBD Stage II: point 1.8.4. of Annex IV to Regulation (EU) No 168/2013) | 134/2014 | C5
System: environmental on-board diagnostic (OBD Stage II: point 1.8.5. of Annex IV to Regulation (EU) No 168/2013) | 134/2014 | C6
System: sound level | 134/2014 | D
System: propulsion unit performance | 134/2014 | E
System: maximum torque and a maximum net power of a propulsion unit | 134/2014 | E1
STU: pollution-control device | 134/2014 | F
STU: noise-abatement device | 134/2014 | G
STU: exhaust device (pollution-control device and noise-abatement device) | 134/2014 | H
LIST II — Vehicle functional safety requirements
System or component/separate technical unit (STU) | Commission Delegated Regulation (EU) No | alphanumerical character
System: braking | 3/2014 | J
System: installation of lighting and light-signalling devices | 3/2014 | K
System: roll-over protective structure (ROPS) | 3/2014 | L
System: installation of tyres | 3/2014 | M
System: installation of audible warning devices | 3/2014 | AA
System: installation of glazing, windscreen wipers and defrosting and demisting devices | 3/2014 | AB
System: identification of controls, tell-tales and indicators | 3/2014 | AC
System: safety belt anchorages | 3/2014 | AD
System: steer-ability, cornering properties and turn ability | 3/2014 | AE
System: vehicle occupant protection, including interior fittings, head restraint and vehicle doors | 3/2014 | AF
Component/STU: audible warning device | 3/2014 | N
Component/STU: non-glazing front windscreen | 3/2014 | O
Component/STU: windscreen washer device | 3/2014 | P
Component/STU: rearward visibility device | 3/2014 | Q
Component/STU: safety belts | 3/2014 | R
Component/STU: seating position (saddle/seat) | 3/2014 | S
LIST III — Vehicle construction and general type-approval requirements
System or component/separate technical unit (STU) | Commission Delegated Regulation (EU) No | alphanumerical character
System: functional on-board diagnostics (OBD Stage I: point 1.8.1. to 1.8.2 of Annex IV to Regulation (EU) 168/2013) | 44/2014 | T1
System: functional on-board diagnostics (OBD Stage II: point 1.8.3. of Annex IV to Regulation (EU) 168/2013) | 44/2014 | T2
STU: trailer coupling device | 44/2014 | U
STU: devices to prevent unauthorised use | 44/2014 | V
STU: passenger handholds | 44/2014 | W
STU: footrests | 44/2014 | X
STU: side-car | 44/2014 | Y
STU: fuel tank | 44/2014 | Z
ANNEX VIII

Format of test reports and template for the test results sheet
1.

General requirements for the format of test reports
1.1.
For each of the regulatory acts listed in Annex II to Regulation (EU) No 168/2013, the test reports shall comply with the provisions of Standard EN ISO/IEC 17025:2005. In particular it shall include the information mentioned in point 5.10.2, including footnote (1) of that standard.
1.2.
The test reports shall be drawn up by the technical service in accordance with its rules of good practice.
1.3.
The test report shall be drafted in one of the official EU languages determined by the approval authority.
1.3.1.
Where a test has been is issued in another language than the office language(s) of the Member State handling the approval application, the approval authority may require the applicant to provide a certified translation of the test report.
1.4.
Only authenticated copies of a test report shall be submitted.
1.5.

The test reports shall include a description of the vehicle tested including its unambiguous identification. The parts having significant influence role in determining the test results shall be described and their identification number indicated.
Examples of parts include the noise-abatement devices for noise measurement and the engine management system (ECU) for measuring tailpipe emissions.
Moreover it shall include at least the following information:
1. A detailed description of the characteristics of the vehicle, system, component or separate technical unit characteristics in connection with the regulatory act.
2. Category, subcategory and sub-subcategory of vehicle tested.
3. Tested vehicle sub-classification according to point 4.3. of Annex II to Commission Delegated Regulation (EU) No 134/2014.
4. The information shall indicate the variant(s) and/or version(s) to which it applies. One version shall not have more than one test result. However, a combination of several test results per version, indicating the worst case, is permissible. In this case, a note shall state that for items marked (*) only worst-case results are given.
5. When the tests are conducted on a vehicle, system, component or technical unit which combines a number of least favourable features concerning the required performance level (the worst-case), the test report shall include a reference stating how the selection was made by the manufacturer in agreement with the technical service.
6. Condition of the vehicle influencing the test, such as fitted accessories; actual masses; test voltage; tyre sizes; tyre pressures; etc.;
7. Identification of the system, component or separate technical unit tested;
8. Ambient conditions influencing the test: atmospheric pressure (kPa); relative humidity (%); ambient temperature (K); wind speed and direction on test track (km/h), etc.;
9. The measurement results specified in the relevant regulatory acts and, where required, the limits or thresholds to be met;
10. With regard to each measurement mentioned in point 1.5.5., the relevant decision: passed or failed;
11. A detailed statement of compliance with the various provisions to be met, i.e. provisions for which measurements were not required.
12. When test methods other than those prescribed in the regulatory acts are permitted, the report shall describe the test method used. The same applies when alternative provisions to those in the regulatory acts may be applied;
13. The number of photographs to be taken during testing shall be decided by the technical service to the satisfaction of the approval authority. In the case of virtual testing, screen prints or other suitable evidence may replace photographs;
14. Technical service and persons responsible for carrying out the test and their position in the organisation;
15. Conclusions drawn up;
16. When opinions, assumptions and interpretations have been made, they shall be documented properly and marked as such in the test report;
2.

Minimum information to be included in the test reports
2.1.
In addition to the general requirements set out in point 1, the test reports shall contain as a minimum the information set out in point 2.2. This information can be grouped in an executive summary of the test report(s) applicable to the vehicle, system, component and separate technical unit, or be included in the test report(s) itself/themselves.
2.2.
Minimum information of the test reports by subject (Annex II to Regulation (EU) 168/2013
2.2.1.

(A) Environmental and propulsion unit performance
2.2.1.1.

Generic information on environmental performance
The test report shall contain the following generic test data (only needed once per test type):
2.2.1.1.1.
Description of propulsion, propulsion family and drive-train of test vehicle(s) : …
2.2.1.1.2.
Environmental step of test vehicle: Euro 3, Euro 4, Euro 5, Euro 5+
2.2.1.1.3.
Description of emission test bench(es), specifications and settings : …
2.2.1.1.4.
Chassis/engine dynamometer(s) specifications : …
2.2.1.1.5.
Inertia (reference) mass and running resistance settings for single/dual roll chassis dynamometer : …
2.2.1.1.6.
Comprehensive report of road test results for the determination of test bench settings, including coast down times for single/dual roll chassis dynamometer : …
2.2.1.1.7.
Applicable test type I driving schedule (ECE R40 (with/without EUDC), ECE R47, WMTC stage 1, WMTC stage 2, revised WMTC) :
2.2.1.1.8.
Description gearshift prescriptions for environmental testing : …
2.2.1.2.

