CHAPTER III

REQUIREMENTS FOR VERIFIERS

Sectoral scopes of accreditation
Article 34
The verifier shall only issue a verification report to an operator or aircraft operator that performs an activity that is covered by the scope of the activity referred to in Annex I for which the verifier has been granted an accreditation according to the provisions of Regulation (EC) No 765/2008 and this Regulation.