Article 16 Actual generation
1. For their control areas, TSOs shall calculate and publish the following information ...:
(a) actual generation output (MW) per market time unit and per generation unit of 100 MW or more installed generation capacity;
(b) aggregated generation output per market time unit and per production type;
(c) actual or estimated wind and solar power generation (MW) in each bidding zone per market time unit;
(d) aggregated weekly average filling rate of all water reservoir and hydro storage plants (MWh) per bidding zone including the figure for the same week of the previous year.
Word in Art. 16(1) substituted (31.12.2020) by The Electricity and Gas (Market Integrity and Transparency) (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/534), reg. 1(2), Sch. 3 para. 15(2)(a); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 16(1) omitted (31.12.2020) by virtue of The Electricity and Gas (Market Integrity and Transparency) (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/534), reg. 1(2), Sch. 3 para. 15(2)(b); 2020 c. 1, Sch. 5 para. 1(1)
2. The information laid down:
(a) in point (a) of paragraph 1 shall be published five days after the operational period;
(b) in point (b) of paragraph 1 shall be published no later than one hour after the operational period;
(c) in point (c) of paragraph 1 shall be published no later than one hour after the operational period and be updated on the basis of measured values as soon as they become available. ...
Words in Art. 16(2)(c) omitted (31.12.2020) by virtue of The Electricity and Gas (Market Integrity and Transparency) (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/534), reg. 1(2), Sch. 3 para. 15(3)(a); 2020 c. 1, Sch. 5 para. 1(1)
(d) in point (d) of paragraph 1 shall be published on the third working day following the week to which the information relates. ...
Words in Art. 16(2)(d) omitted (31.12.2020) by virtue of The Electricity and Gas (Market Integrity and Transparency) (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/534), reg. 1(2), Sch. 3 para. 15(3)(b); 2020 c. 1, Sch. 5 para. 1(1)
3. Generation units and production units located within a TSOs’ control area shall provide that TSO with all the relevant information to calculate the data laid down in paragraph 1.
Generation units and production units respectively shall be considered as primary owners of the relevant information they provide.