CHAPTER II

AUTHORISATION PROCEDURE FOR A CLINICAL TRIAL

Withdrawal
Article 12
The sponsor may withdraw the application at any time until the reporting date. In such a case, the application may only be withdrawn with respect to all Member States concerned. The reasons for the withdrawal shall be communicated through the EU portal.