Commission Regulation (EU) No 593/2012
of 5 July 2012
amending Regulation (EC) No 2042/2003 on the continuing airworthiness of aircraft and aeronautical products, parts and appliances, and on the approval of organisations and personnel involved in these tasks
(Text with EEA relevance) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Regulation (EU) No 1321/2014 of 26 November 2014 on the continuing airworthiness of aircraft and aeronautical products, parts and appliances, and on the approval of organisations and personnel involved in these tasks Text with EEA relevance.

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX

1) Annex I (Part-M) to Regulation (EC) No 2042/2003 is amended as follows:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2) Annex II (Part-145) to Regulation (EC) No 2402/2003 is amended as follows:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .