TITLE II

CLEARING, REPORTING AND RISK MITIGATION OF OTC DERIVATIVES

Conditions for making technical standards
Article 13a
The FCA, the PRA and the Bank of England, as appropriate, must co-ordinate the exercise of their functions when making technical standards under:
a
the second sub-paragraph of paragraph 4 of Article 4,
b
paragraph 5 of Article 9,
c
paragraph 6 of Article 9,
d
paragraph 15 of Article 11, or
e
paragraph 17 of Article 11,
with a view to ensuring that the technical standards made under each of those provisions are compatible.
Art. 13a inserted (31.12.2020) by The Over the Counter Derivatives, Central Counterparties and Trade Repositories (Amendment, etc., and Transitional Provision) (EU Exit) Regulations 2019 (S.I. 2019/335), regs. 1(1), 24 (with savings in S.I. 2019/680, reg. 11); 2020 c. 1, Sch. 5 para. 1(1)