Article 6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Art. 6 omitted (11.8.2021) by virtue of The Medical Devices (Amendment) (EU Exit) Regulations 2021 (S.I. 2021/873), reg. 1(1), Sch. 2 para. 13