Test type I: requirements: tailpipe emissions after cold start
The following items specific to test type I shall be provided :
2.2.1.2.1.
Description of tested vehicle(s) (prototype(s) or series production, hardware and software levels, VIN) : …
2.2.1.2.2.
Any deviations by test vehicle(s) from data provided in information document, Annex I: yes/no . If yes, please provide list with deviations.
2.2.1.2.3.
Type-approval number if not parent vehicle : …
2.2.1.2.4.
Mileage(s) of test vehicle(s) : …
2.2.1.2.5.
Test fuel(s) used : …
2.2.1.2.6.
Description of test type I measurement methods for hybrid L-category vehicles referred to in Appendix 11 to Annex II to Commission Delegated Regulation (EU) No 134/2014 …
2.2.1.2.7.
Description of test type I measurement methods for gas-fuelled vehicles referred to in Appendix 12 to Annex II to Commission Delegated Regulation (EU) No 134/2014 …
2.2.1.2.8.
Description of test type I measurement methods for vehicles equipped with a periodically regenerating system referred to in Appendix 13 to Annex II to Commission Delegated Regulation (EU) No 134/2014 : …
2.2.1.2.9.
Information on regeneration strategy :
D (number of operating cycles between 2 cycles when regenerative phases occur) : …
d (number of operating cycles required for regeneration) : …
2.2.1.2.10.
Description of weighting of type I test results as referred to in point 6.1.1.5. of Annex II to Commission Delegated Regulation (EU) No 134/2014 including equation number and weighting factors : …
2.2.1.2.11.
Number of type I operating cycles between two cycles where regenerative phases occur under the conditions equivalent to type I test (Distance ‘D’ in Figure Ap13-1 in Appendix 13 to Annex II to Commission Delegated Regulation (EU) No 134/2014) : …
2.2.1.2.12.
Description of method employed to determine the number of cycles between two cycles where regenerative phases occur : …
2.2.1.2.13.
Parameters to determine the level of loading required before regeneration occurs (i.e. temperature, pressure etc.) : …
2.2.1.2.14.
Description of method used to load system in the test procedure described in point 3.1. of Appendix 13 to Annex II to Commission Delegated Regulation (EU) No 134/2014) : …
2.2.1.2.15.
Test records according to point 7 of Annex II to Commission Delegated Regulation (EU) No 134/2014 : …
2.2.1.2.16.

Type I test results :

Table 5-1

Test type 1 results
Where applicable.
Not applicable.
Mean value calculated by adding mean values (M · Ki) calculated for THC and NOx.
Round to 2 decimal places.
Round to 4 decimal places.
Round to 0 decimal places
Set Ki = 1 in case: 1. the vehicle is not equipped with a periodically regenerating emission abatement system or; 2. the vehicle is not a hybrid electric vehicle.
Test limit x set out in Annex VI(A) to Regulation (EU) No 168/2013. x = 1 to 4 and refers to the numbering of the pollutant constituents in Annex VI(A), e.g. the Euro 4 limit for CO is referred to as L1, the limit for THC is referred to as L2, the limit for NOx as L3 and the limit for PM as L4.
The individual THC and NOx measurement values shall also be filled out in this list.
Test Type I Test Results (TR TTIx) | Test No | CO | THC | NMHC | NOx | THC + NOx | PM
TR TTI Measured x (mg/km) | 1 | | | | | |
2 | | | | | |
3 | | | | | |
TR TTI Measured x Mean (mg/km) | | | | | | |
Ki ( no unit ) | | | | | | |
TR_{TTIx} = K_i × TR_{TTI Measured x Mean} (mg/km) & (% of Lx) | | | | | | |
Limit value Lx (mg/km) | | | | | | |
2.2.1.3.

Test type II requirements: tailpipe emissions at (increased idle)/free acceleration
2.2.1.3.1.
Details of test vehicle(s) if different from vehicle used for type I testing : (items 2.1.2.1.1. to 2.1.2.1.4. where different) : …
2.2.1.3.2.
Description of propulsion idling activation method in case of stop-start system : …
2.2.1.3.3.
Type II test results :

Table 5-2

Test type II results
Test | HC (ppm) | CO (% vol.) | Lambda | Engine speed (min-) | Engine oil temperature (K) | Measured & corrected value of absorption coefficient (m -1 )
PI: Low idle test | | | | | | —
PI: High idle test | | | | | | —
CI — Free acceleration test / Smoke opacity test results | — | — | — | — | — |
2.2.1.4.

Test type III requirements: emissions of crank-case gases
2.2.1.4.1.
Details of test vehicle(s) if different from vehicle used for type I testing : (items 2.1.2.1.1. to 2.1.2.1.4. where different) : …
2.2.1.4.2.
Type of crank-case gas recycling system (breather system, positive crank-case ventilation system, other)
2.2.1.4.3.
System for recycling crank-case gases (description and drawings) : …
2.2.1.4.4.
Test type III performance results :
2.2.1.4.5.
Zero emissions from the crank-case gas system: yes/no :
2.2.1.5.

Type IV test requirements: evaporative emissions
2.2.1.5.1.

Evaporative emissions control system: yes/no
2.2.1.5.2.
List of ‘golden components’ used for evaporative emission testing complete with series, part and marking number : …
2.2.1.5.3.
Fuel permeability test result : … mg/day.
2.2.1.5.4.

If the approved L-category vehicle complies with the evaporative emission requirements of Euro 4, the manufacturer shall indicate the SHED laboratory test type IV results TR TTIVST in the table below. The SHED test results shall indicate both mg/test and % of LTTIVST
2.2.1.5.5.

Euro 4 evaporative emission test results

Table 5-3

Euro 4 SHED test type IV results
Vehicle category | SHED test limit LTTIVST: Mass of total hydrocarbons (THC) (mg/test) | SHED test result TR TTIVST: Mass of total hydrocarbons (THC) (mg/test) & (% of LTTIVST)
L3e | |
L4e | |
L5e-A | LTTIVST: 2 000 | TR TTIVST:
L6e-A | |
L7e-A | |
2.2.1.5.6.
If the approved L-category vehicle complies with the evaporative emission requirements of the Euro 5 step, the manufacturer shall provide :
2.2.1.5.6.1.
The SHED laboratory test type IV results TR TTIVST to be indicated in the applicable part of the table below. The test results shall indicate both mg/test and % of LTTIVST
2.2.1.5.6.2.
The evaporative emissions test type IV results TR TTIVPT and TR TTIVPT to be indicated in the applicable part of the table below. The test results shall indicate both mg/m2/day and % of LTTIVPTftnk and % of LTTIVPTftbg
2.2.1.5.6.3.

Euro 5 evaporative emission test results

Table 5-4

Euro 5 SHED or permeation test type IV results
Vehicle category | Permeation test(mg/m2/day) & (% of LTTIVPT) | Mass of total Hydrocarbons (THC) in SHED test(mg/test) & (% of LTTIVST)
| Fuel tank | Fuel tubing | Vehicle
L1e-A | LTTIVPTftnk: 1 500 | LTTIVPTftbg: 15 000 | LTTIVST: 1 500
TR TTIVPTftnk: | TR TTIVPTftbg: | TR TTIVST:
L1e-B | LTTIVPTftnk: 1 500 | LTTIVPTftbg: 15 000 | LTTIVST: 1 500
TR TTIVPTftnk: | TR TTIVPTftbg: | TR TTIVST:
L2e | LTTIVPTftnk: 1 500 | LTTIVPTftbg: 15 000 | LTTIVST: 1 500
TR TTIVPTftnk: | TR TTIVPTftbg: | TR TTIVST:
L3e | — | — | LTTIVST: 1 500
— | — | TR TTIVST:
L4e | — | — | LTTIVST: 1 500
— | — | TR TTIVST:
L5e-A | — | — | LTTIVST: 1 500
— | — | TR TTIVST:
L5e-B | LTTIVPTftnk: 1 500 | LTTIVPTftbg: 15 000 | LTTIVST: 1 500
TR TTIVPTftnk: | TR TTIVPTftbg: | TR TTIVST:
L6e-A | — | — | LTTIVST: 1 500
— | — | TR TTIVST:
L6e-B | LTTIVPTftnk: 1 500 | LTTIVPTftbg: 15 000 | LTTIVST: 1 500
TR TTIVPTftnk: | TR TTIVPTftbg: | TR TTIVST:
L7e-A | — | — | LTTIVST: 1 500
— | — | TR TTIVST:
L7e-B | LTTIVPTftnk: 1 500 | LTTIVPTftbg: 15 000 | LTTTIVST: 1 500
TR TTIVPTftnk: | TR TTIVPTftbg: | TR TTIVST:
L7e-C | LTTIVPTftnk: 1 500 | LTTIVPTftbg: 15 000 | LTTIVST: 1 500
TR TTIVPTftnk: | TR TTIVPTftbg: | TR TTIVST:
2.2.1.6.

