Article 2 Definitions
For the purposes of this Regulation, the following definitions shall apply:
(a) ‘gluten’ means a protein fraction from wheat, rye, barley, oats or their crossbred varieties and derivatives thereof, to which some persons are intolerant and which is insoluble in water and 0,5 M sodium chloride solution;
(b) ‘wheat’ means any Triticum species.