Scope
Article 1
This Regulation applies to vehicles of category M1 which comply with the following requirements:
- they are fitted with a manual gearbox,
- they have a reference mass not exceeding 2 610 kg or type-approval is extended to them in accordance with Article 2(2) of Regulation (EC) No 715/2007.
This Regulation does not apply to ‘vehicles designed to fulfil specific social needs’ as defined in Article 3(2)(c) of Regulation (EC) No 715/2007.