Test type V requirements: durability of pollution-control devices
2.2.1.6.1.
Details of test vehicle(s), its powertrain and pollution-control devices explicitly documented and listed, emission test laboratory equipment and settings, if different from data reported under items 2.1.2.1.1. to 2.1.2.1.10 : …
2.2.1.6.2.
Test type V carried out on: test track, on the road, on a chassis dynamometer
2.2.1.6.3.
The test type V data outcome and the correspondent test report shall vary in relation with the chosen durability procedure set out in Article 23(3) of Regulation (EU) No 168/2013, established as follows :
2.2.1.6.3.1.

Test type V conducted according to Article 23(3a): full mileage accumulation
2.2.1.6.3.1.1.
Test cycle used (US EPA AMA cycle, SRC-LeCV) : …
2.2.1.6.3.1.2.
In the case of SRC-LeCV, applicable durability test cycle vehicle group, refer to Appendix 1 to Annex V to Commission Delegated Regulation (EU) No 134/2014 (SRC-LeCV group No 1, 2, 3 or 4) :
2.2.1.6.3.1.3.
In the case of SRC-LeCV, amount of test type V soak procedures: …
2.2.1.6.3.1.4.
In the case of US EPA AMA cycle, classification according to Appendix 2 to Annex V to Commission Delegated Regulation (EU) No 134/2014 (class I, II or III) .
2.2.1.6.3.1.5.
Mileage test vehicle(s) : …
2.2.1.6.3.1.6.
Catalyst time-at-temperature data histogram : …
2.2.1.6.3.1.6.
List of maintenance and adjustments over mileage accumulation : …
2.2.1.6.3.1.7.
The collection of test type I results (1 to n), ( see 2.2.1.2.16.), the calculated slopes and offsets, and the calculated test type V results shall be entered in the table below .
2.2.1.6.3.1.8.

Table 5-5

Test type V results in case of compliance with Article 23(3a) of Regulation (EU) No 168/2013
Where applicable.
The individual THC and NOx measurement values shall also be entered in this list.
Final mileage set out in Annex VII(A) to Regulation (EU) No 168/2013
Round to 0 decimal places
Test limit x set out in Annex VI(A) to Regulation (EU) No 168/2013. x = 1 to 4 and refers to the numbering of the pollutant constituents in Annex VI(A); e.g. the Euro 4 limit for CO is referred to as L1, the limit for THC is referred to as L2, the limit for NOx as L3 and the limit for PM as L4.
Test Type V Test Results (TR TTVx) | Test No | Accumulated mileage (km) | CO | THC | NMHC | NOx | THC + NOx | PM
TR TTVx (mg/km) & (% of Lx) | 1 | 100 km | | | | | |
TR TTVx (mg/km) & (% of Lx) | 2 | … | | | | | |
TR TTVx (mg/km) & (% of Lx) | 3 | … | | | | | |
TR TTVx (mg/km) & (% of Lx) | N | | | | | | |
Limit value Lx | | | | | | | |
2.2.1.6.3.2.
Test type V conducted according to Article 23(3b): partial mileage accumulation .
2.2.1.6.3.2.1.
Test cycle used (SRC-LeCV): yes/no : …
2.2.1.6.3.2.2.
Applicable SRC-LeCV durability test cycle vehicle group: refer to Commission Delegated Regulation (EU) No 134/2014 (SRC-LeCV group No 1, 2, 3 or 4) :
2.2.1.6.3.2.3.
Amount of SRC-LeCV soak procedures : …
2.2.1.6.3.2.4.
Mileage test vehicle(s) : …
2.2.1.6.3.2.5.
Applied stop criteria: yes/no , which: …
2.2.1.6.3.2.6.
List of ‘golden components’ complete with series, part and marking number . …
2.2.1.6.3.2.7.
List of ‘new components’ complete with series, part and marking number . …
2.2.1.6.3.2.8.
Catalyst time-at-temperature data histogram : …
2.2.1.6.3.2.9.
List of maintenance and adjustments over mileage accumulation . …
2.2.1.6.3.2.10.
The collection of test type I results (1 to n), (see 2.2.1.2.16.), the calculated slopes and offsets, and the calculated test type V results shall be entered in the table below .
2.2.1.6.3.2.11.

Table 5-6

Test type V results in case of compliance with Article 23(3b) of Regulation (EU) No 168/2013
Where applicable.
Round to two decimal places.
Round to 0 decimal places
Test limit x set out in Annex VI(A) to Regulation (EU) No 168/2013. x = 1 to 4 and refers to the numbering of the pollutant constituents in Annex VI(A); e.g. the Euro 4 limit for CO is referred to as L1, the limit for THC is referred to as L2, the limit for NOx as L3 and the limit for PM as L4.
(iii) > 50 % of final mileage set out in Annex VII(A) to Regulation (EU) No 168/2013
Test Type V Test Results (TR TTV) | Test No | Accumulated mileage (km) | CO | THC | NMHC | NOx | THC + NOx | PM
TR TTV1x (mg/km) & (% of Lx) | 1 | 100 km | | | | | |
Slope a (no unit) | | | | | | | |
Offset b (no unit) | | | | | | | |
Final calculated TR_{TTVFin} = a × TR_{TTVnx} + b (mg/km) & (% of Lx) | N | | | | | | |
Limit value Lx (mg/km) | | | | | | | |
2.2.1.6.3.3.
Test type V conducted according to Article 23(3c) of Regulation (EU) No 168/2013, mathematical durability procedure .
2.2.1.6.3.3.1.
The Test Type I results of a vehicle with a mileage of 100 km or more, (see 2.2.1.2.16.), and the applicable deterioration factors set out in Annex VII(B) to Regulation (EU) No 168/2013 shall be entered in the table below along with the calculated test type V results .
2.2.1.6.3.3.2.

Table 5-7

Test type V results in case of compliance with Article 23(3c) of Regulation (EU) No 168/2013
Where applicable.
Round to 0 decimal places.
Fixed deterioration factors set out in Annex VII(B) to Regulation (EU) No 168/2013; x = 1 to 4 and refers to the numbering of the pollutant constituents in Annex VI(A); e.g. the Euro 4 limit for CO is referred to as L1, the limit for THC is referred to as L2, the limit for NOx as L3 and the limit for PM as L4.
Test limit x set out in Annex VI(A) to Regulation (EU) No 168/2013, x refers to the pollutant constituent numbering as explained under (iii).
Replace x by 100, 2 500 , or 3 500 , in accordance with the provisions set out in Article 23(3), point (c) of Regulation (EU) No 168/2013.
Test Type V Test Results (TR TTV) | Accumulated mileage (km) | CO | THC | NMHC(mg/km) | NOx(mg/km) | THC + NOx(mg/km) | PM(mg/km)
x km | 100 km | | | | | |
Deterioration Factor DFx (no unit) | | | | | | |
Final calculated TR_{TTVFin} = DF_x × TR_{TTVnx} (mg/km) & (% of Lx) | | | | | | |
Limit value Lx (mg/km) | | | | | | |
2.2.1.7.

Test type VI has not been assigned; consequently there are no results to be submitted
2.2.1.8.

