CHAPTER 1

ADMISSIBILITY
SECTION 1

Application for renewal

Contacts prior to submission of supplementary dossiers
Article 4
The applicant may request a meeting with the assessing competent authority to discuss the application.
If requested, such pre-submission contacts shall take place prior to the submission of supplementary dossiers, as provided for in Article 6.
Words in Art. 4 substituted (31.12.2020) by The Plant Protection Products (Miscellaneous Amendments) (EU Exit) Regulations 2019 (S.I. 2019/556), regs. 1(1), 20(4); 2020 c. 1, Sch. 5 para. 1(1)