Monitoring the effects of legislation
Article 5
For the purpose of monitoring the effects of this Regulation and evaluating the need for further developments, manufacturers and type-approval authorities shall make available to the Commission, upon request, the information set out in Annex II. This information shall be treated in a confidential manner by the Commission and its delegates.