Test type VII requirements: measurement of CO2 emissions, fuel consumption, electric energy consumption and electric range determination
2.2.1.8.1.
Details of test vehicle(s), its powertrain and pollution-control devices explicitly documented and listed, emission test laboratory equipment and settings if different from data reported under items 2.1.2.1.1. to 2.1.2.1.10 …
2.2.1.8.2.
Documentation added according to UNECE Regulation No 101 (OJ L 138, 26.5.2012, p. 1): yes/no
2.2.1.8.3.
The vehicle manufacturer has ensured that the CO2 emissions, fuel consumption, electric energy consumption and electric range data are provided to the buyer of the vehicle at the time of purchase of a new vehicle: yes/no
2.2.1.8.4.
A completed specimen of the test type VII result format used to inform the buyer of the new vehicle is added to the information document: yes/no
2.2.1.8.5.
Type VII test results, where applicable and for each reference fuel tested :
2.2.1.8.6.

CO 2 emissions and fuel consumption

Table 5-8

Test Type VII result table for propulsions equipped with a combustion engine only or equipped with not-externally-chargeable (NOVC) hybrid electric propulsion
Where applicable.
Round to 2 decimal places.
Round to 4 decimal places.
Round to 0 decimal places
Set K i = 1 in case: 1. the vehicle is not equipped with a periodically regenerating emission abatement system or; 2. the vehicle is not a hybrid electric vehicle.
Test Type VII Test Results (TR TTVII ) | Test No | CO 2 (g/km) | Fuel consumption (l/100km) or (kg/100 km)
TR TTI Measured x | 1 | |
2 | |
3 | |
TR TTI Measured Mean | | |
K i (no unit ) | | |
TR TTVIIx = K i · TR TTI Measured x Mean | | |
CO 2 and Fuel consumption as declared by the manufacturer | — | |
2.2.1.8.7.

CO 2 emissions/fuel consumption (manufacturer's declared values)
Electric energy consumption and electric range :

Table 5-9

Test Type VII result table for pure electric propulsion or not-externally-chargeable (NOVC) propulsions equipped with an electric motor for propulsion
| Measured electric energy consumption (Wh/km) | Declared electric energy consumption (Wh/km) | Measured electric range (km) | Declared electric range (km)
Pure electric powertrain | | | |
NOVC hybrid electric powertrain | | | |
2.2.1.9.

Test type VIII requirements: environmental on-board diagnostic (OBD)
2.2.1.9.1.
Details of test vehicle(s), its powertrain and pollution-control devices explicitly documented and listed, emission test laboratory equipment and settings, if different from data reported under items 2.1.2.1.1. to 2.1.2.1.10 : …
2.2.1.9.2.
The manufacturer shall enter the emission laboratory test type VIII results TR TTVIIIx in the table below (both in mg/km and in % of TR TTVIIIx) : …
2.2.1.9.3.

Test type VIII environmental results (Annex VI (B1) to Regulation (EU) No 168/2013)

Table 5-11

OBD emission thresholds (section B1 of Annex VI to Regulation (EU) No 168/2013) and environmental test results in case of malfunction
Vehicle category | Propulsion class | OBD Thresholds (OTx) / OBD Test results (TR TTVIIIx) x = 1 to 3 | Mass of carbon monoxide (CO) | Mass of total hydrocarbons(THC) | Mass of oxides of nitrogen (NOx)
L3e L4e L5e-A L7e-A | PI / PI Hybrid vmax < 130 km/h | OTx (mg / km) | OT1: 2 170 | OT2: 1 400 | OT3: 350
TR TTVIIIx (mg / km) & (% of OTx) | TR TTVIII1 | TR TTVIII2 | TR TTVIII3
PI / PI Hybrid vmax ≥ 130 km/h | OTx (mg / km) | OT1: 2 170 | OT2: 630 | OT3: 450
TR TTVIIIx (mg / km) & (% of OTx) | TR TTVIII1: | TR TTVIII2: | TR TTVIII3:
CI / CI Hybrid | OTx (mg / km) | OT1: 2 170 | OT2: 630 | OT3: 900
OTR TTVIIIx (mg / km) & (% of OTx) | TR TTVIII1: | TR TTVIII2: | TR TTVIII3:
2.2.1.9.4.

Test type VIII environmental results (Annex VI (B2) to Regulation (EU) No 168/2013)

Table 5-12

OBD emission thresholds (section B2 of Annex VI to Regulation (EU) No 168/2013) and environmental test results in case of malfunction
Vehicle category | Propulsion class | OBD Thresholds (OTx) / OBD test results (TR TTVIIIx) x = 1 to 3 | Mass of carbon-monoxide (CO) | Mass of non-methane hydrocar-bons (NMHC) | Mass of oxides of nitrogen (NOx) | Mass of particulate matter (PM)
L3e, L4e, L5e and L7e | PI / PI Hybrid | OTx (mg / km) | OT1: 1 900 | OT2: 250 | OT3: 300 | OT4: 50
TR TTVIIIx (mg / km) & (% of OTx) | TR TTVIII1: | TR TTVIII2B: | TR TTVIII3: | TR TTVIII4:
CI / CI Hybrid | OTx (mg / km) | OT1: 1 900 | OT2: 320 | OT3: 540 | OT4: 50
TR TTVIIIx (mg / km) & (% of OTx) | TR TTVIII1: | TR TTVIII2: | TR TTVIII3: | TR TTVIII4:
2.2.1.10.

Test type IX requirements: sound level
2.2.1.10.1.
Details of test vehicle(s), its powertrain and noise-abatement control devices explicitly documented and listed, test equipment and settings : …
2.2.1.10.2.
The approved L-category vehicle complies with UNECE Regulation No 9: yes/no
2.2.1.10.3.
The approved L-category vehicle complies with UNECE Regulation No 41: yes/no
2.2.1.10.4.
The approved L-category vehicle complies with UNECE Regulation No 63: yes/no
2.2.1.10.5.
The replacements noise-abatement device(s) for the approved L-category vehicle comply with UNECE Regulation No 92: yes/no
2.2.1.10.6.
The approved L-category vehicle complies with the test requirements of Annex IX to Commission Delegated Regulation (EU) No 134/2014 and the administrative requirements of the equivalent UNECE Regulations have been included with the information document as set out in table 5-13 of Annex VIII: yes/no
2.2.1.10.7.
Replacement noise-abatement device(s) make(s) and type(s) : …
2.2.1.10.8.
Location of the type-approval number (add drawings, photographs) : …
2.2.1.10.9.
The test results shall be reported according to the administrative requirements set out in the table below :

Table 5-13

Test result requirements regarding sound level
Sound emission level | Euro 4 | Euro 5
Sound level limits | Annex VI(D) to Regulation (EU) No 168/2013 | Equivalent UNECE sound level limits to Annex VI(D) to Regulation (EU) No 168/2013 | Annex VI(D) to Regulation (EU) No 168/2013
Test requirements | Annex VIII to Regulation (EU) No 168/2013 | UNECE Regulations referred to in Annex VI(D) to Regulation (EU) No 168/2013 | UNECE Regulations referred to in Annex VI(D) to Regulation (EU) No 168/2013
Administrative requirements for vehicle subcategories regarding sound level:
Vehicle (sub)categories | |
L1e, L6e-A | Annex I to UNECE Regulation No 63 | UNECE Regulation No 63
L3e | Annex I to UNECE Regulation No 41 | UNECE Regulation No 41
L2e, L4e, L5e, L6e-B, L7e | Annex I to UNECE Regulation No 9 | UNECE Regulation No 9
Replacement exhaust noise-abatement devices all categories | Annex I to UNECE Regulation No 92 | UNECE Regulation No 92
2.2.1.10.10.
In addition the manufacturer shall enter the test type IX results TR TTIX in the table below where applicable (both in dB(A) and in % of SL EUx) :
2.2.1.10.11.

