CHAPTER II

VERIFICATION

Limitation of scope
Article 28
The verifier may conclude that the scope of the verification referred to in Article 27(1)(c) is too limited in any of the following situations:
1. data are missing that prevent a verifier from obtaining the evidence required to reduce the verification risk to the level needed to obtain reasonable level of assurance;
2. the monitoring plan is not approved by the competent authority;
3. the monitoring plan does not provide sufficient scope or clarity to conclude on the verification;
4. the operator or aircraft operator has failed to make sufficient information available to enable the verifier to carry out the verification.