CHAPTER I

GENERAL PROVISIONS
SECTION 2

General principles

Accuracy
Article 7
Operators and aircraft operators shall ensure that emission determination is neither systematically nor knowingly inaccurate.
They shall identify and reduce any source of inaccuracies as far as possible.
They shall exercise due diligence to ensure that the calculation and measurement of emissions exhibit the highest achievable accuracy.