Euro 4 or Euro 5 sound test results

Table 5-14

Sound level test results Euro 4 or Euro 5
Vehicle category | Propulsion class | Euro 4 sound level limit SL EU4 (dB(A)) / Euro 4 test results TR TTIXEU4 (dB(A))& (% of SL EU4 ) | Euro 4 sound test procedure | Euro 5 sound level limit SL EU5 (dB(A)) / Euro 5 test results TR TTIXEU5 (dB(A)) & (% of SL EU5 ) | Euro 5 sound test procedure
L1e-A | PI / CI / Hybrid | SL EU4 :63 | Commission Delegated Regulation (EU) No 134/2014 Annex VIII / UNECE Regulation No 63 | SL EU5 : | UNECE Regulation No 63
TR TTIXEU4 : | TR TTIXEU5 :
L1e-B | PI / CI / Hybrid v max ≤ 25 km/h | SL EU4 :66 | SL EU5 :
TR TTIXEU4 : | TR TTIXEU5 :
PI / CI / Hybrid v max ≤ 45 km/h | SL EU4 :71 | SL EU5 :
TR TTIXEU4 : | TR TTIXEU5 :
L2e | PI / CI / Hybrid | SL EU4 :76 | Commission Delegated Regulation (EU) No 134/2014 Annex VIII / UNECE Regulation No 9 | SL EU5 : | UNECE Regulation No 9
STR EU4 : | STR EU5 :
L3e | PI / CI / Hybrid PMR ≤ 25 | SL EU4 :73 | UNECE Regulation No 41 | SL EU5 : | UNECE Regulation No 41
TR TTIXEU4 : | TR TTIXEU5 :
PI / CI / Hybrid 25 < PMR ≤ 50 | SL EU4 :74 | SL EU5 :
STR EU4 : | STR EU5 :
PI / CI / Hybrid PMR > 50 | SL EU4 :77 | SL EU5 :
TR TTIXEU4 : | TR TTIXEU5 :
L4e | PI / CI / Hybrid | SL EU4 :80 | Commission Delegated Regulation (EU) No 134/2014 Annex VIII / UNECE Regulation No 9 | SL EU5 : | UNECE Regulation No 9
TR TTIXEU4 | TR TTIXEU5 :
L5e-A | PI / CI / Hybrid | SL EU4 :80 | Commission Delegated Regulation (EU) No 134/2014 Annex VIII / UNECE Regulation No 9 | SL EU5 : | UNECE Regulation No 9
STR EU4 : | STR EU5 :
L5e-B | PI / CI / Hybrid | SL EU4 :80 | SL EU5 :
STR EU4 : | STR EU5 :
L6e-A | PI / CI / Hybrid | SL EU4 :80 | Commission Delegated Regulation (EU) No 134/2014 Annex VIII / UNECE Regulation No 63 | SL EU5 : | UNECE Regulation No 63
TR TTIXEU4 : | TR TTIXEU5 :
L6e-B | PI / CI / Hybrid | SL EU4 :80 | Commission Delegated Regulation (EU) No 134/2014 Annex VIII / UNECE Regulation No 9 | SL EU5 : | UNECE Regulation No 9
TR TTIXEU4 : | TR TTIXEU5 :
L7e-A | PI / CI / Hybrid | SL EU4 :80 | SL EU5 :
TR TTIXEU4 : | TR TTIXEU5 :
L7e-B | PI / CI / Hybrid | SL EU4 :80 | SL EU5 :
TR TTIXEU4 : | TR TTIXEU5 :
L7e-C | PI / CI / Hybrid | SL EU4 :80 | SL EU5 :
TR TTIXEU4 | TR TTIXEU5 :
2.2.1.10.12.
Stationary sound level: … dB(A) at engine speed: … min
-1
2.2.1.10.13.
Replacement noise-abatement device(s) make(s) and type(s) : …
2.2.1.10.14.
Location of the type-approval number (add drawings, photographs) : …
2.2.1.11.

Propulsion unit performance test results
2.2.1.11.1.

Propulsion unit performance data to be provided to measure/determine the maximum vehicle design speed
2.2.1.11.1.1.
Details of hardware and software of test vehicle(s), fitted components and accessories referred to in Annex X to Commission Delegated Regulation (EU) No 134/2014, Any deviations by test vehicle(s) from data provided in information document, Annex I: yes/no . If yes, please provide list with deviations relevant for measuring the maximum vehicle design speed and gear in which it was reached : …
2.2.1.11.1.2.
Test mass in running order : mass plus rider/driver : …
2.2.1.11.1.3.
Test fuel specifications : …
2.2.1.11.1.4.
Powertrain lubricant specifications : …
2.2.1.11.1.5.
Atmospheric pressure : … kPa
2.2.1.11.1.6.
Relative humidity : … %
2.2.1.11.1.7.
Ambient temperature : … K
2.2.1.11.1.8.
Wind speed and direction on test track : … km/h
2.2.1.11.1.9.
Test track condition (temperature, level of moisture etc.) : …
2.2.1.11.1.10.
Maximum vehicle design speed measured and gear in which it is reached : … km/h at … min-1 in gear no: …
2.2.1.11.1.11.

Maximum vehicle design speed
2.2.1.11.1.12.
Exemption L3e-A3 and L4e-A3 vehicles; maximum vehicle design speed declared by manufacturer : … km/h at … min-1 in gear no: …
2.2.1.11.2.

Propulsion unit performance data to be provided to measure/determine the torque and power of the propulsion on the engine dynamometer
2.2.1.11.2.1.
Details of propulsion(s) hardware and software tested, test equipment and settings relevant for propulsion unit performance measurements on engine dynamometer tests : …
2.2.1.11.2.1.1.

List of components and part numbers/markings relevant for propulsion unit performance measurement on engine dynamometer, referred to in Annex X to Commission Delegated Regulation (EU) No 134/2014
2.2.1.11.2.1.2.
Test fuel : …
2.2.1.11.2.1.3.
Powertrain lubricant specifications : …
2.2.1.11.2.1.4.
Atmospheric pressure : … kPa
2.2.1.11.2.1.5.
Relative humidity : … %
2.2.1.11.2.1.6.
Ambient temperature : … K
2.2.1.11.2.1.7.
Correction factor for reference atmospheric conditions α1 : …
2.2.1.11.2.1.8.
Correction factor for the efficiency of the transmission α2 : …
2.2.1.11.2.1.9.
Engine cooling temperature : … K
2.2.1.11.2.1.10.
Oil temperature at measuring point : … K
2.2.1.11.2.1.11.
Exhaust temperature : … K
2.2.1.11.2.1.12.
The manufacturer shall indicate the propulsion unit performance test results below :
2.2.1.11.2.1.13.
Maximum permitted combustion engine/electric motor/propulsion rotation speed: … min-1
2.2.1.11.2.1.14.
Maximum net power combustion engine : … kW at … min-1 at A/F ratio: …
2.2.1.11.2.1.15.
Maximum net torque combustion engine : … Nm at … min-1 at A/F ratio: …
2.2.1.11.2.1.16.
Maximum continuous-rated power electric motor : … kW at … min-1
2.2.1.11.2.1.17.
Maximum continuous-rated torque electric motor : … Nm at … min-1
2.2.1.11.2.1.18.
Maximum current e-motor at maximum continuous-rated power : … A
2.2.1.11.2.1.19.
Maximum continuous total power for propulsion(s) : … kW at … min-1 at A/F ratio: …
2.2.1.11.2.1.20.
Maximum continuous total torque for propulsion(s) : … Nm at … min-1 at A/F ratio: …
2.2.1.11.2.1.21.
Maximum peak power for propulsion(s) : … kW at … min-1 at A/F ratio: …
2.2.1.11.2.1.22.
Power/mass in running order ratio : … kW/kg at … min-1 at A/F ratio: …
2.2.1.11.2.1.23.
Specific fuel consumption, g/kWh at maximum net power and power :
2.2.1.11.2.1.24.
Propulsion unit performance sweep graphs of total power and torque vs. engine speed (1 200 rpm to propulsion speed governor rpm, step 400 rpm). Secondary variables: spark angle, A/F ratio and mass air-flow (measured or calculated) :
2.2.1.11.2.1.25.
Maximum speed of vehicle and gear in which it is reached … km/h) (only for subcategories: L1e, L2e, L6e, L7e-B1, L7e-C)
2.2.1.11.2.1.26.
Maximum declared vehicle speed: … km/h) (only for subcategories without maximum vehicle speed limitation: L3e, L4e, L5e, L7e-A and L7e-B2)
2.2.2.

