CHAPTER I

GENERAL PROVISIONS
SECTION 2

General principles

Integrity of methodology
Article 8
The operator or aircraft operator shall enable reasonable assurance of the integrity of emission data to be reported. They shall determine emissions using the appropriate monitoring methodologies set out in this Regulation.
Reported emission data and related disclosures shall be free from material misstatement, avoid bias in the selection and presentation of information, and provide a credible and balanced account of an installation’s or aircraft operator’s emissions.
In selecting a monitoring methodology, the improvements from greater accuracy shall be balanced against the additional costs. Monitoring and reporting of emissions shall aim for the highest achievable accuracy, unless this is technically not feasible or incurs unreasonable costs.