CHAPTER XVII

FINAL PROVISIONS

Repeal
Article 96
Without prejudice to Articles 86, 89 to 93 and 95 of this Regulation, Directive 98/8/EC is hereby repealed with effect from 1 September 2013.
References to the repealed Directive shall be construed as references to this Regulation and read in accordance with the correlation table in Annex VII.
Substituted by Regulation (EU) No 334/2014 of the European Parliament and of the Council of 11 March 2014 amending Regulation (EU) No 528/2012 concerning the making available on the market and use of biocidal products, with regard to certain conditions for access to the market (Text with EEA relevance).