Commission Delegated Regulation (EU) No 874/2012
of 12 July 2012
supplementing Directive 2010/30/EU of the European Parliament and of the Council with regard to energy labelling of electrical lamps and luminaires
(Text with EEA relevance) (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (1.10.2021) by The Ecodesign for Energy-Related Products and Energy Information (Lighting Products) Regulations 2021 (S.I. 2021/1095), regs. 1(2), 19(c) (with reg. 23(1))

Article 1 Subject matter and scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 2 Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Responsibilities of suppliers
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Responsibilities of dealers
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 5 Measurement methods
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 Verification procedure for market surveillance purposes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Revision
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 8 Repeal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 9 Transitional provisions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 10 Entry into force and application
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I Label

1. LABEL FOR ELECTRICAL LAMPS PRESENTED AT A POINT OF SALE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. LABEL FOR LUMINAIRES PRESENTED AT A POINT OF SALE

(1) The label shall be the relevant language version, and shall be as shown in the following illustration, or as in variants defined under points (2) and (3):
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(2) The following information shall be included in the label:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(3) The following illustrations provide examples of typical luminaire labels in addition to the illustration in point (1), without showing all possible combinations:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(4) The design of the label shall be as in the figures below:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II Product fiche for electrical lamps
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III Technical documentation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV Information to be provided in cases where final owners cannot be expected to see the product displayed

1. The information referred to in Article 4(1)(a) shall be provided in the following order:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V Product compliance verification by market surveillance authorities
The verification tolerances set out in this Annex relate only to the verification of the measured parameters by Great Britain authorities and shall not be used by the supplier as an allowed tolerance to establish the values in the technical documentation. The values and classes on the label or in the product fiche shall not be more favourable for the supplier than the values reported in the technical documentation.
When verifying the compliance of a product model with the requirements laid down in this Delegated Regulation, for the requirements referred to in this Annex, the authorities of the Great Britain shall apply the following procedure:

1. VERIFICATION PROCEDURE FOR ELECTRICAL LAMPS AND LED MODULES MARKETED AS INDIVIDUAL PRODUCTS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. VERIFICATION PROCEDURE FOR LUMINAIRES INTENDED TO BE MARKETED OR MARKETED TO THE END-USER
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VI Energy efficiency classes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VII Method for calculating the energy efficiency index and energy consumption

1. CALCULATION OF THE ENERGY EFFICIENCY INDEX
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. CALCULATION OF THE ENERGY CONSUMPTION
The weighted energy consumption (Ec ) is calculated in kWh/1 000 h as follows and is rounded to two decimal places:
Ec=Pcor×10001000
Where Pcor is the power corrected for any control gear losses in accordance with part 1 above.

ANNEX VIII Information to be provided in the case of sale, hire or hire-purchase through the internet

(1) For the purpose of points 2 to 4 of this Annex the following definitions shall apply:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(2) . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(3) The image used for accessing the label in the case of nested display shall:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(4) In the case of nested display, the sequence of display of the label shall be as follows:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .