CHAPTER 1

ADMISSIBILITY
SECTION 1

Application for renewal

Access to the application
Article 5
Upon receipt of the application, as provided for in Article 3(4), the assessing competent authority shall make it available to the public without delay, excluding any information in respect of which confidentiality has been requested and justified by the applicant pursuant to Article 63 of Regulation (EC) No 1107/2009, unless there is an overriding public interest in its disclosure.
Words in Art. 5 substituted (31.12.2020) by The Plant Protection Products (Miscellaneous Amendments) (EU Exit) Regulations 2019 (S.I. 2019/556), regs. 1(1), 20(5); 2020 c. 1, Sch. 5 para. 1(1)