(B) Functional safety test reports
2.2.2.1.

Front and rear protective structures
2.2.2.1.1.
Description and justification of the relevant provisions against which the vehicles has been assessed : …
2.2.2.2.

Driver-operated controls including identification of controls, tell-tales and indicators
2.2.2.2.1.
Detailed list of controls, tell-tales, tell-tales colours and indicators of the vehicle : …
2.2.2.2.2.
Assessment of the visibility : …
2.2.2.3.

Installation of lighting and light-signalling devices, including automatic light switching
2.2.3.1.
Specific test conditions (e.g. indicator-bulb malfunction) : …
2.2.2.4.

Safety belt anchorages and safety belts
2.2.2.4.1.
Description and justification of the relevant provisions against which the vehicle has been assessed : …
2.2.2.5.

Installation of tyres
2.2.2.5.1.
Maximum tyre envelope sizes applied for the clearance assessment : …
2.2.2.6.

Vehicle occupant protection, including interior fittings and vehicle doors
2.2.2.6.1.
Values of radii measurement of interior projections in sufficient detail : …
2.2.2.7.

Maximum continuous total power and/or maximum vehicle speed limitation by design
2.2.2.7.1.
Maximum vehicle speed and/or maximum continuous total power for vehicles equipped with PI/CI combustion engine limited by :
1. the properties, timing or presence of the spark igniting the fuel/air mixture in the cylinder(s): yes/no
2. the amount of air intake of the engine: yes/no
3. the amount of fuel intake of the engine: yes/no
4. the mechanically-controlled output rotation speed of the drive-train, such as clutch, transmission or final drive: yes/no
2.2.2.7.2.
Maximum vehicle speed and/or maximum power shall be limited by means of two or more of the following, for vehicles which are propelled by means of one or more electric motors, including pure and hybrid electric vehicles:
1. reduction of the maximum power output of one or more electric motors based on the vehicle or rotation speed as sensed internally to the electric motor: yes/no
2. reduction of the maximum power output of one or more electric motors based on the actual vehicle speed as sensed fully externally to the electric motor: yes/no
3. physical vehicle speed limitation by means of internal or external components such as a maximum achievable revolution speed of an electric motor: yes/no
2.2.2.7.3.
Maximum vehicle speed and/or maximum power shall be limited by means of two or more of the following, for vehicles which are propelled by other means than those referred to in 2.2.7.1. and 2.2.7.2. : …
2.2.3.

(C) Vehicle construction test reports
2.2.3.1.

Arrangements for type-approval procedures
Delegated act reference | Annex No | Virtual and/or self-testing | Subject | Restrictions / Comments | Applied
Commission Delegated Regulation (EU) No 134/2014 | IX | Self-testing | Testing procedures on maximum vehicle design speed | Only for subcategories L3e-A3, L4e-A3 and L5e and does not include any other propulsion unit performance testing. | yes/no
Commission Delegated Regulation (EU) No 3/2014 | II | Self-testing | Audible warning devices | Installation only | yes/no
Commission Delegated Regulation (EU) No 3/2014 | VIII | Self-testing | Driver-operated controls including identification of controls, tell-tales and indicators | Speedometer only | yes/no
Commission Delegated Regulation (EU) No 3/2014 | IX | Virtual testing | Installation of lighting and light- signalling devices | Dimensions only | yes/no
Commission Delegated Regulation (EU) No 3/2014 | X | Virtual testing | Rearward visibility | Installation only; only according to UNECE Regulation No 81 | yes/no
Commission Delegated Regulation (EU) No 3/2014 | XIV | Virtual testing | Installation of tyres | Only where clearance exceeds 10 mm. | yes/no
Commission Delegated Regulation (EU) No 44/2014 | XIV | Self & virtual testing | Registration plate space | | yes/no
Commission Delegated Regulation (EU) No 44/2014 | XVI | Self-testing | Stands | Only point 2.5. stand retention systems. | yes/no
This Commission Implementing Regulation | VIII | Self-testing | Statutory plate and EU type-approval mark | | yes/no
2.2.3.2.

Requirements applying to coupling devices and attachments
2.2.3.2.1.

Dynamic strength test (endurance test) coupling ball and/or head: passed/failed
2.2.3.2.2.
Test results dynamic strength test (endurance test) : …
2.2.3.3.

Requirements applying to external projections
2.2.3.3.1.
Values of radii measurement of exterior projections in sufficient detail : …
2.2.3.3.2.
Description and justification of the relevant provisions against which the vehicle has been assessed :
2.2.3.4.

On-board diagnostics (OBD) functional requirements
2.2.3.4.1.
Component | Diagnostic trouble code | Monitoring strategy | Fault detection criteria | MI activation criteria | Secondary parameters | Precondi-tioning | Demonstration test | Default mode
Catalyst | P0420 | Oxygen sensor 1 and 2 signals | Difference between sensor 1 and sensor 2 signals | 3 rd cycle | Engine speed, engine load, A/F mode, catalyst temperature | Two Type I cycles | Type I | None
2.2.3.5.

Stands
2.2.3.5.1.
Detailed description and assessment of the system used to prevent propulsion of the vehicle when the stand is in use: …
3.

Test results sheet
3.1.
The test-results sheet appended to the EU type-approval certificate, as set out in Article 30(3) of Regulation (EU) No 168/2013 shall have the structure and contain the information established in point 2.2. of this Annex.
Explanatory notes relating to Annex VIII:

(Footnotes and explanations not to be stated on the test report or the test results sheet)
ANNEX IX

Template and numbering system for the certificate for the placing on the market and entry into service of parts or equipment which may pose a serious risk to the correct functioning of essential systems

LIST OF APPENDICES
Appendix Number | Appendix title
1 | Model of the EU type-approval authorisation certificate for the placing on the market and entry into service of parts or equipment which may pose a serious risk to the correct functioning of essential systems
1.

General requirements
1.1.
The placing on the market of parts or equipment which may pose a serious risk to the correct functioning of systems that are essential for the safety of the vehicle or for its environmental performance shall be subject to authorisation in accordance with Article 51(3) of Regulation (EU) No 168/2013.
1.2.
Such authorisation shall take the form of a certificate, a model of which is contained in Appendix 1, and the numbering system of which is described in point 2.
1.3.
The certificate set out in point 1.2. shall include prescriptions for construction safety and functional safety, as well as for environmental protection and, where needed, for testing standards. They may be based on the Commission Delegated Regulations listed in Annex II to Regulation (EU) 168/2013, may be developed according to the relevant state of safety, environmental and testing technology, or, if this is an appropriate way of achieving the required safety or environmental objectives, may consist of a comparison of the part or equipment with the environmental or safety performance of the original vehicle, or of any of its parts, as appropriate.
1.4.
This Annex shall not be applicable to a part or piece of equipment before it is listed in Annex X. For any entry or group of entries in Annex X, a reasonable transitional period shall be fixed to allow the manufacturer of the part or equipment to apply for and obtain an authorisation. At the same time a date may be fixed, where appropriate, to exclude parts and equipment designed for vehicles type- approved before that date from the application of this Annex.
2.

