CHAPTER VI

SPECIFICATION OF THE TRANSITIONAL PROVISIONS OF REGULATION (EU) No 575/2013 IN RELATION TO OWN FUNDS

Additional filters and deductions for the purposes of Article 481(1) of Regulation (EU) No 575/2013
Article 35
1
The adjustments to Common Equity Tier 1 items, Additional Tier 1 items and Tier 2 items, according to Article 481 of Regulation (EU) No 575/2013, shall be applied according to paragraphs 2 to 7.
2
Where, under the transposition measures of Directive 2006/48/EC and Directive 2006/49/EC, those deductions and filters result from own funds items as referred to in points (a), (b) and (c) of Article 57 of Directive 2006/48/EC, the adjustment shall be made to Common Equity Tier 1 items.
3
In cases other than those covered by paragraph 1, and where, under the transposition measures of Directive 2006/48/EC and Directive 2006/49/EC, these deductions and filters have been applied to the total of the items as referred to in Article 57(a) to (ca) of the Directive 2006/48/EC, taking into account Article 154 of that Directive, the adjustment shall be made to Additional Tier 1 items.
4
Where the amount of Additional Tier 1 items is lower than the related adjustment, the residual adjustment shall be made to Common Equity Tier 1 items.
5
In cases other than those covered by paragraphs 1 and 2, and where under the transposition measures of the Directive 2006/48/EC and the Directive 2006/49/EC, these deductions and filters have been applied to own funds items as referred to in Article 57(d) to (h) or total own funds of Directive 2006/48/EC and Directive 2006/49/EC, the adjustment shall be made to Tier 2 items.
6
Where the amount of Tier 2 items is lower than the related adjustment, the residual adjustment shall be made to Additional tier 1 items.
7
Where the amount of Tier 2 and Additional Tier 1 items is lower than the related adjustment, the residual adjustment shall be made to Common equity Tier 1 items.

Items excluded from grandfathering of capital instruments not consituting state aid in Common Equity Tier 1 or Additional Tier 1 items in other elements of own funds for the purposes of Article 487(1) and (2) of Regulation (EU) No 575/2013
Article 36
1
Where affording to own funds instruments the treatment set out in paragraphs 1 and 2 of Article 487 of Regulation (EU) No 575/2013 during the period from 1 January 2014 to 31 December 2021, instruments may be treated in such a way either in whole or in part. Any such treatment shall have no effect on the calculation of the limit as specified in Article 486(4) of Regulation (EU) No 575/2013.
2
Own funds instruments referred to in paragraph 1 may again be treated as items referred to in Article 484(3) of Regulation (EU) No 575/2013, provided they are items referred to in Article 484(3) of that Regulation, and provided their amount no longer exceeds the applicable percentages referred to in Articles 486(2) of that Regulation.
3
Own funds instruments referred to in paragraph 1 may again be treated as items referred to in Article 484(4), provided that they are items referred to in Article 484(3) or Article 484(4) of Regulation (EU) No 575/2013 and provided that their amount no longer exceeds the applicable percentages referred to in Articles 486(3) of that Regulation.
Article 37
This Regulation shall enter into force on the twentieth day following that of its publication in the Official Journal of the European Union.