Ecodesign requirements
Article 3
The minimum efficiency requirements as well as information requirements for rotodynamic water pumps are set out in Annex II.
Ecodesign requirements shall apply in accordance with the following timetable:
1. from 1 January 2013, water pumps shall have a minimum efficiency as defined in Annex II, point 1(a);
2. from 1 January 2015, water pumps shall have a minimum efficiency as defined in Annex II, point 1(b);
3. from 1 January 2013, the information on water pumps shall comply with the requirements set out in Annex II, point 2.
Compliance with ecodesign requirements shall be measured and calculated in accordance with requirements set out in Annex III.
No ecodesign requirement is necessary regarding any other ecodesign parameter referred to in Annex I, Part 1, of Directive 2009/125/EC.