CHAPTER VIII

CONDUCT OF A CLINICAL TRIAL, SUPERVISION BY THE SPONSOR, TRAINING AND EXPERIENCE, AUXILIARY MEDICINAL PRODUCTS

Suitability of clinical trial sites
Article 50
The facilities where the clinical trial is to be conducted shall be suitable for the conduct of the clinical trial in compliance with the requirements of this Regulation.