Entry into force and application
Article 8
1
This Regulation shall enter into force on the twentieth day following that of its publication in the Official Journal of the European Union.
2
It shall apply from 1 November 2013.
However:
a
the generic ecodesign requirements set out in points 1.1 and 1.2 of Annex I shall apply from 1 November 2014;
b
the specific ecodesign requirements set out in point 2.2 of Annex I shall apply from 1 November 2015.