CHAPTER II JOINT DECISION PROCESS

Article 13 Communication of the capital joint decision and liquidity joint decision
1. The consolidating supervisor shall provide the capital joint decision document and liquidity joint decision document to the management body of the EU parent institution in a timely manner and in any event by the deadline specified in the joint decision timetable pursuant to point (k) of Article 3(2). The consolidating supervisor shall confirm this communication to the relevant competent authorities.
2. The relevant competent authorities in a Member State shall provide to the management bodies of institutions which are authorised in that Member State the respective parts of the capital joint decision document and liquidity joint decision document that are relevant to each of those institutions in a timely manner and in any event by the deadline specified in the joint decision timetable pursuant to point (k) of Article 3(2).
3. The consolidating supervisor shall, where appropriate, discuss the capital joint decision document and liquidity joint decision document with the EU parent institution to explain the details of the decisions and their application.
4. The relevant competent authorities in a Member State shall, where appropriate, discuss with the institutions established in this Member State the respective parts of the capital joint decision document and liquidity joint decision document that are relevant to each of these institutions to explain the details of the decisions and their application.