CHAPTER XVII

FINAL PROVISIONS

Transitional measures
Article 89
1
The Commission shall carry on with the work programme for the systematic examination of all existing active substances commenced in accordance with Article 16(2) of Directive 98/8/EC with the aim of achieving it by 14 May 2014. To that end, the Commission shall be empowered to adopt delegated acts in accordance with Article 83 concerning the carrying out of the work programme and specification of the related rights and obligations of the competent authorities and the participants in the programme.
Depending upon the progress of the work programme, the Commission shall be empowered to adopt delegated acts in accordance with Article 83 concerning the extension of the duration of the work programme for a determined period.
In order to facilitate a smooth transition from Directive 98/8/EC to this Regulation, during the work programme the Commission shall adopt either implementing regulations providing that an active substance is approved, and under which conditions, or, in cases where the conditions laid down in Article 4(1) or, where applicable, the conditions set out in Article 5(2), are not satisfied or where the requisite information and data have not been submitted within the prescribed period, implementing decisions stating that an active substance is not approved. Those implementing acts shall be adopted in accordance with the examination procedure referred to in Article 82(3). Regulations approving an active substance shall specify the date of approval. Article 9(2) shall apply.
2
By way of derogation from Article 17(1), Article 19(1) and Article 20(1) of this Regulation, and without prejudice to paragraphs 1 and 3 of this Article, a Member State may continue to apply its current system or practice of making a given biocidal product available on the market until two years after the date of approval of the last of the active substances to be approved in that biocidal product. It may, according to its national rules, authorise the making available on the market in its territory only of a biocidal product containing existing active substances which have been or are being evaluated under Commission Regulation (EC) No 1451/2007 of 4 December 2007 on the second phase of the 10-year work programme referred to in Article 16(2) of Directive 98/8/EC , but which have not yet been approved for that product-type.
By way of derogation from the first subparagraph, in the case of a decision not to approve an active substance, a Member State may continue to apply its current system or practice of making biocidal products available on the market for up to 12 months after the date of the decision not to approve an active substance in accordance with the third subparagraph of paragraph 1.
3
Following a decision to approve a particular active substance for a specific product-type Member States shall ensure that authorisations for biocidal products of that product-type and containing that active substance are granted, modified or cancelled as appropriate in accordance with this Regulation within two years of the date of approval.
To that effect, those wishing to apply for the authorisation or mutual recognition in parallel of biocidal products of that product-type containing no active substances other than existing active substances shall submit applications for authorisation or mutual recognition in parallel to Member States’ competent authorities no later than the date of approval of the active substance(s). In the case of biocidal products containing more than one active substance, applications for authorisation shall be submitted no later than the date of approval of the last active substance for that product-type.
Where no application for authorisation or mutual recognition in parallel has been submitted in accordance with the second subparagraph:
a
the biocidal product shall no longer be made available on the market with effect from 180 days after the date of approval of the active substance(s); and
b
disposal and use of existing stocks of the biocidal product may continue until 365 days after the date of approval of the active substance(s).
4
Where a Member State’s competent authority rejects the application for authorisation of a biocidal product submitted under paragraph 3 or decides not to grant authorisation, that biocidal product shall no longer be made available on the market 180 days after the date of such rejection or decision. Disposal and use of existing stocks of such biocidal products may continue until 365 days after the date of such rejection or decision.
OJ L 325, 11.12.2007, p. 3.