Numbering system
2.1.
The number of the certificate for the placing on the market and entry into service of parts or equipment which may pose a serious risk to the correct functioning of essential systems shall consist of a total of five sections as detailed below. The sections shall be separated by an asterisk (‘*’).
2.1.1.
Section 1: The lower-case letter ‘e’ followed by the distinguishing number of the Member State (given in point 2.1 of Annex VII) issuing the certificate.
2.1.2.
Section 2: The number of Regulation (EU) 168/2013: ‘168/2013’ shall be indicated.
2.1.3.

Section 3: The identification of the part or component, according to the list in Annex X.
- for parts or equipment having a significant impact on the vehicle’s construction safety and/or functional safety, this means the symbol ‘I’ followed by the ‘/’character and the correspondent ‘Item No’ from table 10-1 in Annex X. The ‘Item No’ shall have three digits and start from ‘001’.
- for parts or equipment having a significant impact on the environmental performance of the vehicle, this means the symbol ‘II’ followed by the ‘/’character and the correspondent ‘Item No’ from table 10-2 in Annex X. The ‘Item No’ shall have three digits and start from ‘001’.
2.1.4.

Section 4: Sequential number for the certificate.
- a sequential number with leading zeros (as applicable), to denote the certificate number. The sequential number shall have three digits and start from ‘001’.
2.1.5.

Section 5: Sequential number to denote the extension of the certificate.
- a two-digit sequential number, with leading zero as applicable, starting from ‘00’ for each certificate number issued.
2.2.

Format of the numbering of a certificate (with fictive sequential numbers for explanation purposes).
Example of the number of a certificate issued by Bulgaria for parts or equipment integrated in a vehicle type-approved according to Regulation (EU) No 168/2013:
- e34*168/2013*II/002*148*00
— e34
  - Bulgaria (section 1)
— 168/2013
  - Regulation (EU) 168/2013 (section 2)
— II/002
  - Item 002 on the list of parts or equipment having a significant impact on the environmental performance of the vehicle (section 3)
— 148
  - certificate sequential number (section 4)
— 00
  - extension number (section 5)
Example of the number of a certificate issued by Austria for parts or equipment integrated in a vehicle type-approved according to Regulation (EU) No 168/2013, which has been extended once:
- e12*168/2013*I/034*225*01
— e12
  - Austria (section 1)
— 168/2013
  - Regulation (EU) 168/2013 (section 2)
— I/034
  - Item 034 on the list of parts or equipment having a significant impact on the vehicle’s construction safety and/or functional safety (section 3)
— 225
  - certificate sequential number (section 4)
— 01
  - extension number (section 5)
Appendix 1
Model of the EU type-approval authorisation certificate for the placing on the market and entry into service of parts or equipment which may pose a serious risk to the correct functioning of essential systems

EU authorisation certificate
MODEL

Format: A4 (210 × 297 mm)

EU AUTHORISATION CERTIFICATE
Stamp of approval authority
Communication concerning the
- authorisation certificate(1) - extension of authorisation certificate(1) - refusal of authorisation certificate(1) - withdrawal of authorisation certificate(1) | for the placing on the market and entry into service of parts or equipment which may pose a serious risk to the correct functioning of systems that are essential for the safety of the vehicle or for its environmental performance
SECTION I
Kind of part/equipment. …
Part/equipment numbers: …
EU authorisation certificate number: …
Reason for extension: …
Name and address of manufacturer: …
Name(s) and address(es) of manufacture plant(s): …
Name and address of the manufacturer’s representative (if any): …
SECTION II
The part/equipment is specifically intended for installation on the following vehicle(s):
Make (trade name of manufacturer): …
Type(s) : …
Variant(s) : …
Version(s) : …
SECTION III
Prescriptions for:
1. vehicle construction safety : …
2. vehicle functional safety : …
3. vehicle environmental protection : …
4. testing standards : …
SECTION IV
Prescriptions based on:
1. Annex(es) … to Commission Delegated Regulation (EU) No …/…, (and Annex(es) …(a) to Commission Delegated Regulation (EU) No …/…) as last amended by (Commission Delegated) Regulation (EU) No …/…
2. a comparison of the part/equipment with the safety/environmental performance of the original vehicle/parts of the original vehicle (explain) : …
SECTION V — TECHNICAL SERVICE
Technical service responsible for carrying out the tests: …
Date of test report: …
Number of test report: …
SECTION VI
The part /equipment does not/does impair the functioning of those systems that are essential for the safety of the vehicle or its environmental performance.
The authorisation certificate is granted/extended/refused/withdrawn
Place: …
Date: …
Name and signature (or visual representation of an ‘advanced electronic signature’ according to Directive 1999/93/EC, including data for verification): …
Attachments:
- Test report
Explanatory notes to Appendix 1

(Footnotes and explanations not to be stated on the certificate)
ANNEX X

List of parts or equipment which may pose a serious risk to the correct functioning of essential systems
I.

Parts or equipment having a significant impact on the vehicle’s construction safety and/or functional safety

Table 10-1

List of parts or equipment having a significant impact on vehicle safety
Item No | Item description | Performance requirement | Test procedure | Marking requirement | Packaging requirements
001 | […] | | | |
002 | | | | |
003 | | | | |
II.

Parts or equipment having a significant impact on the environmental performance of the vehicle

Table 10-2

List of parts or equipment having a significant impact on the environmental performance of the vehicle
Item No | Item description | Performance requirement | Test procedure | Marking requirement | Packaging requirements
001 | […] | | | |
002 | | | | |
003 | | | | |
OJ L 7, 10.1.2014, p. 1.
OJ L 25, 28.1.2014, p. 1.
Suppress the entry if not applicable.
Delete where not applicable (no deletion required when more than one entry is applicable).
Indicate the alphanumeric code Type-Variant-Version or ‘TVV’ allocated to each type, variant and version as set out in point 2.3 of Part B of Annex I.
Classified according to Article 4 of and Annex I to Regulation (EU) No 168/2013, the coding shall be indicated, e.g. ‘L3e-A1E’ for a low-performance Enduro motor-cycle.
Indicate the alphanumeric code Type-Variant-Version or ‘TVV’ allocated to each type, variant and version as set out in point 2.3 of Part B of Annex I. For the identification of variant and versions it may be employed the matrix set out in point 2.2 of Part B of Annex I.
Classified according to Article 4 of and Annex I to Regulation (EU) No 168/2013, the coding shall be indicated, e.g. ‘L3e-A1E’ for a low-performance Enduro motor-cycle.
Delete if not applicable.
Indicate the alphanumeric code Type-Variant-Version or ‘TVV’ allocated to each type, variant and version as set out in point 2.3 of Part B of Annex I. For the identification of variant and versions it may be employed the matrix set out in point 2.2 of Part B of Annex I.
Classified according to Article 4 of and Annex I to Regulation (EU) No 168/2013, the coding shall be indicated, e.g. ‘L3e-A1E’ for a low-performance Enduro motor-cycle.
CV means converted vehicle, and this entry states the information of the temporarily and reversibly modified configuration of the vehicle once it has been converted after first registration according to the manufacturer’s specifications in order to re-register it nationally (e.g. first registered L3e-A2 motorcycle converted to L3e-A3 motorcycle).(3i)
Classification in accordance with categories and subcategories in Article 4 of and Annex I to Regulation (EU) No 168/2013. The coding should be indicated, e.g.
‘
L3e-A1E
’
for a low-performance Enduro motorcycle.
The information contained in this entry shall be stated in entry No 04.
‘
Vehicle category
’
of the certificates of conformity issued in accordance with the template set out in Annex IV to Directive 2002/24/EC.
Delete where not applicable (no deletion required when more than one entry is applicable).

