CHAPTER IV

APPLICATION DOSSIER

Language requirements
Article 26
The language of the application dossier, or parts thereof, shall be determined by the Member State concerned.
Member States, in applying the first paragraph, shall consider accepting, for the documentation not addressed to the subject, a commonly understood language in the medical field.