Suppress this entry of the certificate of conformity if not applicable to the vehicle
(3a)
Indicate the longitudinal distance between front axle and sidecar axle.
(3b)
applicable only for subcategories L2e-U, L5e-B, L6e-BU, L7e-CU
(3c)
applicable only for L2e, L4e, L5e, L6e, L7e or any other type of vehicle if equipped with twinned wheels
(3d)
applicable only for subcategory L3e-AxE endurance motorcycles and L3e-AxT trial motorcycles
(3e)
applicable only for vehicles with compression engine
(3f)
applicable only for subcategory L7e-B
(3g)
applicable only for vehicle categories L2e, L5e, L6e and L7e
(3h)
applicable only for vehicle categories L1e, L2e and L6e
(3i)
Information of the (L3e/L4e)-A2/(L3e/L4e)-A3 converted vehicle (CV) applicable only for vehicles laid down in point 1.7 of this Annex
(3k)
applicable only for vehicle category L4e
(3n)
applicable only for vehicles fitted with combustion engine
(3o)
applicable only for vehicles fitted with electric motor
(3p)
applicable only for vehicles fitted with hybrid application
(3q)
applicable only for cycles designed to pedal
( 3r )
Only applicable for vehicle category L3e
In the case of more than one electric motor indicate the addition of all the engines.
Delete where not applicable.
Indicate only the latest amendment in case of an amendment of one or more Articles of Regulation (EU) 168/2013, according to the amendment applied for the EU type-approval.
Indicate the alphanumeric code Type-Variant-Version or ‘TVV’ allocated to each type, variant and version as set out in point 2.3 of Part B of Annex I.
Classified according to Article 4 of and Annex I to Regulation (EU) No 168/2013, the coding shall be indicated, e.g. ‘L3e-A1E’ for a low-performance Enduro motor-cycle.
Applicable only for type-approval of a vehicle as an exemption for new technology or new concept, pursuant to Article 40 of Regulation (EU) No 168/2013
Applicable only for vehicle type-approval for a national small series, pursuant to Article 42 of Regulation (EU) No 168/2013.
Indicate the Member State.
Delete where not applicable.
Indicate only the latest amendment in case of an amendment of one or more Articles of Regulation (EU) 168/2013, according to the amendment applied for the EU type-approval.
Indicate the alphanumeric code Type-Variant-Version or ‘TVV’ allocated to each type, variant and version as set out in point 2.3 of Part B of Annex I.
Classified according to Article 4 of and Annex I to Regulation (EU) No 168/2013, the coding shall be indicated, e.g. ‘L3e-A1E’ for a low-performance Enduro motor-cycle.
Indicate the Member State.
Applicable only for type-approval of a vehicle as an exemption for new technology or new concept, pursuant to Article 40 of Regulation (EU) No 168/2013
Applicable only for vehicle type-approval for a national small series, pursuant to Article 42 of Regulation (EU) No 168/2013.
The Roman numeral of the relevant Annex to the Commission Delegated Regulation or multiple Roman numerals of the relevant Annexes to the same Commission Delegated Regulation.
Delete where not applicable.
Indicate the latest amendment of the Commission Delegated Regulation according to the amendment applied for the EU type-approval.
Provide this information for each vehicle type.
Indicate the alphanumeric code Type-Variant-Version or ‘TVV’ allocated to each type, variant and version as set out in point 2.3 of Part B of Annex I.
Classified according to Article 4 of and Annex I to Regulation (EU) No 168/2013, the coding shall be indicated, e.g. ‘L3e-A1E’ for a low-performance Enduro motor-cycle.
Applicable only for type-approval of a system as an exemption for new technology or new concept, pursuant to Article 40 of Regulation (EU) No 168/2013.
Indicate the Member State.
The Roman numeral of the relevant Annex to the Commission Delegated Regulation or multiple Roman numerals of the relevant Annexes to the same Commission Delegated Regulation.
Delete where not applicable.
Indicate the latest amendment of the Commission Delegated Regulation according to the amendment applied for the EU type-approval.
Provide this information for each vehicle type.
Indicate the alphanumeric code Type-Variant-Version or ‘TVV’ allocated to each type, variant and version as set out in point 2.3 of Part B of Annex I.
Classified according to Article 4 of and Annex I to Regulation (EU) No 168/2013, the coding shall be indicated, e.g. ‘L3e-A1E’ for a low-performance Enduro motor-cycle.
Applicable only for type-approval of a component or separate technical unit as an exemption for new technology or new concept, pursuant to Article 40 of Regulation (EU) No 168/2013
Indicate the Member State.
Delete where not applicable.
Identify the component or separate technical unit according to the first column of Table 1 in point 6 of Annex VII to this Regulation (e.g. devices to prevent unauthorised use).
In accordance with Article 31(4) of Regulation (EU) No 168/2013, indicate the restrictions of use and the special conditions for the mounting of the component/separate technical unit.
If applicable.
Delete where not applicable (no deletion required when more than one entry is applicable)
Indicate the upper and lower values for each variant.
Delete where not applicable.
Indicate the alphanumeric code Type-Variant-Version or ‘TVV’ allocated to each type, variant and version as set out in point 2.3 of Part B of Annex I.
The Roman numeral of the relevant Annex to the Commission Delegated Regulation or multiple Roman numerals of the relevant Annexes to the same Commission Delegated Regulation.
Indicate the latest amendment of the Commission Delegated Regulation according to the amendment applied for the EU type-approval.
Inserted by Commission Implementing Regulation (EU) 2020/239 of 20 February 2020 amending Implementing Regulation (EU) No 901/2014 with regard to the adaptation of the templates for type-approval procedures for two- or three-wheel vehicles and quadricycles to the environmental steps Euro 5 and Euro 5+ requirements (Text with EEA relevance).
Substituted by Commission Implementing Regulation (EU) 2016/1825 of 6 September 2016 amending Implementing Regulation (EU) No 901/2014 with regard to the administrative requirements for the approval and market surveillance of two- or three-wheel vehicles and quadricycles (Text with EEA relevance).
Inserted by Commission Implementing Regulation (EU) 2016/1825 of 6 September 2016 amending Implementing Regulation (EU) No 901/2014 with regard to the administrative requirements for the approval and market surveillance of two- or three-wheel vehicles and quadricycles (Text with EEA relevance).
Substituted by Commission Implementing Regulation (EU) 2020/239 of 20 February 2020 amending Implementing Regulation (EU) No 901/2014 with regard to the adaptation of the templates for type-approval procedures for two- or three-wheel vehicles and quadricycles to the environmental steps Euro 5 and Euro 5+ requirements (Text with EEA relevance).
Deleted by Commission Implementing Regulation (EU) 2016/1825 of 6 September 2016 amending Implementing Regulation (EU) No 901/2014 with regard to the administrative requirements for the approval and market surveillance of two- or three-wheel vehicles and quadricycles (Text with EEA relevance).
Substituted by Corrigendum to Commission Implementing Regulation (EU) No 901/2014 of 18 July 2014 implementing Regulation (EU) No 168/2013 of the European Parliament and of the Council with regard to the administrative requirements for the approval and market surveillance of two- or three-wheel vehicles and quadricycles (Official Journal of the European Union L 249 of 22 August 2014).
Substituted by Corrigendum to Commission Implementing Regulation (EU) 2016/1825 of 6 September 2016 amending Implementing Regulation (EU) No 901/2014 with regard to the administrative requirements for the approval and market surveillance of two- or three-wheel vehicles and quadricycles (Official Journal of the European Union L 279 of 15 October 2016).
Deleted by Commission Implementing Regulation (EU) 2020/239 of 20 February 2020 amending Implementing Regulation (EU) No 901/2014 with regard to the adaptation of the templates for type-approval procedures for two- or three-wheel vehicles and quadricycles to the environmental steps Euro 5 and Euro 5+ requirements (Text with EEA relevance).